en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	EXPLANATORY NOTE
cy-gb	NODYN ESBONIADOL

en-gb	(This note is not part of the Order)
cy-gb	(Nid yw’r nodyn hwn yn rhan o’r Gorchymyn)

en-gb	This O rder amends the Sustainable Drainage (Enforcement) (Wales) Order 2018 ( S.I. 2018/1182 (W. 241) ) in order to provide for an unlimited fine for the offences set out within article 21 of that Order.
cy-gb	Mae’r Gorchymyn hwn yn diwygio Gorchymyn Draenio Cynaliadwy (Gorfodi) (Cymru) 2018 ( O.S. 2018/1182 (Cy. 241) ) er mwyn darparu ar gyfer dirwy ddiderfyn ar gyfer y troseddau a nodir yn erthygl 21 o’r Gorchymyn hwnnw.

en-gb	 The Welsh Ministers’ Code of Practice on the carrying out of regulatory impact assessments was considered in relation to this Order. 
cy-gb	 Ystyriwyd Cod Ymarfer Gweinidogion Cymru ar gynnal Asesiadau Effaith Rheoleiddiol mewn perthynas â’r Gorchymyn hwn. 

en-gb	As a result, it was not considered necessary to carry out a regulatory impact assessment as to the likely costs and benefits of complying with this Order.
cy-gb	O ganlyniad, ystyriwyd nad oedd yn angenrheidiol cynnal asesiad effaith rheoleiddiol o’r costau a’r manteision sy’n debygol o ddeillio o gydymffurfio â’r Gorchymyn hwn.

en-gb	2
cy-gb	2

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	WELSH STATUTORY INSTRUMENTS
cy-gb	OFFERYNNAU STATUDOL CYMRU

en-gb	2020 No. 486 (W. 
cy-gb	2020 Rhif 486 (Cy. 

en-gb	111)
cy-gb	111)

en-gb	SOCIAL CARE, WALES
cy-gb	GOFAL CYMDEITHASOL, CYMRU

en-gb	The Regulated Services (Annual Returns) (Wales)
cy-gb	Rheoliadau Gwasanaethau Rheoleiddiedig (Datganiadau

en-gb	(Amendment) (Coronavirus) Regulations 2020
cy-gb	Blynyddol) (Cymru) (Diwygio) (Coronafeirws) 2020

en-gb	Made - - - - 4 May 2020 Laid before the National
cy-gb	Gwnaed - - - - 4 Mai 2020 Gosodwyd gerbron Cynulliad

en-gb	Assembly for Wales - - 5 May 2020
cy-gb	Cenedlaethol Cymru - - 5 Mai 2020

en-gb	Coming into force - - 26 May 2020
cy-gb	Yn dod i rym - - 26 Mai 2020

en-gb	The Welsh Ministers make the following Regulations in exercise of the powers conferred by sections 10(4) and 187(1) of the Regulation and Inspection of Social Care (Wales) Act 2016( 1 ).
cy-gb	Mae Gweinidogion Cymru yn gwneud y Rheoliadau a ganlyn drwy arfer y pwerau a roddir gan adrannau 10(4) a 187(1) o Ddeddf Rheoleiddio ac Arolygu Gofal Cymdeithasol (Cymru) 2016( 1 ).

en-gb	Title and commencement
cy-gb	Enwi a chychwyn

en-gb	—(1) The title of these Regulations is the Regulated Services (Annual Returns) (Wales) (Amendment) (Coronavirus) Regulations 2020.
cy-gb	—(1) Enw’r Rheoliadau hyn yw Rheoliadau Gwasanaethau Rheoleiddiedig (Datganiadau Blynyddol) (Cymru) (Diwygio) (Coronafeirws) 2020.

en-gb	(2) These Regulations come into force on 26 May 2020.
cy-gb	(2) Daw’r Rheoliadau hyn i rym ar 26 Mai 2020.

en-gb	Amendments to the Regulated Services (Annual Returns) (Wales) Regulations 2017
cy-gb	Diwygiadau i Reoliadau Gwasanaethau Rheoleiddiedig (Datganiadau Blynyddol) (Cymru) 2017

en-gb	The Regulated Services (Annual Returns) (Wales) Regulations 2017( 2 ) are amended in accordance with regulations 3 and 4.
cy-gb	Mae Rheoliadau Gwasanaethau Rheoleiddiedig (Datganiadau Blynyddol) (Cymru) 2017( 2 ) wedi eu diwygio yn unol â rheoliadau 3 a 4.

en-gb	Omit regulation 9A (time for submission of first annual returns).
cy-gb	Hepgorer rheoliad 9A (amser ar gyfer cyflwyno’r datganiadau blynyddol cyntaf).

en-gb	For regulation 10 (time limit for submission of annual returns) substitute—
cy-gb	Yn lle rheoliad 10 (terfyn amser ar gyfer cyflwyno datganiadau blynyddol) rhodder—

en-gb	“ Time limit for submission of annual returns
cy-gb	“ Terfyn amser ar gyfer cyflwyno datganiadau blynyddol

en-gb	—(1) An annual return relating to any of the financial years 2018-19, 2019-20 or 2020-21 must be submitted to the Welsh Ministers no later than 26 May 2021.
cy-gb	 "10. —(1) Rhaid i ddatganiad blynyddol sy’n ymwneud ag unrhyw un neu ragor o’r blynyddoedd ariannol 2018-19, 2019-20 neu 2020-21 gael ei gyflwyno i Weinidogion Cymru heb fod yn hwyrach na 26 Mai 2021.

en-gb	 (2) An annual return relating to a subsequent financial year must be submitted to the Welsh Ministers within 56 days of the end of the financial year to which it relates.”
cy-gb	 (2) Rhaid i ddatganiad blynyddol sy’n ymwneud â blwyddyn ariannol ddilynol gael ei gyflwyno i Weinidogion Cymru o fewn 56 o ddiwrnodau i ddiwedd y flwyddyn ariannol y mae’n ymwneud â hi.”

en-gb	( 1 ) 2016 anaw 2 ; see the definition of “prescribed” in section 189. 
cy-gb	( 1 ) 2016 dccc 2 ; gweler y diff iniad o “a ragnodir ” a “rhagnodedig” yn adr an 189. 

en-gb	( 2 ) S.I. 2017/1097 (W. 277) , amended by S.I. 2019/233 (W. 52) .
cy-gb	( 2 ) O.S. 2017/1097 (Cy. 277) , a ddiwygiwyd gan O.S. 2019/233 (Cy. 52) .

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-26 Status: 
cy-gb	2020-05-26 Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	4 May 2020
cy-gb	4 Mai 2020

en-gb	 Julie Morgan  Deputy Minister for Health and Social Services under authority of the Minister for Health and Social Services, one of the Welsh Ministers 
cy-gb	 Julie Morgan  Y Dirprwy Weinidog Iechyd a Gwasanaethau Cymdeithasol o dan awdurdod y Gweinidog  Iechyd a Gwasanaethau Cymdeithasol, un o Weinidogion Cymru

en-gb	2
cy-gb	2

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-26
cy-gb	2020-05-26

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	EXPLANATORY NOTE
cy-gb	NODYN ESBONIADOL

en-gb	(This note is not part of the Regulations)
cy-gb	(Nid yw’r nodyn hwn yn rhan o’r Rheoliadau)

en-gb	 These Regulations are made under pow ers given to th e Welsh Ministers by the Regulation and Inspection of Social Care (Wales) Act 2016 (anaw 2) (“the Act”). 
cy-gb	 Mae’r Rheoliadau hyn wedi eu gwneud o dan bwerau a roddir i Weinid ogion Cymru gan Ddeddf Rheoleiddio ac Arolygu Gofal Cymdeithasol (Cymru) 2016 (dccc 2) (“y Ddeddf”). 

en-gb	They amend a particular requirement placed on registered providers of social care and are made in response to the spread of severe acute respiratory syndrome coronavirus 2 (SARS-CoV-2) in Wales.
cy-gb	Maent yn diwygio gofyniad penodol a osodir ar ddarparwyr gofal cymdeithasol cofrestredig ac maent wedi eu gwneud mewn ymateb i ledaeniad coronafeirws syndrom anadlol acíwt difrifol 2 (SARS-CoV-2) yng Nghymru.

en-gb	 Part 1 of the Act places requirements on providers of the social care services that are regulated by the Act. 
cy-gb	 Mae Rhan 1 o’r Ddeddf yn gosod gofynion ar ddarparwyr y gwasanaethau gofal cymdeithasol a reoleiddir gan y Ddeddf. 

en-gb	They include a requirement in section 10 to submit an annual ret urn to the Welsh Ministers . The Regulated Services (Annual Returns) (Wales) Regulations 2017 ( S.I. 2017/1097 (W. 277) ) (“the Annual Returns Regulations”) provide further details about the annual returns. 
cy-gb	Maent yn cynnwys gofyniad yn adran 10 i gyflwyno datganiad blynyddol i Weinidogion Cymru. Mae Rheoliadau Gw asanaethau Rheoleiddiedig (Datganiadau Blynyddol) (Cymru) 2017 ( O.S. 2017/1097) (Cy. 277) ) (“y Rheoliadau Datganiadau Blynyddol”) yn darparu manylion pellach am y datganiadau blynyddol. 

en-gb	They include provision made under section 10(4) about the dates by which the returns must be submitted.
cy-gb	Maent yn cynnwys darpariaeth a wneir o dan adran 10(4) ynghylch y dyddiadau erbyn pryd y mae rhaid cyflwyno’r datganiadau.

en-gb	 These Regulations are made under section 10(4) of the Act and amend regulations 9A and 10 of the Annual Returns Regulations. 
cy-gb	 Mae’r Rheoliadau hyn wedi eu gwneud o dan adran 10(4) o’r Ddeddf ac maent yn diwygio rheoliadau 9A a 10 o’r Rheoliadau Datganiadau Blynyddol. 

en-gb	Those regulations relate to the date by which annual returns have to be submitted. 
cy-gb	Mae’r rheoliadau hynny yn ymwneudâ’r dyddiad erbyn pryd y mae rhaid cyflwyno datganiadau blynyddol. 

en-gb	The effect of the amendments is that providers of all types of regulated services must submit annual returns relating to financial years 2018-19, 2019-20 and 2020-21 no later than 26 May 2021. 
cy-gb	Effaith y diwygiadau yw bod rhaid i ddarparwyr pob math o wasanaethau rheoleiddiedig gyflwyno datganiadau blynyddol sy’n ymwneud â’r blynyddoedd ariannol 2018-19, 2019-20 a 2020-21 heb fod yn hwyrach na 26 Mai

en-gb	Previously, service providers who are registered to provide a care home service, a secure accommodation service, a residential family centre service or a domiciliary support service were required to submit their first set of annual returns no later than 31 December 2020.
cy-gb	Yn flaenorol, roedd yn ofynnol i ddarparwyr gwasanaethau sydd wedi eu cofrestru i ddarparu gwasanaeth cartref gofal, gwasanaeth llety diogel, gwasanaeth canolfan breswyl i deuluoedd neu wasanaeth cymorth cartref gyflwyno eu set gyntaf o ddatganiadau blynyddol heb fod yn hwyrach na 31 Rhagfyr 2020.

en-gb	 The Welsh Ministers’ Code of Practice on the carrying out of Regulatory Impact Assessments was considered in relation to these Regulations. 
cy-gb	 Ystyriwyd Cod Ymarfer Gweinidogion Cymru ar gynnal Asesiadau Effaith Rheoleiddiol mewn perthynas â’r Rheoliadau hyn. 

en-gb	As a result, it was not considered necessary to carry out a regulatory impact assessment as to the likely costs and benefits of complying with these Regulations.
cy-gb	O ganlyniad, ystyriwyd nad oedd yn angenrheidiol cynnal asesiad effaith rheoleiddiol o’r costau a’r manteision sy’n debygol o ddeillio o gydymffurfio â’r Rheoliadau hyn.

en-gb	3
cy-gb	3

en-gb	Welsh Government
cy-gb	Llywodraeth Cymru

en-gb	Guidance to local authorities on the impact of the Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020 on funerals
cy-gb	Canllawiau i awdurdodau lleol ar effaith Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020 ar angladdau

en-gb	Issued: 
cy-gb	Cyhoeddwyd: 

en-gb	3 April 2020
cy-gb	3 Ebrill 2020

en-gb	Updated: 
cy-gb	Diweddarwyd: 

en-gb	5 May
cy-gb	5 Mai

en-gb	Introduction
cy-gb	Cyflwyniad

en-gb	 The Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020 impose temporary restrictions on gatherings and movement of people in Wales. 
cy-gb	 Mae Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020 yn gosod cyfyngiadau dros dro ar gynulliadau a symudiadau gan bobl yng Nghymru. 

en-gb	This has been done to minimise the extent to which people leave their homes to help protect the public from the spread of severe acute respiratory syndrome coronavirus 2 (SARS-CoV-2).
cy-gb	Mae hyn wedi ei wneud i leihau faint y mae pobl yn gadael eu cartrefi er mwyn helpu i ddiogelu’r cyhoedd rhan lledaeniad syndrom anadlol acíwt difrifol 2 (SARS-CoV-2).

en-gb	Death of a family member or friend is a very distressing event which is why the Regulations recognise the need to attend funerals in certain circumstances. 
cy-gb	Mae marwolaeth aelod o’r teulu neu ffrind yn peri gofid mawr, a dyna pam y mae’r Rheoliadau yn cydnabod yr angen i fynd i angladdau o dan amgylchiadau penodol. 

en-gb	Funeral services should continue, and local authorities should consider how they can facilitate this. Funerals with physical attendance of mourners should continue as long as those attending adhere to this guidance, which sets out how the risk of transmission can be reduced.
cy-gb	Dylid parhau i gynnal gwasanaethau angladdau, a dylai awdurdodau lleol ystyried sut y gallant hwyluso hynny. Dylid parhau i gynnal angladdau y mae galarwyr yn bresennol yn gorfforol ynddynt cyhyd ag y bo pawb sydd yn yr angladd yn cadw at y canllawiau hyn, sy’n esbonio sut y gellir lleihau’r risg o drosglwyddo’r haint.

en-gb	However, although members of the public may leave home to attend a funeral, they should be respectful of the fact that this is a limited exception to restrictions that have been imposed as a result of a public health emergency. 
cy-gb	Fodd bynnag, er y caiff aelodau’r cyhoedd adael y cartref i fynd i angladd, dylent barchu’r ffaith bod hyn yn eithriad cyfyngedig i’r cyfyngiadau sydd wedi eu gosod o ganlyniad i argyfwng iechyd cyhoeddus. 

en-gb	The overarching advice, therefore, is that people should only attend the funeral of their closest family and friends, and only if they have been invited. 
cy-gb	Y cyngor cyffredinol, felly, yw mai dim ond i angladd eu teulu a’u ffrindiau agosaf y dylai pobl fynd, a dim ond os ydynt wedi cael gwahoddiad. 

en-gb	People are also encouraged not to attend a funeral if doing so would involve extensive travel..
cy-gb	Anogir pobl hefyd i beidio â mynd i angladd os byddai gwneud hynny yn golygu llawer o deithio.

en-gb	 To ensure that organisations managing funerals are able to cope with an increased number of deaths it is important that funerals are not delayed.
cy-gb	 Er mwyn i’r sefydliadau hynny sy’n rheoli angladdau allu ymdopi â nifer uwch o  farwolaethau mae’n bwysig peidio â gohirio angladdau.

en-gb	Legal requirements
cy-gb	Gofynion cyfreithiol

en-gb	 The Regulations make provisions that apply both to those responsible for a crematorium, place of worship or cemetery at which a funeral or burial is held, and to members of the public who may wish to attend a funeral or burial.
cy-gb	 Mae’r Rheoliadau yn gwneud darpariaethau sy’n gymwys i’r rheini sy’n gyfrifol am amlosgfa, man addoli neu fynwent lle y cynhelir angladd neu gladdedigaeth, ac i unrhyw aelodau o’r cyhoedd sy’n dymuno mynd i angladd neu gladdedigaeth.

en-gb	 Regulation 7 1 concerns places of worship, crematoriums and cemeteries, and provides as follows:
cy-gb	 Mae rheoliad 7 1 yn ymwneud â mannau addoli, amlosgfeydd a mynwentydd, ac mae’n darparu fel a ganlyn:

en-gb	1 Regulation 7 was amended by the Health Protection (Coronavirus Restrictions) (Amendment) (Wales) Regulations 2020 in order to make clear that the distance of 2 metres was to be maintained between persons from different households not necessarily between all persons attending a funeral.
cy-gb	1 Diwygiwyd rheoliad 7 gan Reoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Diwygio) (Cymru) 2020 er mwyn ei gwneud yn glir bod y pellter o 2 fetr i’w gynnal rhwng personau o aelwydydd gwahanol ac nid o angenrheidrwydd rhwng pob person sy’n mynd i angladd.

en-gb	1
cy-gb	1

en-gb	“Restrictions on places of worship, crematoriums, cemeteries and community centres
cy-gb	“Cyfyngiadau ar fannau addoli, amlosgfeydd, mynwentydd a chanolfannau cymunedol

en-gb	—(1) A person responsible for a place of worship must ensure that, during the emergency period, the place of worship is closed, except for uses permitted by paragraph (2).
cy-gb	—(1) Rhaid i berson sy’n gyfrifol am fan addoli sicrhau, yn ystod cyfnod yr argyfwng, fod y man addoli ar gau, ac eithrio at ddefnydd a ganiateir gan baragraff (2).

en-gb	(2) If all reasonable measures are taken to ensure a distance of 2 metres is maintained between every person in the place of worship (except between two members of the same household, or a carer and the person assisted by the carer), the place may be used—
cy-gb	(2) Os cymerir pob mesur rhesymol i sicrhau y cynhelir pellter o 2 fetr rhwng pob person yn y man addoli (ac eithrio rhwng dau aelod o’r un aelwyd, neu ofalwr a’r person a gynorthwyir gan y gofalwr), caniateir defnyddio’r man—

en-gb	(a) for funerals,
cy-gb	(a) ar gyfer angladdau,

en-gb	(b) to broadcast (without a congregation) an act of worship or funeral (whether over the internet or as part of a radio or television broadcast), or
cy-gb	(b) i ddarlledu (heb gynulleidfa) weithred o addoli neu angladd (boed dros y rhyngrwyd neu fel rhan o ddarllediad radio neu deledu), neu

en-gb	(c) to provide essential voluntary services or, upon the request of the Welsh Ministers or a local authority, urgent public services (including the provision of food banks or other support for the homeless or vulnerable people, blood donation sessions or support in an emergency).
cy-gb	(c) i ddarparu gwasanaethau gwirfoddol hanfodol neu, ar gais Gweinidogion Cymru neu awdurdod lleol, wasanaethau cyhoeddus brys (gan gynnwys darparu banciau bwyd neu gymorth arall ar gyfer y digartref neu bobl hyglwyf, sesiynau rhoi gwaed neu gymorth mewn argyfwng).

en-gb	(3) A person responsible for a crematorium must ensure that, during the emergency period, the crematorium is closed to members of the public, except for the use permitted by paragraph (4).
cy-gb	(3) Rhaid i berson sy’n gyfrifol am amlosgfa sicrhau, yn ystod cyfnod yr argyfwng, fod yr amlosgfa ar gau i aelodau’r cyhoedd, ac eithrio ar gyfer y defnydd a ganiateir gan baragraff (4).

en-gb	(4) If all reasonable measures are taken to ensure a distance of 2 metres is maintained between every person in the crematorium (except between two members of the same household, or a carer and the person assisted by the carer), the crematorium may open to members of the public for funerals or burials (and to broadcast a funeral or burial whether over the internet or otherwise).
cy-gb	(4) Os cymerir pob mesur rhesymol i sicrhau y cynhelir pellter o 2 fetr rhwng pob person yn yr amlosgfa (ac eithrio rhwng dau aelod o’r un aelwyd, neu ofalwr a’r person a gynorthwyir gan y gofalwr), caiff yr amlosgfa agor i aelodau’r cyhoedd am angladdau neu gladdu (a darlledu angladd neu gladdu boed dros y rhyngrwyd neu fel arall).

en-gb	(4A) A person responsible for a cemetery must take all reasonable measures to ensure a distance of 2 metres is maintained between every person at a burial taking place in the cemetery during the emergency period (except between two members of the same household, or a carer and the person assisted by the carer).
cy-gb	(4A) Rhaid i berson sy’n gyfrifol am fynwent gymryd pob mesur rhesymol i sicrhau y cynhelir pellter o 2 fetr rhwng pob person mewn claddedigaeth sy’n digwydd yn y fynwent yn ystod cyfnod yr argyfwng (ac eithrio rhwng dau aelod o’r un aelwyd, neu ofalwr a’r person a gynorthwyir gan y gofalwr).

en-gb	“(4ZA) Paragraph (3) does not apply to the grounds surrounding a crematorium, including any burial ground or garden of remembrance.”;”
cy-gb	(4ZA) Nid yw paragraff (3) yn gymwys i’r tir o amgylch amlosgfa, gan gynnwys unrhyw gladdfa neu ardd goffa.”

en-gb	 Regulation 8 2 concerns restrictions on individuals and provides (in relation to funerals) as follows:
cy-gb	 Mae rheoliad 8 2 yn ymwneud â chyfyngiadau ar unigolion ac mae’n darparu (mewn perthynas ag angladdau) fel a ganlyn:

en-gb	“Restrictions on movement and gatherings during the emergency period
cy-gb	“Cyfyngiadau ar symud a chynulliadau yn ystod cyfnod yr argyfwng

en-gb	—(1) During the emergency period, no person may leave the place where they are living without reasonable excuse.
cy-gb	—(1) Yn ystod cyfnod yr argyfwng, ni chaiff unrhyw berson adael y man lle y mae’n byw heb esgus rhesymol.

en-gb	(2) For the purposes of paragraph (1), a reasonable excuse includes the need— …(g) to attend a funeral—
cy-gb	(2) At ddibenion paragraff (1), mae esgus rhesymol yn cynnwys yr angen— …(g) i fynd i angladd—

en-gb	(i) as a person responsible for arranging the funeral,
cy-gb	(i) fel person sy’n gyfrifol am drefnu’r angladd,

en-gb	(ii) if invited by a person responsible for arranging the funeral, or
cy-gb	(ii) os caiff ei wahodd gan berson sy’n gyfrifol am drefnu’r angladd, neu

en-gb	(iii) as the carer of a person attending.”
cy-gb	(iii) fel gofalwr person sy’n mynd i’r angladd.”

en-gb	This guidance offers advice to local authorities on the practical implementation of these legal requirements. 
cy-gb	Mae’r canllawiau hyn yn cynnig cyngor i awdurdodau lleol ynghylch gweithredu’r gofynion cyfreithiol hyn yn ymarferol. 

en-gb	A simplified version aimed at members of the public can be found in the Annex.
cy-gb	Mae fersiwn mwy syml sydd wedi’i deilwra at aelodau’r cyhoedd yn yr Atodiad.

en-gb	Taking all reasonable measures to maintain 2 metre distance
cy-gb	Cymryd pob cam rhesymol i gynnal pellter o 2 fetr

en-gb	A key aspect of the Welsh (and UK) Government’s response to the public health emergency is to require people to stay at home. 
cy-gb	Agwedd allweddol ar ymateb Llywodraeth Cymru (a Llywodraeth y DU) i’r argyfwng iechyd cyhoeddus yw ei gwneud yn ofynnol i bobl aros gartref. 

en-gb	Attending a funeral is an exception to this rule, but is one that has been limited. 
cy-gb	Mae mynd i angladd yn eithriad i’r rheol hon, ond mae’n un sy’n gyfyngedig. 

en-gb	Unfortunately this necessitates changes to traditional customs and practices at funerals in so far as this involves interaction between people from different households.
cy-gb	Yn anffodus, mae hyn yn golygu bod angen newid defodau ac arferion traddodiadol mewn angladdau i’r graddau y mae hyn yn ymwneud â rhyngweithio â phobl o  aelwydydd gwahanol.

en-gb	In most circumstances people are expected to practice social distancing measures. 
cy-gb	O dan y rhan fwyaf o amgylchiadau, disgwylir i bobl gymryd camau i gadw pellter cymdeithasol. 

en-gb	This means maintaining a distance of 2 metres wherever practical. 
cy-gb	Mae hyn yn golygu cynnal pellter o 2 fetr pan fo’n ymarferol. 

en-gb	This does not include between members of the same household, or a carer and the person assisted by the carer.
cy-gb	Nid yw hyn yn cynnwys gwneud hyn rhwng aelodau o’r un aelwyd, na rhwng gofalwr a’r person sy’n cael ei gynorthwyo gan y gofalwr.

en-gb	A maximum number who can attend
cy-gb	Uchafswm y nifer a all fynd

en-gb	The most obvious means of taking all reasonable measure to maintain a 2 metre distance between persons present at a funeral (be that a cremation or burial), is to limit the number who may attend. 
cy-gb	Y modd amlycaf i gymryd pob cam rhesymol i gynnal pellter o 2 fetr rhwng personau sy’n bresennol mewn angladd (pa un a yw’n amlosgiad neu’n gladdedigaeth), yw cyfyngu ar y nifer a gaiff fynd. 

en-gb	This number will depend on whether the funeral involves a burial in a cemetery (including the interment of ashes), a cremation in a crematorium or a service in a place of worship.
cy-gb	Bydd y nifer hon yn dibynnu ar ba un a yw’r angladd yn cynnwys claddedigaeth mewn mynwent (gan gynnwys claddu’r llwch), amlosgiad mewn amlosgfa neu wasanaeth mewn man addoli.

en-gb	In so far as a crematorium or place of worship is concerned, the appropriate limit will depend on the size and layout of the building. 
cy-gb	O ran amlosgfa neu fan addoli, bydd y terfyn priodol yn dibynnu ar faint a chynllun yr adeilad. 

en-gb	The legal requirement is that all reasonable measures are taken to ensure a distance of 2 metres is kept between those attending. 
cy-gb	Y gofyniad cyfreithiol yw y cymerir pob cam rhesymol i sicrhau y cedwir pellter o 2 fetr rhwng y rheini sy’n mynd. 

en-gb	This means a distance of 2 metres between members of different households, not necessarily between each individual person (as members of the same household can safely sit together). 
cy-gb	Mae hyn yn golygu pellter o 2 fetr rhwng aelodau o aelwydydd gwahanol, nid o angenrheidrwydd rhwng pob person unigol (gan y gall aelodau o’r un aelwyd eistedd gyda’i gilydd yn ddiogel). 

en-gb	In practice, however, it will generally not be practicable to assess in advance how many people from the same households will be sitting together at any particular funeral. 
cy-gb	Yn ymarferol, fodd bynnag, ni fydd yn ymarferol yn gyffredinol asesu ymlaen llaw faint o bobl o’r un aelwydydd a fydd yn eistedd gyda’i gilydd mewn unrhyw angladd penodol. 

en-gb	A figure should be calculated for each crematorium or place or worship, therefore, based on the number that could reasonably be accommodated if every person sat 2 metres apart. 
cy-gb	Dylid cyfrifo ffigur ar gyfer pob amlosgfa neu fan addoli, felly, yn seiliedig ar y nifer y gellid ei dal pe bai pob person yn eistedd 2 fetr ar wahân. 

en-gb	This should, however, only be a guide and a degree of flexibility can be exercised on the assumption that a significant proportion of those attending will be sitting together with members of their household (which could enable more people to attend).
cy-gb	Fodd bynnag, dim ond canllaw y dylai hyn fod ac mae rhywfaint o hyblygrwydd yn bosibl gan y tybir y bydd cyfran sylweddol o’r rheini sy’n mynd yn eistedd gydag aelodau o’u haelwyd (a allai alluogi mwy o bobl i fynd).

en-gb	3
cy-gb	3

en-gb	Different considerations apply to practising social distancing in a cemetery, or burial ground or garden of remembrance in a crematorium, as the most important aspect will be limiting the extent to which members of different households congregate, most obviously around the grave. 
cy-gb	 Mae ystyriaethau gwahanol yn gymwys i roi camau cadw pellter cymdeithasol ar waith mewn mynwent, neu mewn claddfa neu ardd goffa mewn amlosgfa, gan mai’r agwedd bwysicaf fydd cyfyngu ar y graddau y mae aelodau o aelwydydd gwahanol yn ymgynnull, yn amlycaf o amgylch y bedd. 

en-gb	Note that the Regulations do not require the closure of cemeteries but general guidance on social distancing should be taken into account. 
cy-gb	Noder nad  yw’r Rheoliadau yn ei gwneud yn ofynnol cau mynwentydd ond dylid cymryd y canllawiau cyffredinol ynghylch cadw pellter cymdeithasol i ystyriaeth. 

en-gb	Grounds surrounding a crematorium are also not required to close, this includes any burial grounds or gardens of remembrance.. 
cy-gb	Nid yw’n ofynnol cau’r tir o amgylch amlosgfa chwaith, gan gynnwys unrhyw gladdfeydd neu erddi coffa. 

en-gb	The regulations specify that visiting a burial ground or garden of remembrance to pay respects is a reasonable excuse to be outside of your home .
cy-gb	Mae’r Rheoliadau’n pennu bod ymweld â chladdfa neu ardd goffa i dalu teyrnged yn esgus rhesymol i fod allan o’ch cartref.

en-gb	Requirement for those attending to be invited
cy-gb	Gofyniad i’r rheini sy’n mynd i’r angladd gael gwahoddiad

en-gb	A means of ensuring that the maximum number that can attend a funeral is observed is by limiting attendance only to those invited. 
cy-gb	Un ffordd o sicrhau y cedwir at yr uchafswm a all fynd i angladd yw drwy gyfyngu ar bresenoldeb i'r rheini sy’n cael gwahoddiad yn unig. 

en-gb	This is reinforced by regulation 8 which limits the “reasonable excuse” for leaving your home to attend a funeral only to those organising the funeral, those invited to the funeral and to any carers of those attending. 
cy-gb	Atgyfnerthir hyn gan reoliad 8 sy'n cyfyngu'r "esgus rhesymol" dros adael eich cartref i fynd i angladd i’r rheini sy'n trefnu'r angladd, y rheini sy’n cael eu gwahodd i fynd 'r angladd ac i unrhyw ofalwyr i’r rheini sy’n mynd i’r angladd.

en-gb	This should be implemented by informing those who are organising funerals that they must expressly invite those they wish to attend (though this does not require any formality such as sending an invitation in writing). 
cy-gb	Dylid gweithredu hyn drwy roi gwybod i'r rheini sy'n trefnu angladdau bod rhaid iddynt fynd ati’n benodol i wahodd y rheini y maent yn dymuno iddynt fod yn bresennol (er nad yw hyn yn gofyn am unrhyw ffurfioldeb megis anfon gwahoddiad yn ysgrifenedig). 

en-gb	In view of the risk of people attending uninvited (as of course is the normal practice), those organising should also be encouraged to limit information about the location of the funeral in death notices and make clear that attendance at the funeral is by invitation only.
cy-gb	O ystyried y risg y bydd pobl yn mynd i’r angladd heb wahoddiad (sef y drefn arferol, wrth gwrs), dylid hefyd annog y rheini sy'n trefnu’r angladd i gyfyngu ar y wybodaeth am leoliad yr angladd mewn hysbysiadau marwolaeth a'i gwneud yn glir mai drwy wahoddiad yn unig y mae modd mynd i’r angladd.

en-gb	Travelling to the funeral
cy-gb	Teithio i’r angladd

en-gb	Linked to the overarching advice and requirements to stay at home is a desire to minimise travel. 
cy-gb	Yn gysylltiedig â'r cyngor cyffredinol a'r gofynion i aros gartref, mae awydd i leihau teithio. 

en-gb	Although clearly a sensitive issue in many circumstances, those who would need to travel long distances which would require stopping on the way or an overnight stay should generally be encouraged not to attend a funeral.
cy-gb	Er ei bod yn amlwg yn fater sensitif o dan lawer o amgylchiadau, yn gyffredinol dylid annog y rheini y byddai’n ofynnol iddynt deithio pellteroedd mawr a fyddai’n golygu y byddai rhaid iddynt stopio ar y ffordd neu aros dros nos i beidio â mynd i angladd.

en-gb	In addition, those attending from the same household should travel together and should not travel with others from different households. 
cy-gb	Yn ogystal, dylai'r rheini sy'n mynd o'r un aelwyd deithio gyda'i gilydd ac ni ddylent deithio gydag eraill o aelwydydd gwahanol. 

en-gb	Limousines should be used only if there is no other option and where they are used, glass screens should be raised, passengers should be limited to those from the same household and they should sit as far back from the driver as possible.
cy-gb	Dim ond os nad oes dewis arall y dylid defnyddio limwsinau a phan fônt yn cael eu defnyddio, dylid codi sgriniau gwydr, dylid cyfyngu teithwyr i’r rheini o’r un aelwyd a dylent eistedd mor bell yn ôl â phosibl oddi wrth y gyrrwr.

en-gb	During the funeral
cy-gb	Yn ystod yr angladd

en-gb	Arrangements should be put in place to ensure that upon arrival at a crematorium, place of worship or cemetery, those attending can be kept apart and are not required to congregate in confined spaces. 
cy-gb	Dylid gwneud trefniadau i sicrhau, wrth gyrraedd amlosgfa, man addoli neu fynwent, y gall y rheini sy'n mynychu gael eu cadw ar wahân ac nad yw'n ofynnol iddynt ymgynnull mewn mannau cyfyng. 

en-gb	4
cy-gb	4

en-gb	This is particularly important while waiting to go into a crematorium or place of worship.
cy-gb	Mae hyn yn arbennig o bwysig wrth aros i fynd i amlosgfa neu fan addoli.

en-gb	Those attending should then be shown to their seats in accordance with arrangements put in place in advance that ensure that all can maintain a 2 metre distance.
cy-gb	Yna, dylid dangos i’r rheini sy'n bresennol ble y mae eu seddau yn unol â'r trefniadau a wnaed ymlaen llaw sy'n sicrhau y gall pawb gadw pellter o 2 fetr.

en-gb	Those attending should be advised not to touch, kiss or come into contact with the coffin. 
cy-gb	Dylid cynghori'r rheini sy'n mynd i beidio â chyffwrdd, cusanu neu ddod i gysylltiad â'r arch. 

en-gb	This includes bearers who may accompany the coffin at appropriate distances but should not carry the coffin on their shoulders. 
cy-gb	Mae hyn yn cynnwys cludwyr a all fynd gyda'r arch ar bellteroedd priodol ond ni ddylent gario'r arch ar eu hysgwyddau. 

en-gb	Rather the coffin should be moved using wheeled biers and lifted as required by the funeral director.
cy-gb	Yn hytrach, dylai’r arch gael ei symud gan ddefnyddio elorau ag olwynion a'i chodi yn ôl yr angen gan y trefnwr angladdau.

en-gb	Processes should be put in place to allow a suitable time to clean and disinfect the area in which a service has taken place both before and after each service, paying attention to frequently touched objects and surfaces, using regular cleaning products. 
cy-gb	Dylid rhoi prosesau ar waith i ganiatáu digon o amser i lanhau a diheintio’r man lle y cynhelir y gwasanaeth, a hynny cyn ac ar ôl pob gwasanaeth, gan roi sylw i wrthrychau ac arwynebau y mae pobl yn cyffwrdd yn aml â hwy, a chan ddefnyddio nwyddau glanhau arferol. 

en-gb	They should also ensure that handwashing facilities are available and clearly signposted. 
cy-gb	Dylid sicrhau hefyd fod cyfleusterau ar gael i bobl i olchi eu dwylo, a bod arwyddion clir i ddangos ble y mae’r cyfleusterau hynny. 

en-gb	Hymn books should be removed (making use of bespoke order of service pamphlets for all purposes instead.
cy-gb	Dylid symud llyfrau emynau i ffwrdd (gan ddefnyddio pamffledi trefn gwasanaeth pwrpasol at bob diben yn lle hynny).

en-gb	Collections should be arranged online rather than at the crematorium or place of worship.
cy-gb	Dylid trefnu casgliadau ar lein yn hytrach nag yn yr amlosgfa neu'r man addoli.

en-gb	It is important also to limit the extent that people from different households congregate after a funeral. 
cy-gb	Mae hefyd yn bwysig cyfyngu ar y graddau y mae pobl o aelwydydd gwahanol yn ymgynnull ar ôl angladd. 

en-gb	That may be outside a crematorium or place of worship, or at a graveside. 
cy-gb	Gall hynny fod y tu allan i amlosgfa neu fan addoli, neu wrth ymyl y bedd. 

en-gb	Arrangements should be put in place to ensure that those attending can pay tribute to the deceased with dignity, and to greet family and friends as appropriate, while ensuring physical distance is maintained.
cy-gb	Dylid rhoi trefniadau yn eu lle i sicrhau bod y rheini sy'n mynd yn gallu talu teyrnged i'r ymadawedig gydag urddas, a chyfarch teulu a ffrindiau fel y bo'n briodol, gan sicrhau bod pellter corfforol yn cael ei gynnal.

en-gb	Mourners who can attend
cy-gb	Y galarwyr sy’n cael mynd

en-gb	Those experiencing coronavirus symptoms should not attend.
cy-gb	Ni ddylai pobl a chanddynt symptomau’r coronafeirws fynd i angladdau.

en-gb	 However mourners who are self-isolating for 14 days due to someone in their household being unwell with symptoms of coronavirus (COVID-19) but are not symptomatic themselves should be facilitated to attend the funeral in person should they wish to do so, with processes put in place to minimise the risk of transmission. 
cy-gb	Fodd bynnag, dylid hwyluso pethau er mwyn i alarwyr sy’n hunanynysu am 14 o ddiwrnodau am fod rhywun ar yr aelwyd yn anhwylus â symptomau’r coronafeirws (COVID-19), ond nad oes ganddynt hwy eu hunain symptomau, allu mynd i’r angladd os ydynt yn dymuno gwneud hynny, a dylid rhoi prosesau ar waith i leihau’r risg o drosglwyddo’r haint. 

en-gb	Mourners who are from a household that is self-isolating should: not attend if they have any symptoms of any kind, even if these are very mild
cy-gb	Dylai galarwyr o aelwyd sy’n hunanynysu wneud y canlynol:  peidio â mynd i’r angladd os oes ganddynt symptomau o unrhyw fath, hyd yn oed os yw’r symptomau’n rhai ysgafn iawn

en-gb	 maintain a distance of at least 2 metres between themselves and others
cy-gb	 cadw pellter o 2 fetr o leiaf oddi wrth eraill

en-gb	 advise the other mourners that they are otherwise self-isolating at home, and ensure that they do not attend at the same time as another mourner who may be extremely vulnerable
cy-gb	 dweud wrth y galarwyr eraill eu bod fel arall yn hunanynysu gartref, a sicrhau nad ydynt yn bresennol ar yr un pryd â galarwr arall a allai fod yn eithriadol o agored i niwed

en-gb	 practise careful hand and respiratory hygiene:  wash their hands more often - with soap and hot water for at least 20 seconds or using a hand sanitiser.
cy-gb	 rhoi sylw gofalus i hylendid eu dwylo a’u hylendid anadlol:  golchi eu dwylo’n amlach – gyda sebon a dŵr poeth am o leiaf 20 eiliad neu gan ddefnyddio hylif diheintio dwylo

en-gb	 avoid touching their eyes, nose, and mouth 
cy-gb	 osgoi cyffwrdd eu llygaid, eu trwyn a’u ceg

en-gb	 covering their cough or sneeze with a tissue, then throwing the tissue in a bin
cy-gb	 defnyddio hances pan fyddant yn pesychu neu’n tisian, ac yna roi’r hances mewn bin

en-gb	 use their own transport where possible.
cy-gb	 defnyddio’u cludiant eu hunain pan fo hynny’n bosibl.

en-gb	 Mourners who are extremely vulnerable or in a shielded group should also be facilitated to attend, with processes put in place to minimise the risk of transmission.
cy-gb	 Dylid hwyluso pethau er mwyn i alarwyr sy’n eithriadol o agored i niwed neu sydd mewn grŵp a warchodir allu mynd i’r angladd hefyd, a dylid rhoi prosesau ar waith i leihau’r risg o drosglwyddo’r haint.

en-gb	 Mourners who are in an extremely vulnerable group have been advised that they should minimise their contact with others for their personal protection. 
cy-gb	Mae galarwyr sydd mewn grŵp eithriadol o agored i niwed wedi cael cyngor i gael cyn lleied â phosibl o gyswllt ag eraill er mwyn eu gwarchod eu hunain. 

en-gb	However, they may decide to attend a funeral despite the additional risk this poses to them and should be facilitated to do so.
cy-gb	Fodd bynnag, efallai y byddant yn penderfynu mynd i angladd er gwaetha’r risg ychwanegol a dylid hwyluso pethau er mwyn iddynt allu gwneud hynny.

en-gb	 They are not advised to attend a funeral if there are others attending who are self-isolating due to another member of the household being unwell with symptoms of coronavirus, as they could be incubating disease. 
cy-gb	Fe’u cynghorir i beidio â mynd i angladd os bydd pobl eraill yno sy’n hunanynysu am fod rhywun arall ar yr un aelwyd yn anhwylus â symptomau’r coronafeirws, oherwydd gallent fod yn meithrin yr haint. 

en-gb	Mourners who are extremely vulnerable should follow the general social distancing advice and should maintain a distance of 2 metres away from others as a minimum.
cy-gb	Dylai galarwyr sy’n eithriadol o agored i niwed ddilyn y cyngor cyffredinol ynghylch cadw pellter cymdeithasol a chadw pellter o 2 fetr o leiaf oddi wrth eraill.

en-gb	 Actions to reduce their risk of infection could include:
cy-gb	Gallai camau i leihau’r risg o gael eu heintio gynnwys:

en-gb	 The person responsible for arranging the funeral advising other attendees that there is an extremely vulnerable person attending and reiterating the need to stay at home if they are unwell, and to be respectful of the vulnerable person’s need to avoid close contact at any point
cy-gb	 bod y sawl sy’n trefnu’r angladd yn rhoi gwybod i bobl eraill sy’n dod i’r angladd y bydd unigolyn eithriadol o agored i niwed yn bresennol ac yn pwysleisio’r angen i bobl aros gartref os ydynt yn teimlo’n sâl, a pharchu angen y sawl sy’n agored i niwed i osgoi cyswllt agos ar unrhyw adeg 

en-gb	 advising the mourner to travel to the venue via the safest route possible,preferably in a car by themselves, or with someone from their household
cy-gb	 cynghori’r galarwyr i ddefnyddio’r llwybr mwyaf diogel posibl i deithio i’r angladd, a gorau oll os ydynt yn teithio mewn car ar eu pen eu hunain, neu gyda rhywun sy’n byw ar yr un aelwyd

en-gb	 considering the additional risk involved if attending the funeral requires travelling by public transport
cy-gb	 ystyried y risg ychwanegol sy’n deillio o orfod defnyddio trafnidiaeth gyhoeddus i ddod i’r angladd

en-gb	 ensuring that mourners who are in an extremely vulnerable group do not attend the same ceremony as mourners who are in household isolation
cy-gb	 sicrhau nad yw galarwyr sydd mewn grŵp eithriadol o agored i niwed yn bresennol yn yr un seremoni â galarwyr y mae eu haelwyd yn hunanynysu

en-gb	 Mourners who are vulnerable or extremely vulnerable should adhere to rigorous hand and respiratory hygiene at all times but particularly whilst out of the home environment. 
cy-gb	 Dylai galarwyr sy’n agored i niwed neu sy’n eithriadol o agored i niwed roi sylw gofalus i hylendid eu dwylo a’u hylendid anadlol bob amser ond yn arbennig felly tra byddant oddi cartref. 

en-gb	Hand sanitiser or sanitising wipes should be used regularly whilst outside of the home.
cy-gb	Dylid defnyddio hylif diheintio dwylo neu glytiau diheintio’n rheolaidd y tu allan i’r cartref.

en-gb	Personal care of deceased people
cy-gb	Gofal personol i’r ymadawedig

en-gb	 Mourners are advised not to take part in rituals or practices that bring them into close contact with the deceased. 
cy-gb	Cynghorir galarwyr i beidio â chymryd rhan mewn defodau neu arferion sy’n golygu dod i gysylltiad agos â’r ymadawedig. 

en-gb	Where there are aspects of faith which include close contact with the deceased that contact should be restricted to those who are wearing Personal Protective Equipment (PPE) under the supervision of someone who is trained in appropriate use of PPE. 
cy-gb	Pan fo agweddau ar eu ffydd sy’n cynnwys cyswllt agos â’r ymadawedig dylid cyfyngu’r cyswllt hwnnw i’r rhai sy’n gwisgo Cyfarpar Diogelu Personol (PPE) dan oruchwyliaeth rhywun sydd wedi’i hyfforddi i ddefnyddio’r cyfarpar yn briodol. 

en-gb	guidance on care of the deceased is available and should be followed, regardless of the setting in which personal care of the deceased is provided.
cy-gb	Mae canllawiau manwl ar gael ynghylch gofalu am yr ymadawedig a dylid dilyn y canllawiau hynny, ni waeth ble y mae’r gofal personol hwnnw i’r ymadawedig yn cael ei ddarparu.

en-gb	 Given the very significant risk for vulnerable and extremely vulnerable people who come into contact with coronavirus (COVID-19), it is strongly advised that they have no contact with the body of the deceased. 
cy-gb	Oherwydd bod risg sylweddol iawn i bobl agored i niwed a phobl eithriadol o agored i niwed sy’n dod i gysylltiad â’r coronafeirws (COVID-19), fe’u cynghorir yn gryf i beidio â chael dim cyswllt â chorff yr ymadawedig. 

en-gb	This includes washing, preparing or dressing the body.
cy-gb	Mae hyn yn cynnwys golchi, paratoi a gwisgo’r corff.

en-gb	 The restrictions imposed on funerals may be upsetting to those close to the deceased at a very distressing time. 
cy-gb	Gall y cyfyngiadau a osodir ar angladdau fod yn annifyr i'r rheini sy'n agos at yr ymadawedig ar adeg drist ac anodd iawn. 

en-gb	Attending funerals, often in great numbers, is an important part of Welsh culture. 
cy-gb	Mae mynd i angladdau, mewn niferoedd mawr yn aml, yn rhan bwysig o ddiwylliant Cymru. 

en-gb	Those closest to the deceased take consolation from friends and family attending the funeral of their loved one. 
cy-gb	Mae'r rheini sydd agosaf at yr ymadawedig yn cymryd cysur gan ffrindiau a theulu yn mynd i angladd eu hanwyliad. 

en-gb	This will not be possible during the public health emergency, but solace may be achieved in other ways.
cy-gb	Ni fydd hyn yn bosibl yn ystod argyfwng iechyd y cyhoedd, ond gellir cael cysur mewn ffyrdd eraill.

en-gb	 Provision has been made in the Regulations to allow funerals to be broadcast online, and those who wish to do this should be helped to do so. 
cy-gb	Mae darpariaeth wedi ei gwneud yn y Rheoliadau i ganiatáu i angladdau gael eu darlledu ar lein, a dylai'r rheini sy'n dymuno gwneud hynny gael eu helpu i wneud hynny. 

en-gb	Similarly those organising a funeral should be encouraged to open books of condolence and collections online, or to facilitate tributes to be paid by electronic communications or on social media. 
cy-gb	Yn yr un modd, dylid annog y rheini sy'n trefnu angladd i agor llyfrau cydymdeimlo a chasgliadau ar lein, neu i hwyluso talu teyrngedau drwy gyfathrebu electronig neu ar y cyfryngau cymdeithasol. 

en-gb	Alternatively, or in addition, they could also be encouraged to arrange a memorial service or celebration of life for the deceased after the public health emergency has come to an end.
cy-gb	Fel arall, neu yn ogystal, gellid eu hannog i drefnu gwasanaeth coffa neu ddathliad o fywyd i'r ymadawedig ar ôl i argyfwng iechyd y cyhoedd ddod i ben.

en-gb	7
cy-gb	7

en-gb	Annex
cy-gb	Atodiad

en-gb	Guidance to members of the public on the impact of coronavirus restrictions on funerals
cy-gb	Canllawiau i aelodau’r cyhoedd ar effaith cyfyngiadau coronafeirws ar angladdau

en-gb	Funerals can be a distressing experience, and the impact of coronavirus is making it even more difficult to make practical arrangements. 
cy-gb	Gall angladdau fod yn brofiad gofidus, ac mae effaith coronafeirws yn ei gwneud yn anoddach fyth i wneud trefniadau ymarferol. 

en-gb	This guidance has been prepared to help people at this very difficult time.
cy-gb	Mae'r canllawiau hyn wedi'u paratoi i helpu pobl yn ystod y cyfnod anodd hwn.

en-gb	The Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020 place new, temporary restrictions on gatherings and the movement of people in Wales. 
cy-gb	Mae Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020 yn gosod cyfyngiadau newydd, dros dro ar gynulliadau a symudiadau gan bobl yng Nghymru. 

en-gb	This has been done to reduce the spread of coronavirus, save lives and protect the Welsh NHS. 
cy-gb	Mae hyn wedi ei wneud i leihau lledaeniad y coronafeirws, achub bywydau a diogelu GIG Cymru. 

en-gb	The new regulations require people to stay at home.
cy-gb	Mae’r rheoliadau newydd yn ei gwneud yn ofynnol i bobl aros gartref.

en-gb	They do allow people to leave home to attend a funeral if:
cy-gb	Maent yn caniatáu i bobl adael y cartref i fynd i angladd:

en-gb	 you are the person organising the funeral, 
cy-gb	 os chi yw’r person sy’n trefnu’r angladd,

en-gb	 you have been invited to the funeral, or
cy-gb	 os ydych wedi cael gwahoddiad i’r angladd, neu

en-gb	 you are the carer of a person who is attending the funeral (either because they
cy-gb	 os ydych yn ofalwr person sy’n mynd i’r angladd (naill ai am mai ef sy’n trefnu’r

en-gb	are the organiser or they have been invited).
cy-gb	angladd neu am ei fod wedi cael gwahoddiad).

en-gb	Everyone attending a funeral – whether at a crematorium, place of worship or cemetery – should take all reasonable measures to stay 2 metres away from someone they don’t live with or care for. 
cy-gb	Dylai pawb sy’n mynd i angladd – boed mewn amlosgfa, man addoli neu fynwent – gymryd pob cam rhesymol i aros 2 fetr i ffwrdd oddi wrth rywun nad yw’n byw gydag ef neu nad yw'n gofalu amdano. 

en-gb	This will help to reduce the spread of coronavirus.
cy-gb	Bydd hyn yn helpu i leihau lledaeniad y coronafeirws.

en-gb	Those responsible for running the crematorium, place of worship or cemetery will make arrangements to maintain this 2 metre rule.
cy-gb	Bydd y rheini sy’n gyfrifol am gynnal yr amlosgfa, y man addoli neu’r fynwent yn gwneud trefniadau i sicrhau y cedwir at y rheol 2 fetr hon.

en-gb	The need to maintain 2 metres between people means the number of people who will be able to attend a funeral will be limited.
cy-gb	Mae’r angen i gynnal 2 fetr rhwng pobl yn golygu mai cyfyngedig fydd nifer y bobl a fydd yn gallu mynd i angladd.

en-gb	The maximum number who will be able to attend a funeral will be clearly communicated to you before the funeral takes place. 
cy-gb	Byddwch chi’n cael gwybod yn glir am uchafswm nifer y bobl a fydd yn gallu mynd i angladd cyn i’r angladd gael ei gynnal. 

en-gb	To help protect against the spread of coronavirus, please could funerals be by invitation only.
cy-gb	Er mwyn diogelu rhag lledaeniad y coronafeirws, dim ond drwy wahoddiad y gofynnir ichi drefnu angladdau.

en-gb	The death of anyone close to you is a very distressing and sad event. 
cy-gb	Mae colli unrhyw un sy’n agos atoch yn beth anodd a thrist iawn. 

en-gb	But at this time, we ask you to only attend funerals of your closest family and friends and only if you have been invited. 
cy-gb	Ond ar yr adeg hon, gofynnwn mai dim ond i angladdau eich teulu a’ch ffrindiau agosaf yr ydych yn mynd a dim ond os ydych wedi cael gwahoddiad. 

en-gb	Please do not attend a funeral if it would involve extensive travel.
cy-gb	Peidiwch â mynd i angladd os byddai gwneud hynny yn golygu llawer o deithio.

en-gb	If you have symptoms of coronavirus – a high temperature or a new, persistent cough– you should not attend. 
cy-gb	Os oes gennych symptomau’r coronafeirws – tymheredd uchel neu beswch newydd sy’n para – ni ddylech fynd. 

en-gb	If you are self-isolating you should not attend due to a possible case of coronavirus in your household you can attend if you take steps to minimise the risk of transmission. 
cy-gb	Os ydych yn hunanynysu oherwydd bod achos posibl o’r coronafeirws ar eich aelwyd cewch fynd os cymerwch gamau i leihau’r risg odrosglwyddo’r haint. 

en-gb	If you are extremely vulnerable or in a shielded group you should also be helped to attend, if you wish to. 
cy-gb	Os ydych yn eithriadol o agored i niwed neu mewn grŵp a warchodir dylech hefyd gael help i fynd os ydych yn dymuno gwneud hynny.

en-gb	Funerals can be broadcast and livestreamed so people who cannot be physically present can attend the ceremony virtually. 
cy-gb	Gall angladdau gael eu darlledu arlein a’u ffrydio’n fyw fel y gall pobl nad ydynt yn gallu bod yn bresennol yn gorfforol fynd i’r angladd yn rhithwir. 

en-gb	In addition, books of condolence can be opened online and other tributes paid through electronic communications or social media.
cy-gb	Yn ogystal, gellir agor llyfrau cydymdeimlad arlein a thalu teyrngedau eraill drwy gyfathrebu electronig neu’r cyfryngau cymdeithasol.

en-gb	Family and friends may also want to consider holding a memorial service or celebration of life once the coronavirus pandemic is over.
cy-gb	Efallai y bydd teulu a ffrindiau yn dymuno ystyried hefyd gynnal gwasanaeth coffa neu ddathliad o fywyd pan fydd pandemig y coronafeirws wedi dod i ben.

en-gb	8
cy-gb	8

en-gb	It is important that you do not delay the funeral of your loved one. 
cy-gb	Mae’n bwysig peidio â gohirio angladd eich anwyliad. 

en-gb	We understand how difficult this will be for their families and friends, however the current guidance will be in place for the foreseeable future for the safety of the public and to ensure that funeral directors, crematoriums and burial grounds can continue to offer as normal a service as possible .
cy-gb	Rydym yn deall pa mor anodd y bydd hyn i’w teuluoedd a’u ffrindiau, ond bydd y canllawiau hyn ar waith hyd y gellir rhagweld er mwyn sicrhau diogelwch y cyhoedd ac er mwyn sicrhau y gall trefnwyr angladdau, amlosgfeydd a chladdfeydd barhau i gynnig gwasanaeth sydd mor normalâ phosibl.

en-gb	9
cy-gb	9

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	Regulations made by the Welsh Ministers, laid before Senedd Cymru under section 45R of the Public Health (Control of Disease) Act 1984 (c. 22) , for approval by resolution of Senedd Cymru within twenty-eight days beginning with the day on which the instrument is made, subject to extension for periods of dissolution or recess for more than four days.
cy-gb	Rheoliadau a wnaed gan Weinidogion Cymru, a osodwyd gerbron Senedd Cymru o dan adran 45R o Ddeddf Iechyd y Cyhoedd (Rheoli Clefydau) 1984 (p. 22), i’w cymeradwyo drwy benderfyniad gan Senedd Cymru o fewn wyth niwrnod ar hugain gan ddechrau â’r diwrnod y gwneir yr offeryn, yn ddarostyngedig i’w estyn dros gyfnodau o ddiddymu neu doriad am fwy na phedwar diwrnod.

en-gb	WELSH STATUTORY INSTRUMENTS
cy-gb	OFFERYNNAU STATUDOL CYMRU

en-gb	2020 No. 497 (W. 
cy-gb	2020 Rhif 497 (Cy. 

en-gb	118)
cy-gb	118)

en-gb	PUBLIC HEALTH, WALES
cy-gb	IECHYD Y CYHOEDD, CYMRU

en-gb	The Health Protection (Coronavirus Restrictions) (Wales) (Amendment) (No. 3) Regulations 2020
cy-gb	Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) (Diwygio) (Rhif 3) 2020

en-gb	Made - - - -Laid before Senedd CymruComing into force - -
cy-gb	Gwnaed - - - - Gosodwyd gerbron Senedd Cymru - - - -Yn dod i rym - -

en-gb	at 2.00 p.m. on 11 May 2020
cy-gb	am 2.00 p.m. ar 11 Mai 2020

en-gb	at 3.00 p.m. on 11 May 2020
cy-gb	am 3.00 p.m. ar 11 Mai 2020

en-gb	at 4.00 p.m. on 11 May 2020
cy-gb	am 4.00 p.m. ar 11 Mai 2020

en-gb	The Welsh Ministers make the following Regulations in exercise of the powers conferred by sections 45C(1) and (3)(c), 45F(2) and 45P of the Public Health (Control of Disease) Act 1984( 1 ).
cy-gb	Mae Gweinidogion Cymru yn gwneud y Rheoliadau a ganlyn drwy arfer y pwerau a roddir gan adrannau 45C(1) a (3)(c), 45F(2) a 45P o Ddeddf Iechyd y Cyhoedd (Rheoli Clefydau) 1984( 1 ). 

en-gb	These Regulations are made in response to the serious and imminent threat to public health which is posed by the incidence and spread of severe acute respiratory syndrome coronavirus 2 (SARS- CoV-2) in Wales.
cy-gb	Mae’r Rheoliadau hyn wedi eu gwneud mewn ymateb i’r bygythiad difrifol ac uniongyrchol i iechyd a cyhoedd a berir gan fynychder a lledaeniad syndrom anadlol acíwt difrifol coronafeirws 2 (SARS- CoV-2) yng Nghymru.

en-gb	The Welsh Ministers consider that the amendments made by these Regulations are proportionate to what they seek to achieve, which is a public health response to that threat.
cy-gb	Mae Gweinidogion Cymru yn ystyried bod y diwygiadau a wneir gan y Rheoliadau hyn yn gymesurâ’r hyn y maent yn ceisio ei gyflawni, sef ymateb iechyd y cyhoedd i’r bygythiad hwnnw.

en-gb	In accordance with section 45R of that Act the Welsh Ministers are of the opinion that, by reason of urgency, it is necessary to make this instrument without a draft having been laid before, and approved by a resolution of, Senedd Cymru.
cy-gb	Yn unol ag adran 45R o’r Ddeddf honno, oherwydd brys, mae Gweinidogion Cymru o’r farn ei bod yn angenrheidiol gwneud y offeryn hwn heb fod drafft wedi ei osod gerbron Senedd Cymru ac wedi ei gymeradwyo ganddi drwy benderfyniad.

en-gb	Title and coming into force
cy-gb	Enwi a dod i rym

en-gb	The title of these Regulations is the Health Protection (Coronavirus Restrictions) (Wales) (Amendment) (No. 3) Regulations 2020 and they come into force at 4.00 p.m. on 11 May 2020.
cy-gb	Enw’r Rheoliadau hyn yw Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) (Diwygio) (Rhif 3) 2020 a deuant i rym am 4.00 p.m. ar 11 Mai 2020.

en-gb	( 1 ) 1984 c. 22 . Sections 45C, 45F and 45P were inserted by section 129 of the Health and Social Care Act 2008 (c. 14) . 
cy-gb	( 1 ) 1984 p. 22 . Mewnosodwyd adrannau 45C, 45F a 45P gan adran 129 o Ddeddf Iechyd a Gofal Cymdeithasol (p. 14). 

en-gb	 The functions under these sections are conferred on “the appropriate Minister”. Under section 45T(6) of the 1984 Act the appropriate Minister, as respects Wales, is the Welsh Ministers.
cy-gb	Mae’r swyddogaethau o dan yr adrannau hyn wedi eu rhoi i “the appropriate Minister” (“y Gweinidog priodol”) O dan adran 45T(6) o Ddeddf 1984, y Gweinidog priodol, o ran Cymru, yw Gweinidogion Cymru.

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-12 Status: 
cy-gb	2020-05-12 Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This item of legislation is currently only available in its original format.
cy-gb	This item of legislation is currently only available in its original format.

en-gb	Amendment of the Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020
cy-gb	Diwygio Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020

en-gb	—(1) The Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020( 2 ) are amended as follows.
cy-gb	—(1) Mae Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020( 2 ) wedi eu diwygio fel a ganlyn.

en-gb	(2) In regulation 3—
cy-gb	(2) Yn rheoliad 3—

en-gb	(a) in paragraph (2), after “Regulations” insert “, and whether those restrictions and requirements are proportionate to what the Welsh Ministers seek to achieve by them,”;
cy-gb	(a) ym mharagraff (2), ar ôl “y Rheoliadau hyn” mewnosoder “, a pha un a yw’r cyfyngiadau a’r gofynion hynny yn gymesur â’r hyn y mae Gweinidogion Cymru yn ceisio ei gyflawni drwyddynt,”;

en-gb	(b) omit paragraphs (3), (4), (4A) and (5).
cy-gb	(b) hepgorer paragraffau (3), (4), (4A) a (5).

en-gb	(3) In regulation 4, in paragraph (5)(c), for “, gallery or library” substitute “or gallery”.
cy-gb	(3) Yn rheoliad 4, ym mharagraff (5)(c), yn lle “, oriel neu lyfrgell” rhodder “neu oriel”.

en-gb	(4) In regulation 8, in paragraph (2)—
cy-gb	(4) Yn rheoliad 8, ym mharagraff (2)—

en-gb	(a) after sub-paragraph (aa) insert—
cy-gb	(a) ar ôl is-baragraff (aa) mewnosoder—

en-gb	“(ab) to collect goods which have been purchased from a person providing a service in response to orders or enquiries by virtue of the exception to the requirement to cease carrying on a business in regulation 6(2)(a);”
cy-gb	“(ab) i gasglu nwyddau sydd wedi eu prynu oddi wrth berson sy’n darparu gwasanaeth mewn ymateb i archebion neu ymholiadau yn rhinwedd yr eithriad i’r gofyniad yn rheoliad 6(2)(a) i beidio â chynnal busnes;”

en-gb	(b) in sub-paragraph (b), for “no more than once a day (or more frequently if this is needed because of a particular health condition or disability)” substitute “within an area local to the place where the person is living”;
cy-gb	(b) yn is-baragraff (b), yn lle “ddim mwy nag unwaith y dydd (neu’n amlach os oes angen hyn oherwydd cyflwr iechyd neu anabledd penodol)” rhodder “o fewn ardal sy’n lleol i’r man lle y mae’r person yn byw”;

en-gb	(c) after sub-paragraph (i)—
cy-gb	(c) ar ôl is-baragraff (i)—

en-gb	“(ia) to access recycling or waste disposal services;
cy-gb	“(ia) i ddefnyddio gwasanaethau ailgylchu neu waredu gwastraff;

en-gb	(ib) to visit a library;”.
cy-gb	(ib) i ymweld â llyfrgell;”.

en-gb	(5) In Schedule 1—
cy-gb	(5) Yn Atodlen 1—

en-gb	(a) in paragraph 10, omit “, libraries”;
cy-gb	(a) ym mharagraff 10, hepgorer “, llyfrgelloedd”;

en-gb	(b) after paragraph 33 insert—
cy-gb	(b) ar ôl paragraff 33 mewnosoder—

en-gb	“ 33A. 
cy-gb	“ 33A. 

en-gb	Garden centres and plant nurseries.”;
cy-gb	Canolfannau garddio a meithrinfeydd planhigion.”;

en-gb	(c) after paragraph 47 insert—
cy-gb	(c) ar ôl paragraff 47 mewnosoder—

en-gb	“ 48. 
cy-gb	“ 48. 

en-gb	Libraries.”
cy-gb	Llyfrgelloedd.”

en-gb	Consequential amendment to the Health Protection (Coronavirus Restrictions) (Wales) (Amendment) (No. 2) Regulations 2020
cy-gb	Diwygiad canlyniadol i Reoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) (Diwygio) (Rhif 2) 2020

en-gb	 3. 
cy-gb	 3. 

en-gb	Omit regulation 2 of the Health Protection (Coronavirus Restrictions) (Wales) (Amendment) (No. 2) Regulations 2020( 3 ).
cy-gb	Hepgorer rheoliad 2 o Reoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) (Diwygio) (Rhif 2) 2020( 3 ).

en-gb	Saving for offences and penalties in relation to prior acts
cy-gb	Arbediad ar gyfer troseddau a chosbau mewn perthynas â gweithredoedd blaenorol

en-gb	 4. 
cy-gb	 4. 

en-gb	Regulations 12 and 13 of the Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020 continue to have effect in relation to any offence committed, or reasonably believed to have been committed, before these Regulations came into force as if the amendments set out in regulation 2 had not been made.
cy-gb	Mae rheoliadau 12 a 13 o Reoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020 yn parhau i gael effaith mewn perthynas ag unrhyw drosedd a gyflawnir, neu y credir yn rhesymol ei bod wedi ei chyflawni, cyn i’r Rheoliadau hyn ddod i rym fel pe na bai’r diwygiadau a nodir yn rheoliad 2 wedi eu gwneud.

en-gb	( 2 ) S.I. 2020/353 (W. 80) as am ended by the Health Protection (Coronavirus Restrictions) (Wales) (Amendment) Regulations
cy-gb	( 2 ) O.S. 2020/353 (Cy. 80) fel y’i diwygiwyd gan Reoliadau Diogelu Iechyd (Cyfyngiadau Coronafeiwrs) (Cymru) (Diwygio)

en-gb	2020 ( S.I. 2020/399 (W. 88) ) a nd the Health Protection (Coronavirus Restrictions) (Wales) (Amendment) (No. 2) Regulations 2020 ( S.I. 2020/452 (W. 102) ).
cy-gb	2020 ( O.S. 2020/399 (Cy. 88) ) a Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) (Diwygio) (Rhif 2) 2020 ( O.S. 2020/452 (Cy. 102) ).

en-gb	( 3 ) S.I. 2020/452 (W. 102) 
cy-gb	( 3 ) O.S. 2020/452 (Cy. 102) .

en-gb	2
cy-gb	2

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-12
cy-gb	2020-05-12

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	At 2.00 p.m. on 11 May 2020
cy-gb	Am 2.00 p.m. ar 11 Mai 2020

en-gb	Mark Drakeford
cy-gb	Mark Drakeford

en-gb	First Minister, one of the Welsh Ministers
cy-gb	Y Prif Weinidog, un o Weinidogion Cymru

en-gb	3
cy-gb	3

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-12 Status: 
cy-gb	2020-05-12 Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	EXPLANATORY NOTE
cy-gb	NODYN ESBONIADOL

en-gb	(This note is not part of the Regulations)
cy-gb	(Nid yw’r nodyn hwn yn rhan o’r Rheoliadau)

en-gb	 Part 2A of the Public Health (Control of Disease) Act 1984 enables the Welsh Ministers, by regulations, to make provision for the purpose of preventing, protecting against, controlling or providing a public health response to the incidence or spread of infection or contamination in Wales.
cy-gb	 Mae Rhan 2A o Ddeddf Iechyd y Cyhoedd (Rheoli Clefydau) 1984 yn galluogi Gweinidogion Cymru, drwy reoliadau, i wneud darpariaeth at ddiben atal, diogelu rhag, rheoli neu ddarparu ymateb iechyd y cyhoedd i fynychder neu ledaeniad haint neu halogiad yng Nghymru.

en-gb	 These Regulations are made in response to the serious and imminent threat to public health which is posed by the incidence and spread of severe acute respiratory syndrome coronavirus 2 (SARS- CoV-2) in Wales.
cy-gb	 Mae’r Rheoliadau hyn wedi eu gwneud mewn ymateb i’r bygythiad difrifol ac uniongyrchol i iechyd y cyhoedd a berir gan fynychder a lledaeniad coronafeirws syndrom anadlol acíwt difrifol 2 (SARS-CoV-2) yng Nghymru.

en-gb	 Regulation 2 of these Regulations amends the Health Protection (Coronavirus Restrictions) (Wales) Regulations 2020 (the “principal Regulations”).
cy-gb	 Mae Rheoliad 2 o’r Rheoliadau hyn yn diwygio Rheoliadau Diogelu Iechyd (Cyfyngiadau Coronafeirws) (Cymru) 2020 (y “prif Reoliadau”).

en-gb	These consist of—
cy-gb	Mae’r diwygiadau fel a ganlyn—

en-gb	(a) amending regulation 3 of the principal Regulations to add the proportionality of requirements and restrictions as a consideration when the Welsh Ministers review the principal regulations, and to remove provisions relating to the termination of requirements or restrictions by ministerial direction (which means they must be terminated by amending the principal Regulations);
cy-gb	(a) diwygio rheoliad 3 o’r prif Reoliadau i ychwanegu cymesuredd y gofynion a’r cyfyngiadau fel ystyriaeth pan fydd Gweinidogion Cymru yn adolygu’r prif Reoliadau, ac i ddileu darpariaethau sy’n ymwneud â therfynu gofynion neu gyfyngiadau drwy gyfarwyddyd gweinidogol (sy’n golygu bod rhaid eu terfynu drwy ddiwygio’r prif Reoliadau);

en-gb	(b) amending regulation 4 of, and Schedule 1 to, the principal Regulations to permit libraries to open subject to requirements to take all reasonable measures to ensure a distance of 2 metres is maintained by persons on the premises and persons waiting to enter the premises;
cy-gb	(b) diwygio rheoliad 4 o’r prif Reoliadau, ac Atodlen 1 iddynt, i ganiatáu i lyfrgelloedd agor yn ddarostyngedig i ofynion i gymryd pob mesur rhesymol i sicrhau y cynhelir pellter o 2 fetr gan bersonau yn y fangre a phersonau sy’n aros i fynd i’r fangre;

en-gb	(c) amending regulation 8 of the principal Regulations—
cy-gb	(c) diwygio rheoliad 8 o’r prif Reoliadau i wneud y canlynol—

en-gb	(i) to specify that leaving the place where you live to collect goods ordered from a shop operating on an “order and collect” basis constitutes a reasonable excuse for the purposes of regulation 8(1);
cy-gb	(i) pennu bod gadael y man lle yr ydych yn byw i gasglu nwyddau a archebir o siop sy’n gweithredu ar sail “archebu a chasglu” yn esgus rhesymol at ddibenion rheoliad 8(1);

en-gb	(ii) to remove the limitation in paragraph (2)(b) on exercising no more than once a day (as it relates to exercise being a reasonable excuse for the purposes of regulation 8(1));
cy-gb	(ii) dileu’r cyfyngiad ym mharagraff (2)(b) ar beidio â gwneud ymarfer corff fwy nag unwaith y dydd (fel y mae’n ymwneud ag ymarfer corff fel esgus rhesymol at ddibenion rheoliad 8(1));

en-gb	(iii) to specify that making use of a recycling or waste disposal facility, or visiting a library, constitutes a reasonable excuse for the purposes of regulation 8(1) (note however that this change does not require these facilities to open as that is a matter for local authorities);
cy-gb	(iii) pennu bod gwneud defnydd o gyfleuster ailgylchu neu waredu gwastraff neu ymweld â llyfrgell yn esgus rhesymol at ddibenion rheoliad 8(1) (sylwer, er hynny, nad yw’r newid hwn yn ei gwneud yn ofynnol i’r cyfleusterau hyn agor oherwydd mater i awdurdodau lleol yw hynny);

en-gb	(d) adding garden centres and plant nurseries to Part 4 of Schedule 1, which means that they may open subject to requirements to take all reasonable measures to ensure a distance of 2 metres is maintained by persons on the premises and persons waiting to enter the premises.
cy-gb	(d) ychwanegu canolfannau garddio a meithrinfeydd planhigion at Ran 4 o Atodlen 1 sy’n golygu y caniateir iddynt agor yn ddarostyngedig i ofynion i gymryd pob mesur rhesymol i sicrhau y cynhelir pellter o 2 fetr gan bersonau yn y fangre a phersonau sy’n aros i fynd i’r fangre.

en-gb	 The Welsh Ministers’ Code of Practice on the carrying out of Regulatory Impact Assessments was considered in relation to these Regulations. 
cy-gb	 Ystyriwyd Cod Ymarfer Gweinidogion Cymru ar gynnal Asesiadau Effaith Rheoleiddiol mewn perthynas â’r Rheoliadau hyn. 

en-gb	As a result, a regulatory impact assessment has not been prepared as to the likely cost and benefit of complying with these Regulations.
cy-gb	O ganlyniad, ni luniwyd asesiad effaith rheoleiddiol o’r costau a’r manteision sy’n debygol o ddeillio o gydymffurfio â’r Rheoliadau hyn.

en-gb	4
cy-gb	4

en-gb	S U B O R D I N A T E L E G I S L A T I O N
cy-gb	I S - D D E D D F W R I A E T H

en-gb	WG20-24
cy-gb	LlC20-24

en-gb	THE NATIONAL HEALTH SERVICE (WALES) ACT 2006
cy-gb	 DEDDF Y GWASANAETH IECHYD GWLADOL (CYMRU) 2006

en-gb	The National Health Service (Wales Eye Care Services payments during the COVID-19 Pandemic) (Wales) Directions 2020
cy-gb	Cyfarwyddydau’r Gwasanaeth Iechyd Gwladol (Taliadau Gwasanaethau Gofal Llygaid Cymru yn ystod y Pandemig COVID-19) (Cymru) 2020

en-gb	Made 22 May 2020
cy-gb	Gwnaed 22 Mai 2020

en-gb	Coming into force 23 May 2020
cy-gb	Yn dod i rym 23 Mai 2020

en-gb	The Welsh Ministers in exercise of the powers conferred on them by sections 13(2)(c) and 4(c), 203(9) and (10), and 204(1) of the National Health Service (Wales) Act 2006( 1 ) give the following Directions.
cy-gb	Mae Gweinidogion Cymru drwy arfer y pwerau a roddir iddynt gan adrannau 13(2)(c) a 4(c), 203(9) a (10), a 204(1) o Ddeddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006( 1 ) yn rhoi’r Cyfarwyddydau a ganlyn.

en-gb	Title, application and commencement
cy-gb	Enwi, cymhwyso a chychwyn

en-gb	 1. — (1) The title of these Directions is the National Health Service (Wales Eye Care Services payments during the COVID-19 Pandemic) (Wales) Directions
cy-gb	 1. — (1) Enw’r Cyfarwyddydau hyn yw Cyfarwyddydau’r Gwasanaeth Iechyd Gwladol (Taliadau Gwasanaethau Gofal Llygaid Cymru yn ystod y Pandemig COVID-19) (Cymru) 2020.

en-gb	 (2) These Directions are given to Local Health Boards.
cy-gb	(2) Mae’r Cyfarwyddydau hyn wedi eu rhoi i Fyrddau Iechyd Lleol.

en-gb	 (3) These Directions are made on 22 May 2020 and come into force on 23 May 2020.
cy-gb	(3) Mae’r Cyfarwyddydau hyn wedi eu gwneud ar 22 Mai 2020 a deuant i rym ar 23 Mai 2020.

en-gb	Interpretation
cy-gb	Dehongli

en-gb	In these Directions —
cy-gb	Yn y Cyfarwyddydau hyn —

en-gb	“financial year” (“ blwyddyn ariannol ”) means the period of one year beginning on 1 April and ending on 31 March;
cy-gb	ystyr “blwyddyn ariannol” (“ financial year ”) yw’r cyfnod o un flwyddyn sy’n dechrau ar 1 Ebrill ac yn dod i ben ar 31 Mawrth;

en-gb	 “Local Health Board” (“ Bwrdd Iechyd Lleol ”) means a Local Health Board established in accordance with section 11(2) of the National Health Service (Wales) Act 2006;
cy-gb	ystyr “Bwrdd Iechyd Lleol” (“ Local Health Board ”) yw Bwrdd Iechyd Lleol a sefydlwyd yn unol ag adran 11(2) o Ddeddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006;

en-gb	“Low Vision Service Wales” (“”) means the national Low Vision Service Wales which consists of arranging the provision of low vision assessments and rehabilitation support for clients and securing the provision of low vision aids to clients as provided for by the Low Vision Service Committee (Wales) Directions 2016;
cy-gb	ystyr “ Gwasanaeth Golwg Gwan Cymru” (“ Low Vision Service Wales ” ) yw ’r gwa sanaeth cenedlaethol a elwir Gwasanaeth Golwg Gwan Cymru sy’n trefnu’r ddarpariaeth o asesiadau golwg gwan a chymorth adsefydlu i gleientiaid ac yn sicrhau’r ddarpariaeth o gymhorthion golwg gwan i gleientiaid fel y darperir ar eu cyfer gan Gyfarwyddydau Pwyllgor y Gwasanaeth Golwg Gwan (Cymru) 2016;

en-gb	“EHEW” (“”) means Eye Health Examination Wales;
cy-gb	ystyr “AILlC” (“ EHEW ” ) yw Archwiliadau Iechyd Llygaid Cymru;

en-gb	“Eye Health Examination Wales” (“”) means the Eye Health Examination Wales Service which consists of arranging the provision of eye health examinations for clients who require such examination, the provision of advice for such clients and the onward referral to, and signposting of, further services to such clients as provided for by the Eye Health Examination Service Committee (Wales) Directions 2016;
cy-gb	ystyr “Gwasanaethau Gofal Llygaid Cymru” ( “ Wales Eye Care Services ” ) yw Archwiliadau Iechyd Llygaid Cymru a Gwasanaeth Golwg Gwan Cymru ac mae’ n cynnwys unrhyw ofal llygaid brys neu mewn argyfwng a ddarperir fel rhan o’r gwasanaethau hynny;

en-gb	“accredited practitioner” (“”) means a practitioner who satisfies all of the accreditation requirements set out —
cy-gb	ystyr “Bwrdd Iechyd Lleol cynhaliol perthnasol”(“ relevant host Local Health Board ”) yw —

en-gb	(a) for the purposes of Eye Health Examination Wales, Aneurin Bevan University Health Board, and
cy-gb	(a) at ddibenion Archwiliadau Iechyd Llygaid Cymru, Bwrdd Iechyd Prifysgol Aneurin Bevan, a

en-gb	(b) for the purposes of Low Vision Service Wales, Hywel Dda University Health Board;
cy-gb	(b) at ddibenion Gwasanaeth Golwg Gwan Cymru, Bwrdd Iechyd Prifysgol Hywel Dda;

en-gb	(a) for the purposes of Eye Health Examination Wales, in paragraph 9 of the Specification in the Schedule to the Eye Health Examination Service Committee (Wales) Directions 2016( 1 ), and
cy-gb	(a) at ddibenion Archwiliadau Iechyd Llygaid  Cymru, ym mharagraff 9 o’r Fanyleb yn yr  Atodlen i Gyfarwyddydau Pwyllgor y Gwasanaeth Archwiliadau Iechyd Llygaid (Cymru) 2016( 1 ), a

en-gb	(b) for the purposes of the Low Vision Service Wales, in paragraph 11 of the Specification in the Schedule to the Low Vision Service Committee (Wales) Directions 2016( 2 );
cy-gb	(b) at ddibenion Gwasanaeth Golwg Gwan Cymru, ym mharagraff 11 o’r Fanyleb yn yr Atodlen i Gyfarwyddydau Pwyllgor y Gwasanaeth Golwg Gwan (Cymru) 2016( 1 ).

en-gb	“LVSW” (“”) means Low V ision Service Wales; 
cy-gb	ystyr “GGGC” (“ LVSW ”) yw Gwasanaeth Golwg Gwan Cymru;

en-gb	“WECSAMP” (“”) means the Wales Eye Care Services Average Monthly Payment payable to an accredited practitioner for the provision of Wales Eye Care Services in accordance with these Directions.
cy-gb	ystyr “TMCGGLlC” (“ WECSAMP ”) yw’r Taliad Misol Cyfartalog Gwasanaethau Gofal Llygaid Cymru sy’n daladwy i ymarferydd achrededig am ddarparu Gwasanaethau Gofal Llygaid Cymru yn unol â’r Cyfarwyddydau hyn;

en-gb	Wales Eye Care Services Average Monthly Payments during the COVID-19 Pandemic
cy-gb	Taliadau Misol Cyfartalog Gwasanaethau Gofal Llygaid Cymru yn ystod y Pandemig COVID-19

en-gb	 3. — (1) A Wales Eye Care Services Average Monthly Payment, calculated in accordance with paragraph 4 or 5, is payable to an accredited practitioner for the provision of Wales Eye Care Services from 17 March 2020.
cy-gb	 3. — (1) Mae Taliad Misol Cyfartalog Gwasanaethau Gofal Llygaid Cymru, a gyfrifir yn unol â pharagraff 4 neu 5, yn daladwy i ymarferydd achrededig am ddarparu Gwasanaethau Gofal Llygaid Cymru o 17 Mawrth 2020 ymlaen.

en-gb	 (2) An accredited practitioner that provides any emergency or urgent eye care after 17 March 2020 will receive a payment of 25% of that accredited practitioner ’s calculated WECSAMP value, in addition to their WECSAMP.
cy-gb	 (2) Bydd ymarferydd achrededig sy’n darparu unrhyw ofal llygaid brys neu mewn argyfwng ar ôl 17 Mawrth 2020 yn cael taliad o 25% o werth TMCGGLlC a gyfrifir ar gyfer yr ymarferydd achrededig hwnnw, yn ogystal â’i TMCGGLlC.

en-gb	 (3) Payment of an accredited practitioner ’s WECSAMP will be made in monthly instalments, in arrears, on the fourteenth day of each calendar month.
cy-gb	 (3) Bydd TMCGGLlC ymarferydd achrededig yn cael ei dalu mewn ôl-daliadau misol, ar y pedwerydd diwrnod ar ddeg o bob mis calendr.

en-gb	Calculation of WECSAMP value for accredited practitioners with at least 3 years NHS claim history
cy-gb	Cyfrifo gwerth TMCGGLlC ar gyfer ymarferwyr achrededig a chanddynt o leiaf 3 blynedd o hanes o hawliadau GIG

en-gb	 4. — (1) An accredited practitioner who has made NHS claims for either LVSW or EHEW payments for a period of at least 3 years prior to the date of these Directions coming into force will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW the accredited practitioner made for each month during the 3 financial years prior to these Directions coming into force, as follows —
cy-gb	 4. — (1) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am naill ai taliadau GGGC neu daliadau AILlC am gyfnod o 3 blynedd o leiaf cyn y dyddiad y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefny ddio’r hawliadau GIG am GGGC ac AILlC a wnaeth yr ymarferydd achrededig ar gyfer pob mis yn ystod y 3 blynedd ariannol cyn y daw’r Cyfarwyddydau hyn i rym, fel a ganlyn —

en-gb	(a) the sum of the accredited practitioner’s claims for both LVSW and EHEW made for each calendar month during the financial years 2017-2018 ( FYC17 ), 2018-2019 ( FYC18 ) and 2019-2020 ( FYC19 ) divided by 36, and
cy-gb	(a) swm hawliadau’r ymarferydd achrededig am  GGGC ac AILlC a wnaed ar gyfer pob mis calendr yn ystod blynyddoedd ariannol 2017- 2018 ( HBA17 ), 2018-2019 ( HBA18 ) a 2019- 2020 ( HBA19 ) wedi ei rannu â 36, a

en-gb	(b) the WECSAMP value calculation for the purposes of this paragraph can be expressed as —
cy-gb	(b) gellir mynegi gwerth TMCGGLlC a gyfrifir at ddibenion y paragraff hwn fel a ganlyn —

en-gb	WECSAMP value =
cy-gb	Gwerth TMCGGLlC =

en-gb	(FYC17 + FYC18 + FYC19) ÷ 36.
cy-gb	(HBA17 + HBA18 + HBA19) ÷ 36.

en-gb	Calculation of WECSAMP value for accredited practitioners with less than 3 years NHS claim history
cy-gb	Cyfrifo gwerth TMCGGLlC ar gyfer ymarferwyr achrededig a chanddynt lai na 3 blynedd o hanes o hawliadau GIG

en-gb	 5. — (1) An accredited practitioner who has made NHS claims for LSVW or EHEW for a period of less than 3 years prior to the date of these Directions coming into force will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW in accordance with sub-paragraphs (2) to (5) as applicable.
cy-gb	 5. — (1) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am daliadau GGGC neu daliadau AILlC am gyfnod o lai na 3 blynedd cyn y dyddiad y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefnyddio’r hawliadau GIG am GGGC ac AILlC yn unol ag is-baragraffau (2) i (5) fel y b ônt yn gymwys.

en-gb	 (2) An accredited practitioner who has made NHS claims for a period in total of at least 12 months but not more than 36 months prior to these Directions coming into force, will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW the accredited practitioner made for each month during the financial year 2019-2020 as follows —
cy-gb	 (2) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am gyfnod cyfansymiol o 12 mis o leiaf ond dim mwy na 36 mis cyn y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefnyddio’r hawliadau GIG am GGGC ac AILlC a wnaeth yr ymarferydd achrededig ar gyfer pob mis yn ystod blwyddyn ariannol 2019- 2020 fel a ganlyn —

en-gb	(a) the sum of the accredited practitioner ’s claims  for LVSW and EHEW per month for the 12 months of April 2019 to March 2020 inclusive ( SMC ) divided by 12, and
cy-gb	(a) swm hawliadau ’ r ymarferydd achrededig am GGGC ac AILlC fesul mis ar gyfer y 12 mis o fis Ebrill 2019 i fis Mawrth 2020 yn gynhwysol ( SHM ) wedi ei rannu â 12, a

en-gb	(b) the WECSAMP value calculation for the purposes of this sub-paragraph can be expressed as —
cy-gb	(b) gellir mynegi gwerth TMCGGLlC a gyfrifir at ddibenion yr is-baragraff hwn fel a ganlyn —

en-gb	WECSAMP value = SMC ÷ 12.
cy-gb	Gwerth TMCGGLlC = SHM ÷ 12.

en-gb	 (3) An accredited practitioner who has made NHS claims for a period in total of at least 6 months but not more than 12 months prior to these Directions coming into force, will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW the accredited practitioner made for the final 6 months of the financial year 2019-2020 as follows —
cy-gb	 (3) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am gyfnod cyfansymiol o 6 mis o leiaf ond dim mwy na 12 mis cyn y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefnyddio’r hawliadau GIG am GGGC ac AILlC a wnaeth yr ymarferydd achrededig ar gyfer 6 mis olaf blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of the a ccredited practitioner’s claims  for LVSW and EHEW per month for the 6 months of October 2019 to March 2020 inclusive ( SMC ) divided by 6, and
cy-gb	(a) swm hawliadau ’ r ymarferydd achrededig am GGGC ac AILlC fesul mis ar gyfer 6 mis, sef mis Hydref 2019 i fis Mawrth 2020 yn gynhwysol ( SHM ) wedi ei rannu â 6, a

en-gb	(b) the WECSAMP value calculation for the purposes of this sub-paragraph can be expressed as —
cy-gb	(b) gellir mynegi gwerth TMCGGLlC a gyfrifir at ddibenion yr is-baragraff hwn fel a ganlyn —

en-gb	WECSAMP value = SMC ÷ 6.
cy-gb	Gwerth TMCGGLlC = SHM ÷ 6.

en-gb	 (4) An accredited practitioner who has made NHS claims for a period in total of at least 3 but not more than 6 months prior to these Directions coming into force, will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW the accredited practitioner made for the final 3 months of the financial year 2019-2020 as follows —
cy-gb	 (4) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am gyfnod cyfansymiol o 3 mis o leiaf ond dim mwy na 6 mis cyn y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefnyddio’r hawliadau GIG am GGGC ac AILlC a wnaeth yr ymarferydd achrededig ar gyfer 3 mis olaf blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) t he sum of the accredited practitioner’s claims  for LSVW and EHEW per month for the 3 months of January, February and March 2020 ( SMC) divided by 3, and
cy-gb	(a) swm hawliadau ’r ymarferydd achrededig am GGGC ac AILlC fesul mis ar gyfer 3 mis, sef mis Ionawr, mis Chwefror a mis Mawrth 2020 ( SHM) wedi ei rannu â 3, a

en-gb	(b) the WECSAMP value calculation for the purposes of this sub-paragraph can be expressed as —
cy-gb	(b) gellir mynegi gwerth TMCGGLlC a gyfrifir at ddibenion yr is-baragraff hwn fel a ganlyn —

en-gb	WECSAMP value = SMC ÷ 3 .
cy-gb	Gwerth TMCGGLlC = SHM ÷ 3.

en-gb	 (5) An accredited practitioner who has made NHS claims for a period in total of less than 3 months prior to these Directions coming into force, will have their WECSAMP value calculated using the NHS claims for LVSW and EHEW the accredited practitioner made for each month during the financial year 2019-2020 as follows —
cy-gb	 (5) Bydd gwerth TMCGGLlC ar gyfer ymarferydd achrededig sydd wedi gwneud hawliadau GIG am gyfnod cyfansymiol o lai na 3 mis cyn y daw’r Cyfarwyddydau hyn i rym yn cael ei gyfrifo drwy ddefnyddio’r hawliadau GIG am GGGC ac AILlC a wnaeth yr ymarferydd achrededig ar gyfer pob mis yn ystod blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of the accredited practitioner’s claims  for LVSW and EHEW per month ( SMC ) divided by the number of months claims for which were submitted ( NMC) , and
cy-gb	(a) swm hawliadau ’r ymarferydd achrededig am GGGC ac AILlC fesul mis ( SHM ) wedi ei rannu â nifer y misoedd y cyflwynwyd hawliadau ar eu cyfer ( NHM ), a

en-gb	(b) the WECSAMP value calculation for the purposes of this sub-paragraph can be expressed as —
cy-gb	(b) gellir mynegi gwerth TMCGGLlC a gyfrifir at ddibenion yr is-baragraff hwn fel a ganlyn —

en-gb	WECSAMP value = SMC ÷ NMC.
cy-gb	Gwerth TMCGGLlC = SHM ÷ NHM.

en-gb	Conditions attached to Wales Eye Care Services Average Monthly Payments
cy-gb	Amodau sydd ynghlwm wrth Daliadau Misol Cyfartalog Gwasanaethau Gofal Llygaid Cymru

en-gb	 6. 
cy-gb	 6. 

en-gb	The WECSAMP, or any part thereof, is only payable if the accredited practitioner satisfies the following conditions —
cy-gb	Nid yw TMCGGLlC, neu unrhyw rhan ohono, ond yn daladwy os yw’r ymarferydd achrededig yn bodloni’r amodau a ganlyn —

en-gb	(a) the accredited practitioner must make available to the relevant host Local Health Board any information which the relevant host Local Health Board does not have but needs, and the accredited practitioner either has or could reasonably be expected to obtain, in order to calculate the accredited practitioner ’s WECSAMP,
cy-gb	(a) rhaid i’r ymarferydd achrededig roi ar gael i’r  Bwrdd Iechyd Lleol cynhaliol perthnasol unrhyw wybodaeth nad oes gan y Bwrdd Iechyd Lleol cynhaliol perthnasol ond y mae ei hangen arno, ac sydd naill ai gan yr ymarferydd achrededig neu y gellid disgwyl yn rhesymol iddo gael gafael arni, er mwyn cyfrifo TMCGGLlC yr ymarferydd achrededig,

en-gb	(b) the accredited practitioner must maintain accurate records of all Wales Eye Care Services activity undertaken, including emergency and urgent eye care, and
cy-gb	(b) rhaid i’r ymarferydd achrededig gynnal cofnodion cywir o holl weithgarwch Gwasanaethau Gofal Llygaid Cymru yr ymgymerir ag ef, gan gynnwys gofal llygaid brys ac mewn argyfwng, ac

en-gb	(c) all information supplied by the accredited practitioner to the relevant host Local Health Board pursuant to or in accordance with this paragraph must be accurate to the accredited practitioner ’s best knowledge and belief.
cy-gb	(c) rhaid i’r holl wybodaeth a roddir gan yr ymarferydd achrededig i’r Bwrdd Iechyd Lleol cynhaliol perthnasol yn unol â’r  paragraff hwn fod yn gywir hyd eithaf gwybodaeth a chred yr ymarferydd achrededig.

en-gb	 7. 
cy-gb	 7. 

en-gb	If the accredited practitioner breaches any of the conditions in paragraph 6, the relevant host Local Health Board may in appropriate circumstances, withhold payment of, or any part of, a WECSAMP that is otherwise payable.
cy-gb	Os yw’r ymarferydd achrededig yn torri unrhyw un neu ragor o’r amodau ym mharagraff 6, caiff y Bwrdd Iechyd Lleol cynhaliol perthnasol, o dan amgylchiadau priodol, gadw’n ôl TMCGGLlC, neu unrhyw ran ohono, sydd fel arall yn daladwy.

en-gb	Amendment to the Eye Health Examination Service Committee (Wales) Directions 2016
cy-gb	Diwygiad i Gyfarwyddydau Pwyllgor y Gwasanaeth Archwiliadau Iechyd Llygaid (Cymru) 2016

en-gb	 8. 
cy-gb	 8. 

en-gb	In paragraph 5 of Schedule 1 to the Eye Health Examination Service Committee (Wales) Directions 2016 —
cy-gb	Ym mharagraff 5 o Atodlen 1 i Gyfarwyddydau Pwyllgor y Gwasanaeth Archwiliadau Iechyd Llygaid (Cymru) 2016 —

en-gb	(a) for paragraph 5.1 substitute —
cy-gb	(a) yn lle paragraff 5.1 rhodder —

en-gb	 “ 5.1 Having carried out an eye health examination of a client, an accredited practitioner must send the record of examination (Wales Eye Care Service Form (WECS1)) to the SSP within a period of 4 weeks, beginning with the date on which the examination was completed. ” , and
cy-gb	 “ 5.1 Having carried out an eye health examination of a client, an accredited practitioner must send the record of examination(Wales Eye Care Service Form (WECS1)) to the SSP within a period of 4 weeks, beginning with the date on which the examination was completed. ” , a

en-gb	(b) after paragraph 5.1 insert —
cy-gb	(b) ar ôl paragraff 5.1 mewnosoder —

en-gb	 “ 5.1A Accredited practitioners will be reimbursed for their provision of EHEW in accordance with the National Health Service (Wales Eye Care Services payments during theCOVID-19 Pandemic) (Wales) Directions 2020. 
cy-gb	 “ 5.1A Accredited practitioners will be reimbursed for their provision of EHEW in accordance with the National Health Service (Wales Eye Care Services payments during the COVID-19 Pandemic) (Wales) Directions 2020. 

en-gb	Amendment to the Low Vision Service Wales Committee (Wales) Directions 2016
cy-gb	Diwygiad i Gyfarwyddydau Pwyllgor y Gwasanaeth Golwg Gwan (Cymru) 2016

en-gb	 9. 
cy-gb	 9. 

en-gb	In paragraph 7 of Schedule 1 to the Low Vision Service Committee (Wales) Directions 2016 —
cy-gb	Ym mharagraff 7 o Atodlen 1 i Gyfarwyddydau Pwyllgor y Gwasanaeth Golwg Gwan (Cymru) 2016 —

en-gb	(a) for paragraph 7.1 substitute —
cy-gb	(a) yn lle paragraff 7.1 rhodder —

en-gb	 “ 7.1 Having carried out a low vision assessment of a client, an accredited practitioner must send the record of assessment to the host LHB within a period of 4 weeks, beginning with the date on which the assessment was completed. ” , and
cy-gb	 “ 7.1 Having carried out a low vision assessment of a client, an accredited practitioner must send the record of assessment to the host LHB within a period of 4 weeks, beginning with the date on which the assessment was completed. ” , a

en-gb	(b) after paragraph 7.1 insert —
cy-gb	(b) ar ôl paragraff 7.1 mewnosoder —

en-gb	 “ 7.1A Accredited practitioners will be reimbursed for their provision of LVSW in accordance with the National Health Service (Wales Eye Care Services payments during the COVID-19 Pandemic) (Wales) Directions 2020. 
cy-gb	 “ 7.1A Accredited practitioners will be reimbursed for their provision of LVSW in accordance with the National Health Service (Wales Eye Care Services payments during the COVID-19 Pandemic) (Wales) Directions 2020. 

en-gb	Signed by Alex Slade, Deputy Director, Primary Care Division, under the authority of the Minister for Health and Social Services, one of the Welsh Ministers
cy-gb	Llofnodwyd gan Alex Slade, Dirprwy Gyfarwyddwr, yr Is-adran Gofal Sylfaenol, o dan awdurdod y Gweinidog Iechyd a Gwasanaethau Cymdeithasol, un o Weinidogion Cymru

en-gb	Dated: 
cy-gb	Dyddiad: 

en-gb	22 May 2020
cy-gb	22 Mai 2020

en-gb	6
cy-gb	6

en-gb	STATEMENT OF GENERAL OPHTHALMIC SERVICES REMUNERATION (COVID-19 Average Monthly Payment)
cy-gb	DATGANIAD O DÂL AM WASANAETHAU OFFTHALMIG CYFFREDINOL (Taliad Misol Cyfartalog yn sgil COVID-19)

en-gb	The Welsh Ministers, in exercise of powers conferred by sections 76 and 77 of the National Health Service (Wales) Act 2006( 1 ) and regulation 10 of the National Health Service (General Ophthalmic Services) Regulations 1986( 2 ), after consultation with the organisation recognised by them as representing contractors providing general ophthalmic services, make the following determination.
cy-gb	Mae Gweinidogion Cymru, drwy arfer y pwerau a roddir gan adrannau 76 a 77 o Ddeddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006( 1 ) a rheoliad 10 o Reoliadau’r Gwasanaeth Iechyd Gwladol (Gwasanaethau Offthalmig Cyffredinol) 1986( 2 ), ar ôl ymgynghori â'r sefydliad a gydnabyddir ganddynt fel un sy’n cynrychioli contractwyr sy’n darparu gwasanaethau o ffthalmig cyffredinol, yn gwneud y penderfyniad a ganlyn.

en-gb	Part 1
cy-gb	Rhan 1

en-gb	Title, Commencement and Interpretation
cy-gb	Enwi, Cychwyn a Dehongli

en-gb	Title, commencement and interpretation
cy-gb	Enwi, cychwyn a dehongli

en-gb	— (1) The title of this determination is the Statement of General Ophthalmic Services Remuneration (COVID-19 Average Monthly Payment).
cy-gb	— (1) Enw'r penderfyniad hwn yw Datganiad o Dâl am Wasanaethau Offthalmig Cyffredinol (Taliad Misol Cyfartalog yn sgil COVID-19).

en-gb	(2) This determination comes into force on the 23 May 2020.
cy-gb	(2) Daw'r penderfyniad hwn i rym ar 23 Mai 2020.

en-gb	(3) In this determination –
cy-gb	(3) Yn y penderfyniad hwn –

en-gb	“financial year” (“ blwyddyn ariannol ”) means the period of one year beginning on 1 April and ending on 31 March;
cy-gb	ystyr “blwyddyn ariannol” (“ financial year ” ) yw’r cyfnod o un flwyddyn sy’n dechrau ar 1 Ebrill ac yn gorffen ar 31 Mawrth;

en-gb	“contractor” (“ contractwr ”) means a person who has undertaken to provide General Ophthalmic Services and whose name is included in the ophthalmic list;
cy-gb	ystyr “contractwr” (“ contractor ” ) yw person sydd wedi ymgymryd â darparu Gwasanaethau Offthalmig Cyffredinol ac y cynhwysir ei enw ar y rhestr offthalmig;

en-gb	“General Ophthalmic Services” (“ Gwasnaethau Offthalmig Cyffredinol ”) means the services which a contractor must provide pursuant to the terms set out in paragraph 10 of Schedule 1 to the National Health Services (General Ophthalmic Services) Regulations 1986;
cy-gb	ystyr “ Gwasa naethau Offthalmig Cyffredinol” ( “ General Ophthalmic Services ” ) yw’r gwasanaethau y mae rhaid i gontractwr eu darparu yn unol â’r telerau a nodir ym mharagraff 10 o Atodlen 1 i Reoliadau’r Gwasanaeth Iechyd Gwladol (Gwasanaethau Offthalmig Cyffredinol) 1986;

en-gb	“GOS” (“ GOC ”) means General Ophthalmic Services;
cy-gb	ystyr “GOC” (“ GOS ” ) yw Gwasanaethau Offthalmig Cyffredinol;

en-gb	“GOSAMP” (“”) means the General Ophthalmic Services Average Monthly Payment payable to a contractor for the provision of General Ophthalmic Services in accordance with this determination;
cy-gb	ystyr “TMCGOC” (“ GOSAMP ” ) yw’r Taliad Misol Cyfartalog Gwasanaethau Offthalmig Cyffredinol sy’n daladwy i gontractwr am ddarparu Gwasanaethau Offthalmig Cyffredinol yn unol â’r penderfyniad hwn .

en-gb	“Local Health Board” (“ Bwrdd Iechyd Lleol ”) means a Local Health Board established in accordance with section 11(2) of the National Health Service (Wales) Act 2006; 
cy-gb	ystyr “Bwrdd Iechyd Lleol” (“ Local Health Board ” ) yw Bwrdd Iechyd Lleol a sefydlwyd yn unol ag adran 11(2) o Ddeddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006;

en-gb	“ophthalmic list” (“ rhestr offthalmig ”) means the list prepared by a Local Health Board in accordance with regulation 6 of the National Health Service (General Ophthalmic Services) Regulations 1986.
cy-gb	ystyr “rhestr offthamig” (“ ophthalmic list ” ) yw’r rhestr a lunnir gan Fwrdd Iechyd Lleol yn unol â rheoliad 6 o Reoliadau’r Gwasanaeth Iechyd Gwladol (Gwasanaethau Offthalmig Cyffredinol) 1986; 

en-gb	and
cy-gb	ac

en-gb	(1) 2006 c.42.
cy-gb	(1) 2006 p. 42.

en-gb	(2) S.I. 
cy-gb	(2) O.S. 

en-gb	1986/975. 
cy-gb	1986/975. 

en-gb	Regulation 10 was amended by S.I. 
cy-gb	Diwygiwyd rheoliad 10 gan O.S. 

en-gb	2007/1026 (W. 
cy-gb	2007/1026 (Cy. 

en-gb	93) and S.I. 
cy-gb	93) ac O.S. 

en-gb	2008/577 (W. 
cy-gb	2008/577 (Cy. 

en-gb	56). 
cy-gb	56). 

en-gb	There are other amendments but none are relevant.
cy-gb	Mae diwygiadau eraill ond nid yw’r un ohonynt yn berthnasol.

en-gb	Part 2
cy-gb	Rhan 2

en-gb	COVID-19 Average Monthly Payments
cy-gb	Taliadau Misol Cyfartalog yn sgil COVID-19

en-gb	General Ophthalmic Services Average Monthly Payments during the COVID-19 pandemic
cy-gb	Taliadau Misol Cyfartalog Gwasanaethau Offthalmig Cyffredinol yn ystod y pandemig COVID-19

en-gb	 2. 
cy-gb	 2. 

en-gb	A General Ophthalmic Services Average Monthly Payment, calculated in accordance with paragraphs 5 or 6, is payable to a contractor for the provision of GOS from the 17 March 2020.
cy-gb	Mae Taliad Misol Cyfartalog Gwasanaethau Offthalmig Cyffredinol, a gyfrifir yn unol â pharagraffau 5 neu 6, yn daladwy i gontractwr am ddarparu GOC o 17 Mawrth 2020 ymlaen.

en-gb	 3. 
cy-gb	 3. 

en-gb	A contractor that provides any emergency and urgent eye care( 3 ) on or after 17 March 2020 will receive a payment of 25% of that contra ctor’s calculated GOSAMP value, in addition to their GOSAMP.
cy-gb	Bydd contractwr sy'n darparu unrhyw ofal llygaid brys ac argyfwng( 3 ) ar 17 Mawrth 2020 neu ar ôl hynny yn cael taliad o 25% o werth TMCGOC cyfrifedig y contractwr hwnnw ar ben ei TMCGOC.

en-gb	Payment of a contractor’s GOSAMP will be made in monthly instalments, in arrears and on the 14 th day of each calendar month.
cy-gb	Bydd taliadau TMCGOC contractwr yn cael eu talu mewn rhandaliadau misol, fel ôl-daliad ar y 14 eg diwrnod ym mhob mis calendr.

en-gb	Calculation of GOSAMP value for contractors with at least 3 years NHS claim history
cy-gb	Cyfrifo gwerth TMCGOC ar gyfer contractwyr a chanddynt o leiaf 3 blynedd o hanes o hawliadau GIG

en-gb	 5. 
cy-gb	 5. 

en-gb	A contractor who has made NHS claims for General Ophthalmic Services for at least 3 years prior to the date of this determination coming into force will have their GOSAMP value calculated using the contractor’s NHS claims for GOS made for each month during the previous 3 financial years (2017-18, 2018-19 and 2019-20) as follows –
cy-gb	Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am Wasanaethau Offthalmig Cyffredinol am o leiaf 3 blynedd cyn y dyddiad y daw’r penderfyniad hwn i rym yn cael ei gyfrifo drwy ddefnyddio hawliada u’r contractwr i’r GIG am Wasanaethau Offthalmig Cyffredinol ar gyfer pob mis yn ystod y 3 blynedd ariannol flaenorol (2017-18, 2018-19 a 2019-20) fel a ganlyn –

en-gb	(a) the su m of the contractor’s GOS claims made for each calendar month during the financial years 2017-2018 (FYC17), 2018-2019 (FYC18) and 2019-2020 (FYC19) divided by thirty-six, and
cy-gb	(a) swm hawliadau GOC y contractwr ar gyfer pob mis calendr yn ystod y blynyddoedd ariannol 2017-2018 (HBA17), 2018-2019 (HBA18), a 2019-2020 (HBA19) wedi ei rannu â thri deg a chwech, a

en-gb	(b) the GOSAMP value calculation can be expressed as —
cy-gb	(b) gellir mynegi gwerth y TMCGOC a gyfrifir fel a ganlyn —

en-gb	퐺푂푆퐴푀푃  푣푎푙푢푒  = (퐹푌퐶17 + 퐹푌퐶18  + 퐹푌퐶19)  ÷ 36.
cy-gb	ℎ 푇푀퐶퐺푂퐶 = (퐻퐵퐴17 + 퐻퐵퐴18  + 퐻퐵퐴19)  ÷ 36

en-gb	Calculation of GOSAMP value for contractors with less than 3 years NHS claim history
cy-gb	Cyfrifo gwerth TMCGOC ar gyfer contractwyr a chanddynt lai na 3 blynedd o hanes o hawliadau GIG

en-gb	 6. — (1) A contractor who has made NHS claims for General Ophthalmic Services for less than 3 years prior to the date of this determination coming into force will have their GOSAMP value calculated using the contractor’s NHS claims for GOS in accordance with sub-paragraphs (2) to (5) as applicable.
cy-gb	 6. — (1) Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am Wasanaethau Offthalmig Cyffredinol am lai na 3 blynedd cyn y dyddiad y daw’ r penderfyniad hwn i rym yn cael ei gyfrifo gan ddefnyddio haw liadau’r contractwr i’r GIG am Wasanaethau Offthalmig Cyffredinol yn unol ag is-baragraffau (2) i (5) fel y bônt yn gymwys.

en-gb	 (2) A contractor who has made NHS claims for GOS for a period in total of at least 12 months but not more than 36 months prior to this determination coming into force, will have their GOSAMP value calculated using the NHS claims for GOS the contractor made during the financial year 2019-2020 as follows —
cy-gb	 (2) Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am Wasanaethau Offthalmig Cyffredinol am gyfnod cyfansymiol o 12 mis o leiaf ond dim mwy na 36 mis cyn y daw’r penderfyniad hwn i rym yn cael ei gyfrifo drwy ddefnyddio hawliadau’r contractwr i’r GIG am Wasanaethau Offthalmig Cyffredinol yn ystod y flwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of a contractor’s claims for GOS per month for the 12 months of April 2019 to March 2020 inclusive ( SMC) divided by 12, and
cy-gb	(a) swm hawliadau GOC y contractwr am bob mis am y 12 mis o fis Ebrill 2019 i fisMawrth 2020 yn gynhwysol ( SHM) wedi ei rannu â 12, a

en-gb	(b) the GOSAMP value calculation for the purposes of this sub-paragraph can be
cy-gb	(3) Gweler llythyrau’r Prif Gynghorydd Optometrig i’r Proffesiwn Optometrig yng Nghymru, dyddiedig 17 a 19 Mawrth 2020, am yr hyn a olygir wrth ofal llygaid brys ac argyfwng.

en-gb	expressed as —
cy-gb	(b) gellir mynegi gwerth y TMCGOC a gyfrifir at ddibenion yr is-baragraff hwn fel a

en-gb	GOSAMP value = SMC ÷ 12.
cy-gb	ganlyn —

en-gb	(3) See the Chief O ptometric Adviser’s letters to the Optometric Profession in Wales dated 17 and 19 March 2020 for what constitutes emergency and urgent eye care.
cy-gb	gwerth TMCGOC = SHM ÷ 12.

en-gb	 (3) A contractor who has made NHS claims for GOS for a period in total of at least 6 months but not more than 12 months prior to this determination coming into force, will have their GOSAMP value calculated using the NHS claims for GOS the contractor made for the final 6 months of the financial year 2019-2020 as follows —
cy-gb	 (3) Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am Wasanaethau Offthalmig Cyffredinol am gyfnod cyfansymiol o 6 mis o leiaf ond dim mwy na 12 mis cyn y daw’r penderfyniad hwn i rym yn cael ei gyfrifo drwy ddefnyddio hawliadau’r contractwr i’r GIG am Wasanaethau Offt halmig Cyffredinol yn ystod 6 mis olaf blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of the co ntractor’s claims for GOS per month for the 6 months of  October 2019 to March 2020 inclusive ( SMC ) divided by 6, and
cy-gb	(a) swm hawliadau GOC y contractwr am bob mis am y 6 mis o fis Hydref 2019 ifis Mawrth 2020 yn gynhwysol ( SHM) wedi ei rannu â 6, a

en-gb	(b) the GOSAMP value calculation for the purposes of this sub-paragraph can be
cy-gb	(b) gellir mynegi gwerth y TMCGOC a gyfrifir at ddibenion yr is-baragraff hwn fel a

en-gb	expressed as —
cy-gb	ganlyn —

en-gb	GOSAMP value = SMC ÷ 6.
cy-gb	gwerth TMCGOC = SHM ÷ 6.

en-gb	 (4) A contractor who has made NHS claims for GOS for a period in total of at least 3 months but not more than 6 months prior to this determination coming into force, will have their GOSAMP value calculated using the NHS claims for GOS the contractor made for the final 3 months of the financial year 2019-2020 as follows —
cy-gb	 (4) Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am Wasanaethau Offthalmig Cyffredinol am gyfnod cyfansymiol o 3 mis o leiaf ond dim mwy na 6 mis cyn y daw’r penderfyniad hwn i rym yn cael ei gyfrifo drwy ddefnyddio hawliadau’r contractwr i’r GIG am Wasanaethau Offthalmig Cyffredinol yn ystod 3 mis olaf blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of the contractor’s claims for GOS per month for the 3 months of  January, February and March 2020 ( SMC ) divided by 3, and
cy-gb	(a) swm hawliadau GOC y contractwr am bob mis ar gyfer 3 mis, sef mis Ionawr,mis Chwefror a mis Mawrth 2020 ( SHM) wedi ei rannu â 3, a

en-gb	(b) the GOSAMP value calculation for the purposes of this sub-paragraph can be
cy-gb	(b) gellir mynegi gwerth y TMCGOC a gyfrifir at ddibenion yr is-baragraff hwn fel a

en-gb	expressed as —
cy-gb	ganlyn —

en-gb	GOSAMP value = SMC ÷ 3.
cy-gb	gwerth TMCGOC = SHM ÷ 3.

en-gb	 (5) A contractor who has made NHS claims for a period of less than 3 months prior to this determination coming into force, will have their GOSAMP value calculated using the NHS claims for GOS the contractor made for each month during the financial year 2019-2020 as follows —
cy-gb	 (5) Bydd gwerth TMCGOC contractwr sydd wedi bod yn gwneud hawliadau i’r GIG am gyfnod o lai na 3 mis cyn y daw’r penderfyniad hwn i rym yn cael ei gyfrifo drwy ddefnyddio hawliadau’r contractwr i’r GIG am Wasanaethau Offthalmig Cyffredinol am bob mis yn ystod blwyddyn ariannol 2019-2020 fel a ganlyn —

en-gb	(a) the sum of the contractor’s claims for GOS per month ( SMC ) divided by the number of months for which claims were submitted ( NMC ), and
cy-gb	(a) swm hawliadau GOC y contractwr am bob mis ( SHM ) wedi ei rannu â nifer y misoedd y cyflwynwyd hawliadau ar eu cyfer ( NHM ), a

en-gb	(b) the GOSAMP value calculation for the purposes of this sub-paragraph can be
cy-gb	(b) gellir mynegi gwerth y TMCGOC a gyfrifir at ddibenion yr is-baragraff hwn fel a

en-gb	expressed as —
cy-gb	ganlyn —

en-gb	퐺푂푆퐴푀푃  푣푎푙푢푒  = 푆푀퐶  ÷ 푁푀퐶.
cy-gb	ℎ 푇푀퐶퐺푂퐶  = 푆퐻푀  ÷ 푁퐻푀. 

en-gb	Conditions attached to General Ophthalmic Services Average Monthly Payments
cy-gb	Amodau sydd ynghlwm wrth y Taliadau Misol Cyfartalog Gwasanaethau Offthalmig Cyffredinol

en-gb	 7. 
cy-gb	 7. 

en-gb	The GOSAMP, or any part thereof, is only payable if the contractor satisfies the following conditions —
cy-gb	Dim ond os yw’r contractwr yn bodloni’r amodau a ganlyn y c aniateir i TMCGOC, neu unrhyw ran ohono, gael ei wneud —

en-gb	(a) the contractor must make available to the Local Health Board any information which the Local Health Board does not have but needs, and the contractor either has or could reasonably be expected to obtain, in order to calculate the  contractor’s GOSAMP,
cy-gb	(a) rhaid i’ r contractwr ddarparu i’r Bwrdd Iechyd Lleol unrhyw wybodaeth nad oes gan y Bwrdd Iechyd Lleol ond y mae arno ei hangen, sef gwybodaeth sydd naill ai gan y contractwr neu y gellid yn rhesymol disgwyl iddo gael gafael arni, er mwyn cyfrifo TMCGOC y contractwr,

en-gb	(b) the contractor must maintain accurate records of all GOS activity undertaken, including emergency and urgent eye care, and
cy-gb	(b) rhaid i’r contractwr gadw cofnodion cywir o’r holl Wasanaethau OffthalmigCyffredinol a ddarparwyd, gan gynnwys gofal llygaid brys ac argyfwng, ac

en-gb	(c) all information supplied by the contractor to the Local Health Board pursuant to or in accordance with this paragraph must be accurate to the contractor’s best  knowledge and belief.
cy-gb	(c) rhaid i’r holl wybodaeth a ddarperir gan y contractwr i’r Bwrdd Iechyd Lleol yn unol â’r paragraff hwn fod yn gywir hyd eithaf gwybodaeth a chred y contractwr.

en-gb	 8. 
cy-gb	 8. 

en-gb	If the contractor breaches any of the conditions in paragraph 7, the Local Health Board may, in appropriate circumstances, withhold payment of, or any part of, a GOSAMP that is otherwise payable.
cy-gb	Os bydd y contractwr yn torri unrhyw un o’r amodau ym mharagraff 7, caiff y Bwrdd Iechyd Lleol, o dan amgylchiadau priodol, beidio â thalu TMCGOC, neu unrhyw ran ohono, sy’n daladwy fel arall .

en-gb	PART 3
cy-gb	RHAN 3

en-gb	REVOCATIONS
cy-gb	DIRYMIADAU

en-gb	The determination of the Minister for Health and Social Services which came into force on 13 May 2019 relating to the remuneration of contractors is revoked.
cy-gb	Mae penderfyniad y Gweinidog Iechyd a Gwasanaethau Cymdeithasol yn ymwneud â thâl contractwyr, a ddaeth i rym ar 13 Mai 2019, wedi ei ddirymu.

en-gb	Signed by Alex Slade, Deputy Director, Primary Care Division, under the authority of the Minister for Health and Social Services, one of the Welsh Ministers
cy-gb	Llofnodwyd gan Alex Slade, Dirprwy Gyfarwyddwr yr Is-adran Gofal Sylfaenol, o dan awdurdod y Gweinidog Iechyd a Gwasanaethau Cymdeithasol, un o Weinidogion Cymru

en-gb	Date: 
cy-gb	Dyddiad: 

en-gb	22 May 2020
cy-gb	22 Mai 2020

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	WELSH STATUTORY INSTRUMENTS
cy-gb	OFFERYNNAU STATUDOL CYMRU

en-gb	2020 No. 507 (W. 
cy-gb	2020 Rhif 507 (Cy. 

en-gb	120)
cy-gb	120)

en-gb	WATER RESOURCES, WALES
cy-gb	ADNODDAU DŴR, CYMRU

en-gb	The Bathing Water (Amendment) (Wales) (Coronavirus) Regulations 2020
cy-gb	Rheoliadau Dyfroedd Ymdrochi (Diwygio) (Cymru) (Coronafeirws) 2020

en-gb	Made - - - - 12 May 2020 Laid before Senedd Cymru 14 May 2020
cy-gb	Gwnaed - - - - 12 Mai 2020 Gosodwyd gerbron Senedd Cymru - - - - 14 Mai 2020

en-gb	Coming into force - - 15 May 2020
cy-gb	Yn dod i rym - - 15 Mai 2020

en-gb	The Welsh Ministers are designated for the purposes of section 2(2) of the European Communities Act 1972( 1 ) in relation to measures relating to water resources( 2 ).
cy-gb	Mae Gweinidogion Cymru wedi eu dynodi at ddibenion adran 2(2) o Ddeddf y Cymunedau Ewropeaidd 1972( 1 ) mewn perthynas â mesurau sy’n ymwneud ag adnoddau dŵr( 2 ). 

en-gb	The Welsh Ministers make these Regulations in exercise of the powers conferred by section 2(2) of the European Communities Act 1972.
cy-gb	Mae Gweinidogion Cymru yn gwneud y Rheoliadau hyn drwy arfer y pwerau a roddir gan adran 2(2) o Ddeddf y Cymunedau Ewropeaidd 1972.

en-gb	Title, commencement and application
cy-gb	Enwi, cychwyn a chymhwyso

en-gb	—(1) The title of these Regulations is the Bathing Water (Amendment) (Wales) (Coronavirus) Regulations 2020 and they come into force on 15 May 2020.
cy-gb	—(1) Enw’r Rheoliadau hyn yw Rheoliadau Dyfroedd Ymdrochi (Diwygio) (Cymru) (Coronafeirws) 2020 a deuant i rym ar 15 Mai 2020.

en-gb	(2) These Regulations apply in relation to Wales.
cy-gb	(2) Mae’r Rheoliadau hyn yn gymwys o ran Cymru.

en-gb	Amendment of the Bathing Water Regulations 2013
cy-gb	Diwygio Rheoliadau Dyfroedd Ymdrochi 2013

en-gb	—(1) The Bathing Water Regulations 2013( 3 ) are amended as follows.
cy-gb	—(1) Mae Rheoliadau Dyfroedd Ymdrochi 2013( 3 ) wedi eu diwygio fel a ganlyn.

en-gb	(2) For regulation 4 (length of bathing season) substitute—
cy-gb	(2) Yn lle rheoliad 4 (hyd y tymor ymdrochi) rhodder—

en-gb	“ 4. 
cy-gb	“ 4. 

en-gb	For the purposes of these Regulations, the bathing season in Wales—
cy-gb	For the purposes of these Regulations, the bathing season in Wales—

en-gb	( 1 ) 1972 c. 68 . The European Communities Act 1972 (“the 1972 Act”) was repealed by section 1 of the European Union (Withdrawal) Act 2018 (c. 16) (“the 2018 Act”) with effect from exit day. 
cy-gb	( 1 ) 1972 p. 68 . Diddymwyd Deddf y Cymunedau Ewropeaidd 1972 (“Deddf 1972”) gan adran 1 o Ddeddf yr Undeb Ewropeaidd (Ymadael) 2018 (p. 16) (“Deddf 2018”) gan gael effaith o’r diwrnod ymadael (“exit day”). 

en-gb	“Exit day” is defined in section 20 of the 2018 Act as 31 January 2020 at 11pm. 
cy-gb	Mae “exit day” wedi ei ddiffinio yn adran 20 o Ddeddf 2018 fel 31 Ionawr 2020 am 11pm. 

en-gb	Despite that repeal the 1972 Act continues to have effect with modifications until IP completion day, by virtue o f section 1A of the 2018 Act. 
cy-gb	Er gwaethaf y diddymiad hwnnw mae Deddf 1972 yn parhau i gael effaith gydag addasiadau tan ddiwrnod cwblhau’r cyfnod gweithredu (“IP completion day”), yn rhinwed d adran 1A o Ddeddf  2018. 

en-gb	Section 1A was inserted by section 1 of the European Union (Withdrawal Agreement) Act 2020 (c. 1) (“the 2020 Act”). 
cy-gb	Mewnosodwyd adran 1A gan adran 1 o Ddeddf yr Undeb Ewropeaidd (Y Cytundeb Ymadael) 2020 (p. 1) (“Deddf  2020”). 

en-gb	“IP completion day” is defined in section 1A as 31 December 2020 at 11pm (the meaning given in section 39 of the 2020 Act). Section 2(2) of the 1972 Act was previously amended by section 27(1) of the Legislative and Regulatory Reform Act 2006 (c. 51) and by section 3(3) of, and Part 1 of the Schedule to, the European Union (Amendment) Act 2008 (c. 7) .
cy-gb	Mae “IP completion day” wedi ei ddiffinio yn adran 1A fel 31 Rhagfyr 2020 am 11pm (yr ystyr a roddir yn adran 39 o Ddeddf 2020). Diwygiwyd adran 2(2) o Ddeddf 1972 yn flaenorol gan adran 27(1) o Ddeddf Diwygio Deddfwriaethol a Rheoleiddiol 2006 (p. 51) a chan adran 3(3) o Ddeddf yr Undeb Ewropeaidd (Diwygio) 2008 (p. 7) a Rhan 1 o’r Atodlen iddi. 

en-gb	( 2 ) See S.I. 2003/2901 for the designation conferred on the National Assembly fo r Wales. 
cy-gb	( 2 ) Gweler O.S. 2003/2901 ar gyfer y dynodiad a roddir i Gynulliad Cenedlaethol Cymru. 

en-gb	By virtue of sections 59 and 162 of, and paragraph 28 of Schedule 11 to, the Government of Wales Act 2006 (c. 32) , that designation is now conferred on the Welsh Ministers. S.I. 2003/2901 is prospectively revoked by S.I. 2018/1011 from IP c ompletion day.
cy-gb	Yn rhinwedd adrannau 59 a 162 o Ddeddf Llywodraeth Cymru 2006 (p. 32) , a pharagraff 28 o Atodlen 11 iddi , mae’r dynodiad hwnnw bellach wedi ei roi i Weinidogion Cymru. Mae O.S. 2003/2901 wedi ei ddirymu’n rhagolygol gan O.S. 2018/1011 o ddiwrnod cwblhau’r cyfnod gweithredu.

en-gb	( 3 ) S.I. 2013/1675 , amended prospectively on IP completion day by S.I. 2019/558 .
cy-gb	( 3 ) O.S. 2013/1675 , wedi ei ddiwygio’n rhagolygol ar ddiwrnod cwblhau’r cyfnod gweithredu gan O.S. 2019/558 .

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-15 Status: 
cy-gb	2020-05-15 Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	(a) subject to paragraph (b), begins on 15th May and ends at the end of the day on 30th September in each year;
cy-gb	(a) subject to paragraph (b), begins on 15th May and ends at the end of the day on 30th September in each year;

en-gb	(b) for the year 2020, begins on 22nd June and ends at the end of the day on 30th September.”
cy-gb	(b) for the year 2020, begins on 22nd June and ends at the end of the day on 30th September.”

en-gb	12 May 2020
cy-gb	12 Mai 2020

en-gb	 Lesley Griffiths  Minister for Environment, Energy and Rural Affairs, one of the Welsh Ministers 
cy-gb	 Lesley Griffiths  Gweinidog yr Amgylchedd, Ynni a Materion Gwledig, un o Weinidogion Cymru 

en-gb	2
cy-gb	2

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-05-15
cy-gb	2020-05-15

en-gb	Status: 
cy-gb	Status: 

en-gb	This is the original version (as it was originally made). 
cy-gb	This is the original version (as it was originally made). 

en-gb	This
cy-gb	This

en-gb	item of legislation is currently only available in its original format.
cy-gb	item of legislation is currently only available in its original format.

en-gb	EXPLANATORY NOTE
cy-gb	NODYN ESBONIADOL

en-gb	(This note is not part of the Regulations)
cy-gb	(Nid yw’r nodyn hwn yn rhan o’r Rheoliadau)

en-gb	 These Regulations make amendments to the Regulations set out below, and in the manner explained, as a result of pressures and work prioritisation related to the virus known as Coronavirus or “Severe acute respiratory syndrome coronavirus 2”, which causes the disease known as “COVID-19”.
cy-gb	 Mae’r Rheoliadau hyn yn diwygio’r Rheoliadau a nodir isod, ac yn y modd a eglurir, o ganlyniad i bwysau a blaenoriaethu gwaith sy’n gysylltiedig â’r feirws o’r enw’r Coronafeirws neu“coronafeirws syndrom anadlol acíwt difrifol 2”, sy’n achosi’r clefyd o’r enw “COVID-19”.

en-gb	 These Regulations amend regulation 4 of the Bathing Water Regulations 2013 in order to change the start date of the bathing season in Wales for the year 2020.
cy-gb	 Mae’r Rheoliadau hyn yn diwygio rheoliad 4 o Reoliadau Dyfroedd Ymdrochi 2013 er mwyn newid dyddiad cychwyn y tymor ymdrochi yng Nghymru am y flwyddyn 2020.

en-gb	 The Welsh Ministers’ Code of Practice on the carrying out of Regulatory Impact Assessments was considered in relation to these Regulations. 
cy-gb	 Ystyriwyd Cod Ymarfer Gweinidogion Cymru ar gynnal Asesiadau Effaith Rheoleiddiol mewn perthynas â’r Rheoliadau hyn. 

en-gb	As a result, it was not considered necessary to carry out a regulatory impact assessment as to the likely costs and benefits of complying with these Regulations.
cy-gb	O ganlyniad, ystyriwyd nad oedd yn angenrheidiol cynnal asesiad effaith rheoleiddiol o’r costau a’r manteision sy’n debygol o ddeillio o gydymffurfio â’r Rheoliadau hyn.

en-gb	3
cy-gb	3

en-gb	S U B O R D I N A T E L E G I S L A T I O N
cy-gb	I S - D D E D D F W R I A E T H

en-gb	2020 No. WG20-18
cy-gb	2020 Rhif WG20-18

en-gb	THE NATIONAL HEALTH SERVICE (WALES) ACT 2006
cy-gb	 DEDDF Y GWASANAETH IECHYD GWLADOL (CYMRU) 2006

en-gb	 The Primary Medical Services (Easter Weekend and Bank Holiday Provision of Essential General Medical Services during the COVID-19 Pandemic) (Directed Enhanced Service) Directions 2020
cy-gb	 Cyfarwyddydau Gwasanaethau Meddygol Sylfaenol (Darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19) (Gwasanaeth Ychwanegol o dan Gyfarwyddyd) 2020

en-gb	Made 07 April 2020
cy-gb	Gwnaed 07 Ebrill 2020

en-gb	Coming into force 08 April 2020
cy-gb	Yn dod i rym 08 Ebrill 2020

en-gb	The Welsh Ministers, in exercise of the powers conferred by sections 12(3), 45 and 203(9) and (10) of the National Health Service (Wales) Act 2006( 1 ), and after consulting in accordance with section 45(4) of that Act with the bodies appearing to them to be representative of persons to whose remuneration these Directions relate, give the following Directions.
cy-gb	Mae Gweinidogion Cymru, drwy arfer y pwerau a roddir gan adrannau 12(3), 45 a 203(9) a (10) o Ddeddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006( 1 ), ac ar ôl ymgynghori yn unol ag adran 45(4) o ’ r Ddeddf honno â ’ r cyrff yr ymddangosai iddynt hwy eu bod yn cynrychioli ’ r personau y mae ’ r Cyfarwyddydau hyn yn ymwneud â ’ u tâl, yn rhoi ’ r Cyfarwyddydau a ganlyn.

en-gb	Title, commencement and application
cy-gb	Enwi, cychwyn a chymhwyso

en-gb	 1. — (1) The title of these Directions is the Primary Medical Services (Easter Weekend and Bank Holiday Provision of Essential General Medical Services during the COVID-19 Pandemic) (Directed Enhanced Service) Directions 2020.
cy-gb	 1. — (1) Enw ’ r Cyfarwyddydau hyn yw Cyfarwyddydau Gwasanaethau Meddygol Sylfaenol (Darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19) (Gwasanaeth Ychwanegol o dan Gyfarwyddyd) 2020.

en-gb	 (2) These Directions come into force on 08 April 2020 and expire on 1 October 2020.
cy-gb	(2) Daw ’ r Cyfarwyddydau hyn i rym ar 08 Ebrill 2020 a deuant i ben ar 1 Hydref 2020.

en-gb	 (3) These Directions are given to Local Health Boards.
cy-gb	(3) Mae ’ r Cyfarwyddydau hyn wedi eu rhoi i Fyrddau Iechyd Lleol.

en-gb	Interpretation
cy-gb	Dehongli

en-gb	In these Directions —
cy-gb	Yn y Cyfarwyddydau hyn —

en-gb	“financial year” (“ blwyddyn ariannol ”) means the period from 1 April to 31 March in any year;
cy-gb	ystyr “blwyddyn ariannol” (“ financial year ”) yw ’ r cyfnod o 1 Ebrill i 31 Mawrth mewn unrhyw flwyddyn;

en-gb	“Local Health Board” (" Bwrdd Iechyd Lleol ") means a Local Health Board established in accordance with section 11(2) of the 2006 Act;
cy-gb	ystyr “Bwr dd Iechyd Lleol” (“ Local Health Board ”) yw Bwrdd Iechyd Lleol sydd wedi ei sefydlu yn unol ag adran 11(2) o Ddeddf 2006;

en-gb	“registered patient” (“ claf cofrestredig ”) has the meaning given to it in regulation 2(1) of the National Health Service (General Medical Services Contracts) (Wales) Regulations 2004;
cy-gb	mae i “claf cofrestredig ” yr ystyr a roddir i “registered patient” yn rheoliad 2(1) o Reoliadau ’ r Gwasanaeth Iechyd Gwladol (Contractau Gwasanaethau Meddygol Cyffredinol) (Cymru) 2004;

en-gb	“Bank Holiday” (“”) means a day specified in paragraph 15 of the Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic in Schedule 1;
cy-gb	ystyr “contract gwasanaethau meddygol cyffredinol ” (“ general medical services contract ”) yw contract ar gyfer gwasanaethau meddygol cyffredinol rhwng contractwr GMC a Bwrdd Iechyd Lleol a wneir yn unol ag adran 42 o ’ r Ddeddf;

en-gb	“GMS contractor” (“ contractwr GMC ”) means a person with whom a Local Health Board is entering or has entered into a general medical services contract;
cy-gb	ystyr “contractwr GMC ” (“ GMS contractor ”) yw person y mae Bwrdd Iechyd Lleol yn ymrwymo neu wedi ymrwymo i gontract gwasanaethau meddygol cyffredinol ag ef;

en-gb	“engaged GMS contractor” (“ contractwr GMC sydd wedi ei gymryd ymlaen ”) means a GMS contractor that agrees with a Local Health Board to provide this Directed Enhanced Service pursuant to an agreement made in accordance with paragraph 4(1);
cy-gb	ystyr “contractwr GMC sydd wedi ei gymryd ymlaen ” (“ engaged GMS contractor ” ) yw contractwr GMC sy ’ n cytuno â Bwrdd Iechyd Lleol i ddarparu ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd yn unol â chytundeb a wneir yn unol â pharagraff 4(1);

en-gb	“Statement of Financial Entitlements” (“ Datganiad ar Hawlogaethau Ariannol ”) means any directions given by the Welsh Ministers pursuant to section 45 of the Act in relation to payments to be made by a Local Health Board to a GMS contractor.
cy-gb	ystyr “Datganiad ar Hawlogaethau Ariannol ”(“ Statement of Financial Entitlements ”) yw unrhyw gyfarwyddydau a roddir gan Weinidogion Cymru yn unol ag adran 45 o ’ r Ddeddf mewn perthynas â thaliadau sydd i ’ w gwneud gan Fwrdd Iechyd Lleol i gontractwr GMC;

en-gb	“ E aster weekend” means a day specified in paragraphs 13 or 14 of the Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic in Schedule 1;
cy-gb	ystyr “penwythnos y Pasg” (“ Easter weekend ” ) yw diwrnod a bennir ym mharagraff 13 neu 14 o’r Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 yn Atodlen 1;

en-gb	“essential general medical services” (“”) means the services that must be provided under a general medical services contract in accordance with regulation 15 of the National Health Service (General Medical Services Contracts) (Wales) Regulations 2004( 1 );
cy-gb	ystyr “gwasanaethau  meddygol cyffredinol hanfodol”  (“ essential general medical services ”)yw ’ r gwasanaethau y mae rhaid eu darparu o dan gontract gwasanaethau meddygol cyffredinol yn unol â rheoliad 15 o Reoliadau ’ r Gwasanaeth Iechyd Gwladol (Contractau Gwasanaethau Meddygol Cyffredinol) (Cymru) 2004( 1 );

en-gb	“general medical services contract” (“ contract gwasanaethau meddygol cyffredinol ”) means a contract for general medical services between a GMS contractor and a Local Health Board made pursuant to section 42 of the Act;
cy-gb	ystyr “Deddf 2006” (“ the 2006 Act ”) yw Deddf y Gwasanaeth Iechyd Gwladol (Cymru) 2006;

en-gb	“health care professional” (“ proffesiynolyn gofal iechyd ”) means a person who is a member of a profession regulated by a body mentioned in section 25(3) of the National Health Service Reform and Health Care Professions Act 2002( 2 );
cy-gb	ystyr “y Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID- 19” (“ Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic ”) yw’r Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 yn Atodlen 1 i’r Cyfarwyddydau hyn;

en-gb	“ Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic” (“”) means the Specification for the Easter Weekend and Bank Holiday provision of Essential General
cy-gb	ystyr “Gŵyl Banc” (“ Bank Holiday ”) yw diwrnod a bennir ym mharagraff 15 o’r Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 yn Atodlen 1;

en-gb	Medical Services during the COVID-19 Pandemic at Schedule 1 to these Directions;
cy-gb	ystyr “proffesiynolyn gofal iechyd ” (“ health care professional ”) yw person sy ’ n aelod o broffesiwn a reoleiddir gan gorff a grybwyllir yn adran 25(3) o Ddeddf Diwygio ’ r Gwasanaeth Iechyd Gwladol a Phroffesiynau Gofal Iechyd 2002( 2 ).

en-gb	Establishment of a Scheme to secure Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic
cy-gb	Sefydlu Cynllun i ddiogelu bod Gwasanaethau Meddygol Cyffredinol Hanfodol yn cael eu darparu dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19

en-gb	 3. — (1) Each Local Health Board is required under section 41 of the 2006 Act (primary medical services) to exercise its functions so as to provide, or secure the provision of, primary medical services within its area.
cy-gb	 3. — (1) Mae’n ofynnol i bob Bwrdd Iechyd Lleol o dan adran 41 o Ddeddf 2006 (gwasanaethau meddygol sylfaenol) arfer ei swyddogaethau er mwyn darparu gwasanaethau meddygol sylfaenol yn ei ardal, neu ddiogelu bod gwasanaethau meddygol sylfaenol yn cael eu darparu yn ei ardal.

en-gb	 (2) As part of its discharge of its functions under section 41 of the 2006 Act each Local Health Board must establish (if it has not already done so), operate and, as appropriate revise, a scheme to secure Easter weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 pandemic.
cy-gb	 (2) Fel rhan o’i waith o gyflawni ei swyddogaethau o dan adran 41 o Ddeddf 2006, rhaid i bob Bwrdd Iechyd Lleol sefydlu (os nad yw eisoes wedi gwneud hynny), gweithredu ac, fel y bo’n briodol, ddiwygio cynllun i ddiogelu bod Gwasanaethau Meddygol Cyffredinol Hanfodol yn cael eu darparu dros benwythnos y Pasg a Gwyliau Banc yn ystod y pandemig COVID-19.

en-gb	 (3) The underlying purpose of the scheme to secure Easter weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic is to —
cy-gb	 (3) Diben sylfaenol y cynllun i ddiogelu bod Gwasanaethau Meddygol Cyffredinol Hanfodol yn cael eu darparu dros benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 yw —

en-gb	(a) ensure provision of essential general medical services for patients requesting a consultation during specified hours of the Easter weekend and a Bank Holiday, and
cy-gb	(a) sicrhau bod gwasanaethau meddygol cyffredinol hanfodol yn cael eu darparu ar gyfer cleifion sy’n gofyn am ymgynghoriad yn ystod oriau penodedig penwythnos y Pasg a Gŵyl Banc, a

en-gb	(b) mitigate the inevitable demand on emergency departments and GP Out of Hours services at a time when hospitals will be operating at capacity dealing with the COVID-19 pandemic.
cy-gb	(b) lliniaru’r galw anochel ar adrannau brys a gwasanaethau ymarferwyr cyffredinol y Tu Allan i Oriau ar adeg pan fydd ysbytai yn gweithredu hyd eithaf eu capasiti yn ymdrin â’r pandemig COVID-19.

en-gb	Scheme to secure Easter weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic
cy-gb	Cynllun i ddiogelu bod Gwasanaethau Meddygol Cyffredinol Hanfodol yn cael eu darparu dros benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19

en-gb	 4. — (1) As part of its Scheme to secure Easter weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic, each Local Health Board must offer to enter into arrangements for the provision of services in accordance with the Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic with each GMS contractor, in relation to the registered patients of that GMS contractor.
cy-gb	 4. — (1) Fel rhan o ’ i Gynllun i ddiogelu bod Gwasanaethau Meddygol Cyffredinol Hanfodol yn cael eu darparu dros benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19, rhaid i bob Bwrdd Iechyd Lleol gynnig ymrwymo i drefniadau ar gyfer darparu gwasanaethau yn unol â ’ r Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 â phob contractwr GMC, mewn perthynas â chleifion cofrestredig y contractwr GMC hwnnw.

en-gb	 (2) Where the patients of a GMS contractor will not receive the services outlined in this Directed Enhanced Service from the GMS contractor in relation to whomthey are registered patients, the Local Health Board may make arrangements to ensure the provision of treatment to the registered patients of that GMS contractor as close to the practice premises of that GMS contractor as is reasonably practicable and the Local Health Board may deliver the services under this Directed Enhanced Service to those patients in any way it believes is appropriate (including, but not limited to, by providing the services itself or arranging for the delivery of those services by any engaged GMS contractor).
cy-gb	 (2) Pan na fydd cleifion contractwr GMC yn cael y gwasanaethau a amlinellir yn y Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd gan y contractwr GMC y maent yn gleifion cofrestredig mewn perthynas ag ef, caiff y Bwrdd Iechyd Lleol wneud trefniadau i sicrhau bod triniaeth yn cael ei darparu i gleifion cofrestredig y contractwr GMC hwnnw mor agos i fangre practis y contractwr GMC hwnnw ag sy’n rhesymol ymarferol, a chaiff y Bwrdd Iechyd Lleol gyflenwi ’ r gwasanaethau o dan y Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd i ’ r cleifion hynny mewn unrhyw ffordd y mae ’ n credu ei bod yn briodol (gan gynnwys, ond heb fod yn gyfyngedig i, drwy ddarparu ’ r gwasanaethau ei hunan neu drefnu i unrhyw gontractwr GMC sydd wedi ei gymryd ymlaen gyflenwi ’ r gwasanaethau hynny).

en-gb	 (3) Each engaged GMS contractor must complete, by such date as the Local Health Board requires, a plan setting out the arrangement for the delivery of this Directed Enhanced Service to patients of the engaged GMS contractor.
cy-gb	 (3) Rhaid i bob contractwr GMC sydd wedi ei gymryd ymlaen gwblhau, erbyn unrhyw ddyddiad sy’n ofynnol gan y Bwrdd Iechyd Lleol, blan sy ’ n nodi ’ r trefniant ar gyfer cyflenwi ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd i gleifion y contractwr GMC sydd wedi ei gymryd ymlaen.

en-gb	 (4) Where arrangements are made between the Local Health Board and a GMS contractor pursuant to paragraph (1), those arrangements must, in respect of each financial year (or part of a year) to which they relate, include —
cy-gb	 (4) Pan fo trefniadau yn cael eu gwneud rhwng y Bwrdd Iechyd Lleol a chontractwr GMC yn unol â pharagraff (1), rhaid i ’ r trefniadau hynny, mewn cysylltiad â phob blwyddyn ariannol (neu ran o flwyddyn) y maent yn ymwneud â hi, gynnwys —

en-gb	(a) a requirement that the GMS contractor —
cy-gb	(a) gofyniad bod y contractwr GMC —

en-gb	(i) reads and takes account of these Directions alongside complying with the Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic which together provide the detailed requirements for this Directed Enhanced Service;
cy-gb	(i) yn darllen ac yn ystyried y Cyfarwyddydau hyn wrth gydymffurfio â ’ r Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 sydd, gyda ’ i gilydd, yn darparu ’ r gofynion manwl ar gyfer y Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd;

en-gb	(ii) provides the services outlined in the Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic and in line with the plan specified in paragraph (3) above;
cy-gb	(ii) yn darparu ’ r gwasanaethau a amlinellir yn y Fanyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19 ac yn unol â ’ r plan a bennir ym mharagraff (3) uchod;

en-gb	(iii) provides data, subject to sub-paragraph (iv), to its Local Health Board and the Welsh Government, when required, to inform the days and times on which the GMS contractor will be offering this Directed Enhanced Service;
cy-gb	(iii) yn darparu data, yn ddarostyngedig i is- baragraff (iv), i ’ w Fwrdd Iechyd Lleol a Llywodraeth Cymru, pan fydd yn ofynnol, i roi gwybod am y diwrnodau a ’ r amseroedd y bydd y contractwr GMC yn cynnig y Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd;

en-gb	(iv) ensures consistent coding for capture of data and compliance with relevant information governance legislation;
cy-gb	(iv) yn sicrhau codio cyson ar gyfer cipio data a chydymffurfio â deddfwriaeth berthnasol ynghylch llywodraethu gwybodaeth;

en-gb	(v) ensures that each healthcare professional undertaking this Directed Enhanced Service has the necessary skills, training, competence and experience in order to provide the services;
cy-gb	(v) yn sicrhau bod gan bob proffesiynolyn gofal iechyd sy ’ n ymgymryd â ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd y sgiliau, yr hyfforddiant, y cymhwysedd a ’ r profiad angenrheidiol er mwyn darparu ’ r gwasanaethau;

en-gb	(vi) ensures that each health care professional undertaking this Directed Enhanced Service is adequately indemnified or insured for any liability arising from the work performed;
cy-gb	(vi) yn sicrhau bod pob proffesiynolyn gofal iechyd sy ’ n ymgymryd â ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd wedi ei indemnio neu ei yswirio ’ n ddigonol am unrhyw atebolrwydd sy ’ n codi o ’ r gwaith sy’n cael ei wneud;

en-gb	(vii) supplies its Local Health Board with such information as the Local Health Board may reasonably request for the purposes of monitoring the engaged GMS  contractor’s performance of its  obligations under this Directed Enhanced Service, in relation to the plan specified in paragraph (3), and
cy-gb	(vii) yn cyflenwi i ’ w Fwrdd Iechyd Lleol unrhyw wybodaeth y mae ’ r Bwrdd Iechyd Lleol yn gofyn yn rhesymol amdani at ddibenion monitro sut y mae ’ r contractwr GMC sydd wedi ei gymryd ymlaen yn cyflawni ei rwymedigaethau o dan y Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd, mewn perthynas â ’ r plan a bennir ym mharagraff (3), a

en-gb	(b) payment arrangements for an engaged GMS contractor, which must provide for it to be able to claim —
cy-gb	(b) trefniadau talu am gontractwr GMC sydd wedi ei gymryd ymlaen, y mae rhaid iddynt ddarparu iddo allu hawlio —

en-gb	(i) a payment of £275 for every 1000 patients list size per day, for each full day during which the GMS contractor provides this Directed Enhanced Service;
cy-gb	(i) taliad o £275 y dydd am bob 1000 o gleifion ar ei restr cleifion am bob diwrnod llawn y mae ’ r contractwr GMC yn darparu ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd;

en-gb	(ii) a payment of £150 for every 1000 patients list size per day for each half day during which the GMS contractor provides this Directed Enhanced Service;
cy-gb	(ii) taliad o £150 y dydd am bob 1000 o gleifion ar ei restr cleifion am bob hanner diwrnod y mae ’ r contractwr GMC yn darparu ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd;

en-gb	and after the payments are due, as above, and authorised by the Local Health Board, such payments will then be paid on the date the GMS contractor’s Global Sum monthly payment next falls due in accordance with the Statement of Financial Entitlements.
cy-gb	ac ar ôl i ’ r taliadau fod yn ddyledus, fel uchod, a chael eu hawdurdodi gan y Bwrdd Iechyd Lleol, bydd y taliadau hynny yn cael eu talu wedyn ar y dyddiad y bydd taliad misol Swm Craidd y contractwr GMC yn dod yn ddyledus nesaf yn unol â ’ r Datganiad ar Hawlogaethau Ariannol.

en-gb	 (5) The Local Health Board must, where necessary, vary the GMS contractor’s general medical services contract so that the arrangements made pursuant to paragraph (1) comprise part of the GMS contractor’s contract and the requirements of the arrangements are conditions of the contract.
cy-gb	 (5) Rhaid i ’ r Bwrdd Iechyd Lleol, pan fo ’ n angenrheidiol, amrywio contract gwasanaethau meddygol cyffredinol y contractwr GMC fel bod y trefniadau a wneir yn unol â pharagraff (1) yn rhan o gontract y contractwr GMC a bod gofynion y trefniadau yn amodau o ’ r contract.

en-gb	 (6) Any disputes arising as a result of provision of this Directed Enhanced Service will be dealt with in accordance with Part 7 of Schedule 6 to the National Health Service (General Medical Services Contracts) (Wales) Regulations 2004( 1 ).
cy-gb	 (6) Ymdrinnir ag unrhyw anghydfodau sy ’ n codi o ganlyniad i ddarparu ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd yn unol â Rhan 7 o Atodlen 6 i Reoliadau ’ r Gwasanaeth Iechyd Gwladol (Contractau Gwasanaethau Meddygol Cyffredinol) (Cymru) 2004( 1 ).

en-gb	 (7) Where the Local Health Board delivers this Directed Enhanced Service pursuant to an arrangement in accordance with paragraph 4(2), the Local Health Board shall ensure that paragraphs 4(4) and 4(5) apply to such arrangements as they would to an engaged GMS contractor.
cy-gb	 (7) Pan fo ’ r Bwrdd Iechyd Lleol yn cyflenwi ’ r Gwasanaeth Ychwanegol hwn o dan Gyfarwyddyd yn unol â threfniant yn unol â pharagraff 4(2), rhaid i’r Bwrdd Iechyd Lleol sicrhau bod paragraffau 4(4) a 4(5) yn gymwys i unrhyw drefniadau fel y byddent i gontractwr GMC sydd wedi ei gymryd ymlaen.

en-gb	Signed by Alex Slade, Deputy Director, Primary Care Division under the authority of the Minister for Health and Social Services, one of the Welsh Ministers
cy-gb	Llofnodwyd gan Alex Slade, Dirprwy Gyfarwyddwr, yr Is-adran Gofal Sylfaenol o dan awdurdod y Gweinidog Iechyd a Gwasanaethau Cymdeithasol, un o Weinidogion Cymru

en-gb	Date: 
cy-gb	Dyddiad: 

en-gb	07 April 2020
cy-gb	07 Ebrill 2020

en-gb	6
cy-gb	6

en-gb	SCHEDULE 1
cy-gb	ATODLEN 1

en-gb	 Specification for the Easter Weekend and Bank Holiday provision of Essential General Medical Services during the COVID-19 Pandemic
cy-gb	Manyleb ar gyfer darparu Gwasanaethau Meddygol Cyffredinol Hanfodol dros Benwythnos y Pasg a Gwyliau Banc yn ystod y Pandemig COVID-19

en-gb	Introduction
cy-gb	Cyflwyniad

en-gb	 1. 
cy-gb	 1. 

en-gb	This specification sets out the requirements of the Directed Enhanced Service for the Easter weekend and Bank Holiday provision of essential General Medical Services (GMS) during the COIVD-19 pandemic.
cy-gb	Mae’r fanyleb hon yn nodi gofynion y Gwasanaeth Ychwanegol o dan Gyfarwyddyd ar gyfer darparu Gwasanaethau Meddygol Cyffredinol (GMC) hanfodol dros benwythnos y Pasg a Gwyliau Banc yn ystod y pandemig COVID-19.

en-gb	 2. 
cy-gb	 2. 

en-gb	Health Boards by Direction must offer practices the opportunity to participate in this Enhanced Service on Good Friday and Easter Bank Holiday Monday. 
cy-gb	Rhaid i Fyrddau Iechyd drwy Gyfarwyddyd gynnig y cyfle i bractisau gymryd rhan yn y Gwasanaeth Ychwanegol hwn ar Ddydd Gwener y Groglith a Gŵyl Banc Dydd Llun y Pasg. 

en-gb	In addition, Health Boards may offer practices the opportunity to participate in this Enhanced Service on the Saturday or Sunday of the Easter weekend and on the Bank Holiday Mondays in May and August.
cy-gb	Yn ychwanegol, caiff Byrddau Iechyd gynnig y cyfle i bractisau gymryd rhan yn y Gwasanaeth Ychwanegol hwn ar y dydd Sadwrn neu’r dydd Sul ar benwythnos y Pasg ac ar y Gwyliau Banc ar ddyddiau Llun ym mis Mai ac ym mis Awst.

en-gb	 3. 
cy-gb	 3. 

en-gb	During the COVID-19 pandemic, when the population is acting on lockdown advice, or pursuant to emergency legislation, to stay at home, including school closures, there may be an increased demand on GMS contractors whilst there is also a reduced capacity in the provision of essential GMS, both in and out of hours services.
cy-gb	Yn ystod y pandemig COVID-19, pan fydd y boblogaeth yn gweithredu yn unol â chyngor o ran cyfyngiadau symud, neu yn unol â deddfwriaeth frys, i aros gartref, gan gynnwys cau ysgolion, efallai y bydd mwy o alw ar gontractwyr GMC tra bo llai o gapasiti hefyd wrth ddarparu GMC hanfodol, yn y gwasanaethau o fewn ac y tu allan i oriau.

en-gb	 4. 
cy-gb	 4. 

en-gb	The purpose of this Enhanced Service is to cover the provision of essential GMS to patients requesting a consultation during specific hours of the Easter weekend and a Bank Holiday. 
cy-gb	Diben y Gwasanaeth Ychwanegol hwn yw ymdrin â darparu GMC hanfodol i gleifion sy’n gofyn am ymgynghoriad yn ystod oriau penodol ar benwythnos y Pasg ac ar Ŵyl Banc. 

en-gb	This will mitigate the inevitable demand on emergency departments and GP Out of Hours services at a time when hospitals will be operating at capacity dealing with the COVID-19 pandemic.
cy-gb	Bydd hyn yn lliniaru’r galw anochel ar adrannau brys a gwasanaethau ymarferwyr cyffredinol y Tu Allan i Oriau ar adeg pan fydd ysbytai yn gweithredu hyd eithaf eu capasiti wrth iddynt ymdrin â’r pandemig COVID-19.

en-gb	 5. 
cy-gb	 5. 

en-gb	This Enhanced Service enables GMS contractors to provide essential GMS at times and on days outside of the core hours of their GMS contract.
cy-gb	Mae’r Gwasanaeth Ychwanegol hwn yn galluogi contractwyr GMC i ddarparu GMC hanfodol ar adegau ac ar ddiwrnodau y tu allan i oriau craidd eu contract GMC.

en-gb	Eligibility
cy-gb	Cymhwystra

en-gb	 6. 
cy-gb	 6. 

en-gb	All GMS contractors who participate in this Enhanced Service and meet the requirements set out in this Specification will be eligible for payment.
cy-gb	Bydd pob contractwr GMC sy’n cymryd rhan yn y Gwasanaeth Ychwanegol hwn ac sy’n bodloni ’ r gofynion a nodir yn y Fanyleb hon yn gymwys i gael taliad.

en-gb	Any patient who is eligible to receive essential GMS services, including temporary residents, will be able to access a GMS contractor during the operation of the Enhanced Service.
cy-gb	Bydd unrhyw glaf sy’n gymwys i gael GMC hanfodol, gan gynnwys preswylwyr dros dro, yn gallu cael gafael ar gontractwr GMC pan fydd y Gwasanaeth Ychwanegol yn cael ei weithredu.

en-gb	This Enhanced Service supports GMS contractors to provide essential GMS but not  additional services.
cy-gb	Mae’r Gwasanaeth Ychwanegol hwn yn cefnogi contractwyr GMC i ddarparu GMC hanfodol ond nid gwasanaethau ychwanegol .

en-gb	GMS contractors must adopt a total triage model according to the current Welsh Government advice at the time of the provision of this Enhanced Service, so that face-to-face consultations (in surgery, at a home visit or at a cluster hub venue) occur only after a telephone or video or online consultation. 
cy-gb	Rhaid i gontractwyr GMC fabwysiadau model brysbennu cyflawn yn unol â chyngor cyfredol Llywodraeth Cymru ar yr adeg y darperir y Gwasanaeth Ychwanegol hwn, fel nad yw ymgyngoriadau wyneb yn wyneb (mewn meddygfa, yn ystod ymweliad â ’ r cartref neu mewn lleoliad canolfan clwstwr) ond yn digwydd ar ôl ymgynghoriad dros yffôn neu drwy fideo neu ar-lein. 

en-gb	This will reduce the risk of inappropriate access of GMS contractor premises by infected patients and thus protect GPs, their staff and patients.
cy-gb	Bydd hyn yn lleihau’r perygl o fynediad amhriodol i fangreoedd contractwyr GMC gan gleifion sydd wedi eu heintio ac felly yn gwarchod ymarferwyr cyffredinol, eu staff a’u cleifion.

en-gb	 10. 
cy-gb	 10. 

en-gb	GMS contractors must not agree to provide this Enhanced Service and then consequently disengage from Covid-19 cluster initiatives that they had previously agreed to participate in.
cy-gb	Ni chaiff contractwyr GMC gytuno i ddarparu’r Gwasanaeth Ychwanegol hwn ac wedyn, o ganlyniad i hynny, dynnu’n ôl o fentrau clwstwr COVID-19 yr oeddent wedi cytuno’n flaenorol i gymryd rhan ynddynt.

en-gb	 11. 
cy-gb	 11. 

en-gb	GMS contractors must ensure doctors honour any pre-existing agreements or commitments to the GP Out of Hours service. 
cy-gb	Rhaid i gontractwyr GMC sicrhau bod meddygon yn anrhydeddu unrhyw gytundebau neu ymrwymiadau sydd eisoes yn bodoli i’r gwasanaeth ymarferwyr cyffredinol y Tu Allan i Oriau. 

en-gb	Any doctor engaged to provide this Enhanced Service must not be to the detriment to the functioning and capacity of the GP Out of Hours service.
cy-gb	Ni chaniateir cymryd ymlaen unrhyw feddyg i ddarparu’r Gwasanaeth Ychwanegol hwn os bydd hynny’n niweidio gweithrediad y gwasanaeth ymarferwyr cyffredinol y Tu Allan i Oriau a chapasiti’r gwasanaeth hwnnw.

en-gb	Delivery
cy-gb	Cyflenwi

en-gb	 12. 
cy-gb	 12. 

en-gb	This Enhanced Service must be provided from main surgery sites. 
cy-gb	Rhaid i ’ r Gwasanaeth Ychwanegol hwn gael ei ddarparu o safleoedd prif feddygfeydd. 

en-gb	If a GMS contractor normally provides GP clinical services at branch surgeries 5 days a week, the GMS contractor may provide this Enhanced Service from a branch surgery site, but only if the main surgery site is also providing the Enhanced Service.
cy-gb	Os yw contractwr GMC fel arfer yn darparu gwasanaethau clinigol ymarferydd cyffredinol mewn meddygfeydd cangen 5 niwrnod yr wythnos, caiff y contractwr GMC ddarparu’r Gwasanaeth Ychwanegol hwn o safle meddygfa cangen, ond dim ond os yw safle’r brif feddygfa hefyd yn darparu’r Gwasanaeth Ychwanegol.

en-gb	 13. 
cy-gb	 13. 

en-gb	The Local Health Board must offer GMS contractors the opportunity to provide this Enhanced Service for essential GMS during the following opening periods of the Easter Bank Holiday weekend —
cy-gb	Rhaid i’r  Bwrdd Iechyd Lleol gynnig y cyfle i’r contractwyr GMC ddarpa ru’r  Gwasanaeth Ychwanegol hwn ar gyfer GMC hanfodol yn ystod y cyfnodau agor a ganlyn ar benwythnos Gŵyl  Banc y Pasg —

en-gb	(a) Good Friday, 10 April 2020 - 8:00 to 18:30 (10.5 hours), and
cy-gb	(a) Dydd Gwener y Groglith, 10 Ebrill 2020 - 8:00 i 18:30 (10.5 awr), a

en-gb	(b) Easter Bank Holiday Monday, 13 April 2020 - 8:00 to 18:30 (10.5 hours).
cy-gb	(b) Gŵyl Banc Dydd Llun y Pasg, 13 Ebrill 2020 – 8:00 i 18:30 (10.5 awr).

en-gb	 14. 
cy-gb	 14. 

en-gb	The Local Health Board may offer GMS contractors the opportunity to provide this Enhanced Service for essential GMS during the following opening periods of the Easter Bank Holiday weekend —
cy-gb	Caiff y Bwrdd Iechyd Lleol gynnig y cyfle i gontractwyr GMC ddarparu’r Gwasanaeth Ychwanegol hwn ar gyfer GMC hanfodol yn ystod y cyfnodau agor a ganlyn ar benwythnos Gŵyl  Banc y Pasg —

en-gb	(a) Easter Saturday, 11 April 2020 - 8:00 to 13:15 (5.25 hours), and
cy-gb	(a) Dydd Sadwrn y Pasg, 11 Ebrill 2020 – 8:00 i 13:15 (5.25 awr), a

en-gb	(b) Easter Sunday, 12 April 2020 - 8:00 to 13:15 (5.25 hours).
cy-gb	(b) Dydd Sul y Pasg, 12 Ebrill 2020 – 8:00 i 13:15 (5.25 awr).

en-gb	 15. 
cy-gb	 15. 

en-gb	The Local Health Board may offer GMS contractors the opportunity to provide this Enhanced Service for essential GMS during the following opening periods of the following Bank Holidays —
cy-gb	Caiff y Bwrdd Iechyd Lleol gynnig y cyfle i gontractwyr GMC ddarparu’r  Gwasanaeth Ychwanegol hwn ar gyfer GMC hanfodol yn ystod y cyfnodau agor a ganlyn ar y Gwyliau Banc a ganlyn —

en-gb	(a) May Bank Holiday Friday, 8 May 2020 - 8:00 to 18:30 (10.5 hours),
cy-gb	(a) Gŵyl Banc Calan Mai, Dydd Gwener 8 Mai 2020 – 8:00 i 18:30 (10.5 awr),

en-gb	(b) Spring Bank Holiday Monday, 25 May 2020 - 8:00 to 18:30 (10.5 hours), and
cy-gb	(b) Gŵyl Banc y Gwanwyn, Dydd Llun 25 Mai 2020 – 8:00 i 18:30 (10.5 awr), ac

en-gb	(c) Summer Bank Holiday Monday 31 August 2020 - 8:00 to 18:30 (10.5 hours).
cy-gb	(c) Gŵyl Banc yr Haf, Dydd Llun 31 Awst 2020 – 8:00 i 18:30 (10.5 awr).

en-gb	 16. 
cy-gb	 16. 

en-gb	The GMS contractor must take calls directly from its registered patients and is prohibited from diverting calls to NHS Direct Wales 111 during the hours the Enhanced Service is in operation.
cy-gb	Rhaid i’r contractwr GMC gymryd galwadau yn uniongyrchol o’i gleifion cofrestredig ac fe’i gwaherddir rhag dargyfeirio galwadau i Alw Iechyd Cymru 111 yn ystod yr oriau y mae’r Gwasanaeth Ychwanegol yn cael ei weithredu.

en-gb	 17. 
cy-gb	 17. 

en-gb	The GMS contractor must use a total triage model to screen all requests for face-to-face consultations.
cy-gb	Rhaid i’r contractwr GMC ddefnyddio model brysbennu cyflawn i sgrinio pob cais am ymgynghoriad wyneb yn wyneb.

en-gb	 18. 
cy-gb	 18. 

en-gb	The GMS contractor must be able to offer face- to-face consultations in the main or branch surgery premises in the circumstances outlined in paragraph
cy-gb	Rhaid i’r contractwr GMC allu cynnig ymgyngoriadau wyneb yn wyneb ym mangre’r brif feddygfa neu’r feddygfa cangen o dan yr amgylchiadau a amlinellir ym mharagraff 12.

en-gb	 19. 
cy-gb	 19. 

en-gb	Where the GMS contractor uses a multi- disciplinary primary care team, appropriate staffing levels must be in place to ensure face-to-face consultations can be with any appropriate professional, not necessarily with a GP.
cy-gb	Pan fo’r contractwr GMC yn defnyddio tîm gofal sylfaenol amlddisgyblaethol, rhaid i lefelau staffio priodol fod yn eu lle i sicrhau y gall ymgyngoriadau wyneb yn wyneb fod gydag unrhyw broffesiynolyn priodol, nid o reidrwydd gydag ymarferydd cyffredinol.

en-gb	 20. 
cy-gb	 20. 

en-gb	The GMS contractor is responsible for ensuring appropriate staffing to meet patient need and must have at least one GP on the premises at all times during the hours which the surgery premises are open and providing this Enhanced Service, unless it is necessary for all GPs on the premises to undertake home visits for previously triaged patients.
cy-gb	Mae’r contractwr GMC yn gyfrifol am sicrhau staffio priodol i ddiwallu anghenion cleifion a rhaid cael o leiaf un ymarferydd cyffredinol yn y fangre drwy’r amser yn ystod yr oriau pan fydd mangre’r feddygfa ar agor ac yn darparu’r Gwasanaeth Ychwanegol hwn, oni bai ei bod yn angenrheidiol i’r holl ymarferwyr cyffredinol yn y fangre ymweld â chartrefi cleifion sydd eisoes wedi eu brysbennu.

en-gb	 21. 
cy-gb	 21. 

en-gb	The GMS contractor may use a multi- disciplinary team to support any GP on the premises. 
cy-gb	Caiff y contractwr GMC ddefnyddio tîm amlddisgyblaethol i gefnogi unrhyw ymarferydd cyffredinol yn y fangre. 

en-gb	Any member of the multi-disciplinary support team may work remotely and provide telephone or video consultations.
cy-gb	Caiff unrhyw aelod o’r tîm cymorth amlddisgyblaethol weithio o bell a darparu ymgyngoriadau dros y ffôn neu drwy fideo.

en-gb	The GMS contractor must not engage locum GPs to specifically deliver this Enhanced Service.
cy-gb	Ni chaiff y contractwr GMC gymryd ymlaen ymarferwyr cyffredinol locwm i gyflenwi’r Gwasanaeth Ychwanegol hwn yn benodol.

en-gb	The GMS contractor must ensure there are two reception staff on the surgery premises at all times during the hours which the surgery premises are open and operating this Enhanced Service.
cy-gb	Rhaid i’r contractwr GMC sicrhau bod dau aelod o staff y dderbynfa ym mangre’r feddygfa drwy’r amser yn ystod yr oriau pan fydd mangre’ r feddygfa ar agor ac yn gweithredu ’r Gwasanaeth Ychwanegol hwn.

en-gb	 24. 
cy-gb	 24. 

en-gb	The GMS contractor must consider how a chaperone would be provided if required in a consultation.
cy-gb	Rhaid i’r contractwr GMC ystyried sut y byddai modd darparu hebryngwr pe bai’n ofynnol cael un mewn ymgynghoriad.

en-gb	Payment
cy-gb	Taliad

en-gb	 25. 
cy-gb	 25. 

en-gb	A GMS contractor opting to provide this Enhanced Service will be eligible for the following payments —
cy-gb	Bydd contractwr GMC sy’n  dewis darparu’r Gwasanaeth Ychwanegol hwn yn gymwys i gael y taliadau a ganlyn —

en-gb	(a) £275 for every 1000 patients list size per day for each full day on the Bank Holidays specified in paragraphs 13 and 15, and
cy-gb	(a) £275 y dydd am bob 1000 o gleifion ar ei restr cleifion am bob diwrnod llawn ar y Gwyliau Banc a bennir ym mharagraffau 13 a 15, a

en-gb	(b) £150 for every 1000 patients list size per day for each half day on the Saturday and Sunday specified in paragraph 14.
cy-gb	(b) £150 y dydd am bob 1000 o gleifion ar ei restr cleifion am bob hanner diwrnod ar y dydd Sadwrn a’r dydd Sul a bennir ym mharagraff 14.

en-gb	10
cy-gb	10

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-06-22 Status: 
cy-gb	2020-06-23 Status: 

en-gb	 This is the original version (as it was originally made). 
cy-gb	 This is the original version (as it was originally made). 

en-gb	This item of legislation is currently only available in its original format.
cy-gb	This item of legislation is currently only available in its original format.

en-gb	Document Generated: 
cy-gb	Document Generated: 

en-gb	2020-06-23
cy-gb	2020-06-23

en-gb	Status: 
cy-gb	Status: 

en-gb	 This is the original version (as it was originally made). 
cy-gb	 This is the original version (as it was originally made). 

en-gb	This item of legislation is currently only available in its original format.
cy-gb	This item of legislation is currently only available in its original format.

en-gb	Status: 
cy-gb	Status: 

en-gb	 This is the original version (as it was originally made). 
cy-gb	 This is the original version (as it was originally made). 

en-gb	This item of legislation is currently only available in its original format.
cy-gb	This item of legislation is currently only available in its original format.

en-gb	WELSH STATUTORY INSTRUMENTS
cy-gb	OFFERYNNAU STATUDOL CYMRU

en-gb	2020 No. 574 (W. 132)
cy-gb	2020 Rhif 574 (Cy. 132)

en-gb	PUBLIC HEALTH, WALES
cy-gb	IECHYD Y CYHOEDD, CYMRU

en-gb	The Health Protection (Coronavirus,
cy-gb	Rheoliadau Diogelu Iechyd (Coronafeirws,

en-gb	International Travel) (Wales) Regulations 2020
cy-gb	Teithio Rhyngwladol) (Cymru) 2020

en-gb	Made       -      -      -      -
cy-gb	Gwnaed       -      -      -      -

en-gb	5th June 2020
cy-gb	5 Mehefin 2020

en-gb	Laid before Senedd Cymru 
cy-gb	Gosodwyd gerbron Senedd Cymru       -      -      -      -

en-gb	at 11.00 a.m. on 8 June 2020
cy-gb	am 11.00 a.m. ar 8 Mehefin 2020

en-gb	Coming into force       -      -
cy-gb	Yn dod i rym       -      -

en-gb	at 12.01 a.m. on 8 June 2020
cy-gb	am 12.01 a.m. ar 8 Mehefin 2020

en-gb	The Welsh Ministers, in exercise of the powers conferred by sections 45B, 45F(2) and 45P(2) of the Public Health (Control of Disease) Act 1984( 1 ), make the following Regulations.
cy-gb	Mae Gweinidogion Cymru, drwy arfer y pwerau a roddir gan adrannau 45B, 45F(2) a 45P(2) o Ddeddf Iechyd y Cyhoedd (Rheoli Clefydau) 1984( 1 ), yn gwneud y Rheoliadau a ganlyn.

en-gb	PART 1
cy-gb	RHAN 1

en-gb	General
cy-gb	Cyffredinol

en-gb	Title and coming into force
cy-gb	Enwi a dod i rym

en-gb	1. —(1)  The title of these Regulations is the Health Protection (Coronavirus, International Travel) (Wales) Regulations 2020.
cy-gb	1. —(1)  Enw’r Rheoliadau hyn yw Rheoliadau Diogelu Iechyd (Coronafeirws, Teithio Rhyngwladol) (Cymru) 2020.

en-gb	(2)  These Regulations come into force at 12.01 a.m. on 8 June 2020.
cy-gb	(2)  Daw’r Rheoliadau hyn i rym am 12.01 a.m. ar 8 Mehefin 2020.

en-gb	General interpretation
cy-gb	Dehongli cyffredinol

en-gb	2. —(1)  In these Regulations –“coronavirus” (“ coronafeirws ”) means severe acute respiratory syndrome coronavirus 2 (SARS-Cov-2);
cy-gb	2. —(1)  Yn y Rheoliadau hyn— ystyr “coronafeirws” (“ coronavirus ”) yw coronafeirws syndrom anadlol acíwt difrifol 2 (SARS-Cov-2);

en-gb	“child” (“ plentyn ”) means a person under 18 years of age and any reference to an “adult” (“ oedolyn ”) is to be interpreted accordingly;
cy-gb	mae i “y Deddfau Mewnfudo” yr ystyr a roddir i “the Immigration Acts” yn adran 61 o Ddeddf Ffiniau’r DU 2007( 2 );

en-gb	“Immigration Acts” (“ y Deddfau Mewnfudo ”) has the meaning given by section 61 of the UK Borders Act 2007( 2 );
cy-gb	mae i “gwybodaeth am deithiwr” (“ passenger information”)  yr ystyr a roddir gan reoliad 4(1);

en-gb	1984 c. 
cy-gb	1984 p. 

en-gb	22 . 
cy-gb	22 . 

en-gb	Part 2A was inserted by section 129 of the Health and Social Care Act 2008 (c. 
cy-gb	Mewnosodwyd Rhan 2A gan adran 129 o Ddeddf Iechyd a Gofal Cymdeithasol 2008 (p. 

en-gb	14) .
cy-gb	14) .

en-gb	2007 c. 
cy-gb	2007 p. 

en-gb	30 . 
cy-gb	30 . 

en-gb	Section 61 was amended by section 73(5) of the Immigration Act 2014 (c. 
cy-gb	Diwygiwyd adran 61 gan adran 73(5) o Ddeddf Mewnfudo 2014 (p. 

en-gb	22)  and section 92(5) of the Immigration Act 2016 (c. 
cy-gb	22)  ac adran 92(5) o Ddeddf Mewnfudo 2016 (p. 

en-gb	19) .
cy-gb	19) .

en-gb	“premises” (“ mangre ”) includes any garden, yard, passage, stair, garage, outhouse, or other appurtenance of such premises.
cy-gb	mae “mangre” (“ premises ”) yn cynnwys unrhyw ardd, iard, tramwyfa, gris, garej, tŷ allan, neu unrhyw atodyn i fangre o’r fath; 

en-gb	“immigration officer” (“ swyddog mewnfudo ”) means a person appointed by the Secretary of State as an immigration officer under paragraph 1 of Schedule 2 to the Immigration Act 1971( 3 );
cy-gb	ystyr “swyddog mewnfudo” (“ immigration officer ”) yw person sydd wedi ei benodi yn swyddog mewnfudo gan yr Ysgrifennydd Gwladol o dan baragraff 1 o Atodlen 2 i Ddeddf Mewnfudo 1971( 3 ).

en-gb	(2)  For the purpose of these Regulations, a person has responsibility for a child if—the person has custody or charge of the child, or
cy-gb	(2)  At ddibenion y Rheoliadau hyn, mae gan berson gyfrifoldeb am blentyn os oes gan y person— (a) gwarchodaeth neu ofal am y plentyn, neu

en-gb	the person has parental responsibility for the child (within the meaning of the Children Act 1989)( 4 ).
cy-gb	(b) cyfrifoldeb rhiant am y plentyn (o fewn ystyr Deddf Plant 1989)( 4 ).

en-gb	In these Regulations— “aircraft” (“ awyren ”)( 5 );
cy-gb	Yn y Rheoliadau hyn, mae i—“awyren”( 6 );

en-gb	“the common travel area” (“ yr ardal deithio gyffredin ”)( 6 );
cy-gb	“yr ardal deithio gyffredin”( 5 );

en-gb	“ship” (“ llong ”)( 8 ), have the same meaning as they have in the Immigration Act 1971.
cy-gb	“porthladd”( 8 ), yr un ystyr ag a roddir i “the common travel area”, “aircraft”, “ship” a “port” yn Neddf Mewnfudo 1971.

en-gb	PART 2
cy-gb	RHAN 2

en-gb	Requirement to provide information
cy-gb	Gofyniad i ddarparu gwybodaeth

en-gb	Persons arriving from outside the common travel area
cy-gb	Personau sy’n cyrraedd o’r tu allan i’r ardal deithio gyffredin

en-gb	3. —(1)  In this Part, references to “P” are to—
cy-gb	3. —(1)  Yn y Rhan hon mae cyfeiriadau at “P” yn gyfeiriadau at—

en-gb	a person who arrives in Wales by ship or aircraft from a place outside the common travel area, or
cy-gb	person sy’n cyrraedd Cymru ar long neu awyren o fan y tu allan i’r ardal deithio gyffredin, neu

en-gb	a person who—
cy-gb	person—

en-gb	arrives in Wales by ship or aircraft from the Republic of Ireland, the Channel Islands or the Isle of Man, and
cy-gb	sy’n cyrraedd Cymru ar long neu awyren o Weriniaeth Iwerddon, Ynysoedd y Sianel, neu Ynys Manaw, ac

en-gb	has, within the period of 14 days ending with the person’s arrival, been in a place outside the common travel area.
cy-gb	sydd wedi bod mewn man y tu allan i’r ardal deithio gyffredin o fewn y cyfnod o 14 o ddiwrnodau sy’n dod i ben ar y diwrnod pan fo’r person yn cyrraedd.

en-gb	(2)  But references to P do not include a person described in Part 1 of Schedule 2.
cy-gb	(2)  Ond nid yw cyfeiriadau at P yn cynnwys person a ddisgrifir yn Rhan 1 o Atodlen 2.

en-gb	Requirement to provide passenger information
cy-gb	Gofyniad i ddarparu gwybodaeth am deithiwr

en-gb	4. —(1)  P must submit the following information to the Secretary of State electronically as soon as reasonably practicable upon arriving in Wales, using a facility provided by the Secretary of State for this purpose—
cy-gb	4. —(1)  Rhaid i P gyflwyno’r wybodaeth ganlynol i’r Ysgrifennydd Gwladol yn electronig cyn gynted â bo’n rhesymol ymarferol ar ôl cyrraedd Cymru, gan ddefnyddio cyfleuster a ddarperir gan yr Ysgrifennydd Gwladol at y diben hwn—

en-gb	1971 c. 
cy-gb	1971 p. 

en-gb	77 . 
cy-gb	77 . 

en-gb	Paragraph 1 was amended by paragraph 3 of Schedule 3 to the Health Protection Agency Act 2004 (c. 
cy-gb	Diwygiwyd paragraff 1 gan baragraff 3 o Atodlen 3 i Ddeddf yr Asiantaeth Diogelu Iechyd 2004 (p. 

en-gb	17) , and by S.I. 
cy-gb	17) , a chan O.S. 

en-gb	1993/1813 .
cy-gb	1993/1813 .

en-gb	1989 c. 
cy-gb	1989 p. 

en-gb	41 .
cy-gb	41 .

en-gb	See section 33(1).
cy-gb	Gweler adran 33(1). 

en-gb	It provides that the United Kingdom, the Channel Islands, the Isle of Man, and the Republic of Ireland are collectively referred to in that Act as “the common travel area”.
cy-gb	Mae’n darparu y cyfeirir at y Deyrnas Unedig, Ynysoedd y Sianel, Ynys Manaw a Gweriniaeth Iwerddon gyda’i gilydd yn Neddf Mewnfudo 1971 fel “the common travel area”.

en-gb	See section 33(1).
cy-gb	( 7 ) Gweler adran 33(1).

en-gb	See section 33(1).
cy-gb	( 8 ) Gweler adran 33(1).

en-gb	P’s passenger information, and
cy-gb	gwybodaeth am deithiwr ar gyfer P, a

en-gb	where P arrives in Wales accompanied by a child for whom P has responsibility, the child’s passenger information.
cy-gb	pan fo P yn cyrraedd Cymru yng nghwmni plentyn y mae gan P gyfrifoldeb amdano, gwybodaeth am deithiwr ar gyfer y plentyn,

en-gb	Where P arrives in Wales at a port—
cy-gb	Pan fo P yn cyrraedd Cymru drwy borthladd--

en-gb	P must comply with paragraph (1) before leaving the port, and
cy-gb	rhaid i P gydymffurfio â pharagraff (1) cyn gadael y porthladd, a

en-gb	an immigration officer at the port must provide P with any assistance the officer considers necessary to enable P to comply with paragraph (1).
cy-gb	rhaid i swyddog mewnfudo yn y porthladd ddarparu P unrhyw gynhorthwy y mae’r swyddog yn ei ystyried yn angenrheidiol i alluogi P i gydymffurfio â pharagraff (1).

en-gb	P is not required to comply with paragraph (1) if the passenger information has, before P’sarrival in Wales, been provided electronically to the Secretary of State using a facility provided by the Secretary of State for this purpose.
cy-gb	Nid yw’n ofynnol i P gydymffurfio â pharagraff (1) os yw’r wybodaeth am deithiwr wediei darparu’n electronig i’r Ysgrifennydd Gwladol gan ddefnyddio cyfleuster a ddarparwyd gan yr Ysgrifennydd Gwladol at y diben hwnnw, cyn i P gyrraedd Cymru.

en-gb	But where paragraph (3) applies P must, if requested by an immigration officer to do so,provide the officer with evidence that the passenger information has been provided.
cy-gb	Ond pan fo paragraff (3) yn gymwys, rhaid i P ddarparu tystiolaeth i swyddog mewnfudo body wybodaeth am deithiwr wedi ei ddarparu, os gofynnir iddo wneud hynny gan y swyddog.

en-gb	Where P is a child in respect of whom passenger information has been provided by a personwith responsibility for P in accordance with paragraph (1)(b), P is not required by paragraph (1)(a) to provide P’s passenger information.
cy-gb	Pan fo P yn blentyn y mae gwybodaeth am deithiwr mewn cysylltiad ag ef wedi ei darparu ganberson sydd â chyfrifoldeb am P, yn unol â pharagraff (1)(b), nid yw paragraff (1)(a) yn ei gwneud hi’n ofynnol i P ddarparu gwybodaeth am deithiwr ar gyfer P.

en-gb	Requirement to notify changes to passenger information
cy-gb	Gofyniad i hysbysu ynghylch newidiadau i wybodaeth am deithiwr

en-gb	5. —(1)  Paragraph (2) applies where—
cy-gb	5. —(1)  Mae paragraff (2) yn gymwys—

en-gb	(a) P is required by regulation 7 or 8 to reside in (and not leave or be outside of) premises until the end of the last day of P’s isolation (within the meaning given by regulation 12), and (b) before the end of that day, P’s passenger information changes.
cy-gb	pan fo’n ofynnol gan reoliad 7 neu 8 i P breswylio mewn mangre (ac i beidio â gadael y fangre na bod y tu allan iddi) tan ddiwedd diwrnod olaf ynysiad P (o fewn yr ystyr a roddir gan reoliad 12), a pan fo gwybodaeth am deithiwr ar gyfer P yn newid cyn diwedd y diwrnod hwnnw.

en-gb	Where this paragraph applies, P must provide updated passenger information to the Secretaryof State electronically as soon as is reasonably practicable, using a facility provided by the Secretary of State for this purpose.
cy-gb	Pan fo’r paragraff hwn yn gymwys, rhaid i P ddarparu i’r Ysgrifennydd Gwladol yn electronigwybodaeth am deithiwr sydd wedi ei diweddaru cyn gynted ag y bo’n resymol ymarferol, gan ddefnyddio’r cyfleuster a ddarperir gan yr Ysgrifennydd Gwladol at y diben hwnnw.

en-gb	Where P is a child for whom another person has responsibility—
cy-gb	Pan fo P yn blentyn y mae gan berson arall gyfrifoldeb amdano—

en-gb	P is not required to provide updated passenger information under paragraph (2), and
cy-gb	nid yw’n ofynnol i P ddarparu gwybodaeth am deithiwr sydd wedi ei diweddaru o dan baragraff (2), a

en-gb	the other person is required to provide the updated passenger information on behalf of P.
cy-gb	mae’n ofynnol i’r person arall, ar ran P, ddarparu’r wybodaeth am deithiwr sydd wedi ei ddiweddaru ar ran P.

en-gb	Passenger information not in a person’s possession or control
cy-gb	Gwybodaeth am deithiwr nad yw ym meddiant neu o dan reolaeth person

en-gb	6. 
cy-gb	6. 

en-gb	Nothing in regulation 4 or 5 requires a person to provide passenger information if the information is not within the person’s possession or under the person’s control.
cy-gb	Nid oes dim yn rheoliad 4 neu 5 sy’n ei gwneud yn ofynnol i berson ddarparu gwybodaeth am deithiwr nad yw ym meddiant y person neu o dan ei reolaeth.

en-gb	PART 3
cy-gb	RHAN 3

en-gb	Requirement to isolate etc.
cy-gb	Gofyniad i ynysu etc.

en-gb	Requirement to isolate: 
cy-gb	Gofyniad i ynysu: 

en-gb	arrivals from outside the United Kingdom
cy-gb	cyrraedd o fan y tu allan i’r Deyrnas Unedig

en-gb	7. —(1)  This regulation applies to a person (“P”)—
cy-gb	7. —(1)  Mae’r rheoliad hwn yn gymwys i berson (“P”)—

en-gb	who arrives in Wales by ship or aircraft from a place outside the common travel area, or
cy-gb	sy’n cyrraedd Cymru ar long neu awyren o fan y tu allan i’r ardal deithio gyffredin, neu

en-gb	who—
cy-gb	sydd —

en-gb	arrives in Wales by ship or aircraft from the Republic of Ireland, the Channel Islands or the Isle of Man, and
cy-gb	yn cyrraedd Cymru ar long neu awyren o Weriniaeth Iwerddon, Ynysoedd y Sianel neu Ynys Manaw, a

en-gb	has, within the period of 14 days ending with the day of P’s arrival in Wales, arrived in the common travel area from a place outside that area.
cy-gb	sydd, wedi cyrraedd yr ardal deithio gyffredin o fan y tu allan i’r ardal honno o fewn y cyfnod o 14 o ddiwrnodau sy’n dod i ben ar y diwrnod y mae P yn cyrraedd Cymru. 

en-gb	P must—
cy-gb	(2)  Rhaid i P—

en-gb	travel directly to specified premises in Wales suitable for P to reside in until the end of the last day of P’s isolation, or
cy-gb	teithio’n uniongyrchol i fangre benodol yng Nghymru sy’n addas i P breswylio ynddi tan ddiwedd diwrnod olaf ynysiad P, neu

en-gb	travel directly to a part of the United Kingdom other than Wales.
cy-gb	teithio’n uniongyrchol i ran o’r Deyrnas Unedig heblaw Cymru.

en-gb	Where P travels to specified premises in Wales to reside in, as required by paragraph (2)(a),P may not leave or be outside the premises before the end of the last day of P’s isolation unless—
cy-gb	Pan fo P yn teithio i fangre benodol yng Nghymru i breswylio ynddi, fel sy’n ofynnol ganbaragraff (2)(a), ni chaniateir i P adael na bod y tu allan i’r fangre cyn diwedd diwrnod olaf ynysiad P—

en-gb	authorised by regulation 10(4) (temporary departure from premises) to do so, or
cy-gb	onid yw wedi ei awdurdodi i wneud hynny gan reoliad 10(4) (gadael y fangre dros dro), neu

en-gb	this paragraph ceases to apply in relation to P by virtue of regulation 10(3) (leaving Wales). 
cy-gb	onid yw’r paragraff hwn yn peidio â bod yn gymwys mewn perthynas â P yn rhinwedd rheoliad 10(3) (gadael Cymru).

en-gb	(4)  For the purposes of paragraphs (2) and (3), the specified premises are—
cy-gb	At ddibenion paragraffau (2) a (3), y fangre benodol yw—

en-gb	(a) the premises specified in P’s passenger information as the premises at which P intends to reside for the purposes of this regulation (unless sub-paragraph (d) applies to P); 
cy-gb	y fangre a bennir yng ngwybodaeth am deithiwr P fel y fangre y mae P yn bwriadu preswylio ynddi at ddibenion y rheoliad hwn (oni bai fo is-baragraff (d) yn gymwys i P);

en-gb	(b) if P is a person described in—
cy-gb	pan fo P yn berson a ddisgrifir—

en-gb	paragraph 1(1)(a) to (k) of Schedule 2 who has not satisfied the conditions in paragraph 1(2) of that Schedule, or
cy-gb	ym mharagraff 1(1)(a) i (k) o Atodlen 2 nad yw wedi bodloni’r amodau ym mharagraff 1(2) o’r Atodlen honno, neu

en-gb	paragraph 1(1)(l) of that Schedule, premises at which P intends to reside for the purposes of this regulation;
cy-gb	paragraff 1(1)(l) o’r Atodlen honno, mangre y mae P yn bwriadu preswylio ynddi at ddibenion y rheoliad hwn;

en-gb	if P’s passenger information does not specify premises at which P intends to reside for the purposes of this regulation, the premises arranged by P under paragraph (5);
cy-gb	pan na fo gwybodaeth am deithiwr P yn pennu’r fangre y mae P yn bwriadu preswylio ynddi at ddibenion y rheoliad hwn, y fangre a drefnwyd gan P o dan baragraff (5);

en-gb	if P is subject to a requirement imposed under or by virtue of the Immigration Acts to reside at particular premises in Wales, those premises.
cy-gb	pan fo P yn ddarostyngedig i ofyniad a osodir o dan neu yn rhinwedd y Deddfau Mewnfudo i breswylio mewn mangre arbennig yng Nghymru, y fangre honno.

en-gb	Where P’s passenger information does not specify premises at which P intends to reside forthe purposes of this regulation, P must, as soon as is reasonably practicable—
cy-gb	Pan na fo gwybodaeth am deithiwr P yn pennu’r fangre y mae P yn bwriadu preswylio ynddiat ddibenion y rheoliad hwn, rhaid i P—

en-gb	make arrangements to reside at premises in Wales suitable for P to reside in until the end of the last day of P’s isolation, and
cy-gb	wneud trefniadau cyn gynted a bo’n rhesymol ymarferol i breswylio mewn mangre yng Nghymru tan ddiwedd diwrnod olaf ynysiad P, a

en-gb	notify the Secretary of State of the address of those premises electronically using a facility provided by the Secretary of State for this purpose.
cy-gb	hysbysu’r Ysgrifennydd Gwladol yn electronig cyn gynted ag y bo’n rhesymol ymarferol o gyfeiriad y fangre honno gan ddefnyddio cyfleuster a ddarparwyd gan yr Ysgrifennydd Gwladol at y diben hwnnw.

en-gb	But where P arrived in Wales at a port, P must comply with the requirements of paragraph (5) before leaving the port.
cy-gb	Ond pan fo P wedi cyrraedd Cymru drwy borthladd, rhaid i P gydymffurfio ậ gofynionparagraff (5) cyn i P adael y porthladd.

en-gb	Where paragraph (5) applies, the Welsh Ministers must provide or secure the provision ofsuch assistance as they consider necessary (if any) to ensure P is able to make the arrangements mentioned in paragraph (5)(a).
cy-gb	Pan fo paragraff (5) yn gymwys, rhaid i Weinidogion Cymru ddarparu’r cynorthwy, neudrefnu darpariaeth o’r cynhorthwy, y maent yn ystyried yn angenrheidiol (os o gwbl) i sicrhau y gall P wneud y trefniadau a grybwyllir ym mharagraff (5)(a).

en-gb	Requirement to isolate: 
cy-gb	Gofyniad i ynysu: 

en-gb	arrivals from another part of the United Kingdom
cy-gb	cyrraedd o ran arall o’r Deyrnas Unedig

en-gb	8. —(1)  This regulation applies to a person (“P”) —who arrives in Wales from elsewhere in the United Kingdom, and
cy-gb	8. —(1)  Mae’r rheoliad hwn yn gymwys i berson (“P”)— (a) sy’n cyrraedd Cymru o rywle arall yn y Deyrnas Unedig, a

en-gb	has within the period of 14 days ending with the day of P’s arrival in Wales, arrived in the common travel area from a place outside that area.
cy-gb	(b) sydd o fewn y cyfnod o 14 o diwrnod sy’n dod i ben ar y diwrnod y mae P yn cyrraedd Cymru wedi cyrraedd yr ardal deithio gyffredin o fan y tu allan i‘r ardal honno;

en-gb	But references to P do not include— (a) a person—
cy-gb	Ond nid yw cyfeiriadau at P yn cynnwys— (a) person—

en-gb	who arrives in Wales for the purpose of returning to the premises in Wales at which the person is residing for the purposes of regulation 7(3), and
cy-gb	sy’n cyrraedd Cymru at ddiben dychwelyd i’r fangre yng Nghymru y mae’r person yn preswylio ynddi at ddibenion rheoliad 7(3));

en-gb	who left Wales temporarily, for one or more of the reasons authorised by regulation 10(4);
cy-gb	person a adawodd Cymru dros dro, am un neu ragor o’r resymau a awdurdodir yn rheoliad 10(4);

en-gb	(b) a person—
cy-gb	person—

en-gb	who is required to reside at premises elsewhere in the United Kingdom by provision in Regulations made as respects England, Scotland or Northern Ireland (as the case may be) that are equivalent to these Regulations,
cy-gb	y mae’n ofynnol iddo breswylio mewn mangre yn rhywle arall yn y Deyrnas Unedig o dan ddarpariaeth mewn Rheoliadau a wneir mewn perthynas â Lloegr, yr Alban neu Ogledd Iwerddon (yn ôl y digwydd) sy’n cyfateb i’r Rheoliadau hyn,

en-gb	who is permitted to leave that other part of the United Kingdom temporarily by virtue of those Regulations, and
cy-gb	y caniateir iddo adael y rhan arall honno o’r Deyrnas Unedig dros dro yn rhinwedd y Rheoliadau hynny, a

en-gb	who remains in Wales for no longer than is necessary.
cy-gb	sy’n aros yng Nghymru am ddim hwy nag sy’n angenrheidiol.

en-gb	P must—
cy-gb	O ran P—

en-gb	travel directly to premises in Wales that are suitable for P to reside in until the end of the last day of P’s isolation, and
cy-gb	rhaid iddo deithio’n uniongyrchol i fangre yng Nghymru sy’n addas i P breswylio ynddi tan ddiwedd diwrnod olaf ynysiad P, a

en-gb	may not leave or be outside the premises before the end of the last day of P’s isolation unless—
cy-gb	ni chaiff adael y fangre na bod y tu allan iddi cyn diwedd diwrnod olaf ynysiad P—

en-gb	authorised by regulation 10(4) (temporary departure from premises) to do so, or
cy-gb	onid yw wedi ei awdurdodi gan reoliad 10(4) (bod y tu allan i fangre am gyhyd ag y bo’n angenrheidiol) i wneud hynny, neu

en-gb	this paragraph ceases to apply in relation to P by virtue of regulation 10(3) (leaving Wales).
cy-gb	onid yw’r paragraff hwn yn peidio â bod yn gymwys mewn perthynas â P yn rhinwedd rheoliad 10(3) (gadael Cymru).

en-gb	P must also—before arriving in Wales, or
cy-gb	Rhaid i P hefyd— (a) cyn cyrraedd Cymru, neu

en-gb	as soon as practicable after arriving, notify the Secretary of State of the address of the premises at which P intends to reside for the purposes of paragraph (3) electronically using a facility provided by the Secretary of State for this purpose.
cy-gb	cyn gynted ag y bo’n ymarferol ar ôl cyrraedd Cymru, hysbysu’r Ysgrifennydd Gwladol yn electronig am gyfeiriad y fangre y mae P yn bwriadu preswylio ynddi at ddibenion paragraff (3) gan ddefnyddio cyfleuster a ddarperir gan yr Ysgrifennydd Gwladol at y diben hwnnw.

en-gb	Isolation requirements: 
cy-gb	Gofynion ynysu: 

en-gb	exemptions
cy-gb	esemptiadau

en-gb	9. 
cy-gb	9. 

en-gb	Regulations 7 and 8 do not apply to a person described in —
cy-gb	Nid yw rheoliad 7 ac 8 yn gymwys i berson a ddisgrifir—

en-gb	paragraph 1(1)(a) to (k) of Schedule 2 who satisfies the conditions in paragraph 2 of that Schedule;
cy-gb	ym mharagraff 1(1)(a) i (k) o Atodlen 2 sy’n bodloni’r amodau ym mharagraff 2 o’r Atodlen honno;

en-gb	paragraphs 2 to 36 of Schedule 2.
cy-gb	ym mharagraffau 2 i 36 o Atodlen 2.

en-gb	Isolation requirements: 
cy-gb	Gofynion ynysu: 

en-gb	exceptions
cy-gb	eithriadau

en-gb	10. —(1)  This regulation applies where a person (“P”) is required to reside in (and not leave or be outside of) premises in Wales by an isolation requirement.
cy-gb	10. —(1)  Mae’r rheoliad hwn yn gymwys pan fo gofyniad i ynysu yn ei gwneud yn ofynnol i berson (“P”) breswylio mewn mangre (a pheidio â gadael y fangre na bod y tu allan iddi) yng Nghymru.

en-gb	“Isolation requirement” in relation to P means a requirement imposed by— (a) regulation 7(3);
cy-gb	Ystyr “gofyniad i ynysu” mewn perthynas â P yw gofyniad a osodir gan— (a) rheoliad 7(3); 

en-gb	(b) regulation 8(3)(b).
cy-gb	(b) rheoliad 8(3)(b).

en-gb	An isolation requirement ceases to apply in relation to P if P leaves Wales, unless P istemporarily outside Wales for a purpose authorised by paragraph (4)(b) to (j).
cy-gb	Mae gofyniad i ynysu yn peidio â bod yn gymwys mewn perthynas â P os yw P yn gadaelCymru, onid yw P y tu allan i’r Deyrnas Unedig dros dro at ddiben a awdurdodir gan baragraff (4)i (j).

en-gb	P may leave and be outside of the premises for as long as is necessary—
cy-gb	(4)  Caniateir i P adael y fangre a bod y tu allan iddi am gyhyd ag y bo’n angenrheidiol—

en-gb	to travel for the purpose of leaving Wales in the manner described by paragraph (3);
cy-gb	i deithio at ddibenion gadael Cymru yn y modd a ddisgrifir gan baragraff (3);

en-gb	to obtain basic necessities (including for other persons at the premises or any pets at the premises), where it is not possible or practicable—
cy-gb	i gael angenrheidiau sylfaenol (gan gynnwys ar gyfer personau eraill yn y fangre neu unrhyw anifeiliaid anwes yn y fangre), pan na fo’n bosibl neu’n ymarferol—

en-gb	for another person at the premises to obtain them on P’s behalf, or
cy-gb	i berson arall yn y fangre eu cael ar ran P, neu

en-gb	to obtain them by delivery to the premises from a third party;
cy-gb	eu cael drwy ddanfoniad i’r fangre gan drydydd parti;

en-gb	to seek medical assistance, where this is required urgently or on the advice of a registered medical practitioner;
cy-gb	i geisio cynhorthwy meddygol, pan fo angen y cynhorthwy hwnnw ar frys neu yn unol â chyngor ymarferydd meddygol cofrestredig;

en-gb	to receive a health service provided by a registered medical practitioner, where the provision of the service was arranged before P’s arrival in the United Kingdom;
cy-gb	i gael gwasanaeth iechyd a ddarperir gan ymarferydd meddygol cofrestredig, pan fo trefniadau wedi eu gwneud i ddarparu’r gwasanaeth cyn i P gyrraedd y Deyrnas Unedig;

en-gb	to assist a person receiving a health service described in paragraph (d), or to accompany that person if P is a child for whom the person has responsibility;
cy-gb	i gynorthwyo person sy’n derbyn gwasanaeth iechyd a ddisgrifir ym mharagraff (d), neu i fod gyda’r person hwnnw os yw P yn blentyn y mae gan y person hwnnw gyfrifoldeb amdano;

en-gb	to access veterinary services where—
cy-gb	i gael gafael ar wasanaethau milfeddygol—

en-gb	they are required urgently for a pet at the premises, and
cy-gb	pan fo angen y gwasanaethau hynny ar fyrder ar gyfer anifail anwes yn y fangre, a

en-gb	it is not possible for another person at the premises to access those services;
cy-gb	pan na fo’n bosibl i berson arall yn y fangre gael mynediad i’r gwasanaethau hynny;

en-gb	to carry out specified activities in relation to edible horticulture, but only if P is residing at the premises in connection with those activities;
cy-gb	i wneud gweithgareddau penodedig mewn perthynas â garddwriaeth fwytadwy, ond dim ond os yw P yn preswylio yn y fangre mewn cysylltiad â’r gweithgareddau hynny;

en-gb	to avoid illness or injury or to escape a risk of harm;
cy-gb	i osgoi salwch neu anaf neu i ddianc rhag risg o niwed;

en-gb	to fulfil a legal obligation, including attending court or satisfying bail conditions, or to participate in legal proceedings;
cy-gb	i fodloni rhwymedigaeth gyfreithiol, gan gynnwys mynd i’r llys neu fodloni amodau mechnïaeth, neu i gymryd rhan mewn achos cyfreithiol;

en-gb	to access public services (including social services or victims’ services) where—access to the service is critical to P’s well-being, and
cy-gb	i gael gafael ar wasanaethau cyhoeddus (gan gynnwys gwasanaethau cymdeithasol neu wasanaethau i ddioddefwyr)—pan fo cael gafael ar y gwasanaeth yn hanfodol i lesiant P, a

en-gb	the service cannot be provided if P remains at the premises; 
cy-gb	pan na ellir darparu’r gwasanaeth os yw P yn aros yn y fangre; 

en-gb	(k) for compassionate reasons, including to attend the funeral of—
cy-gb	(k) am resymau tosturiol, gan gynnwys i fynd i angladd—

en-gb	(i) a member of P’s family; 
cy-gb	(i) aelod o deulu P; 

en-gb	(ii) a close friend.
cy-gb	(ii) ffrind agos.

en-gb	Where—
cy-gb	O ran P—

en-gb	a legal obligation requires P to change the premises at which P resides for the purpose of an isolation requirement, or
cy-gb	pan fo rhwymedigaeth gyfreithiol yn ei gwneud yn ofynnol i P newid y fangre y mae’n preswylio ynddi at ddiben gofyniad i ynysu, neu

en-gb	P is otherwise unable to remain at the premises at which P is residing for the purpose of an isolation requirement,
cy-gb	pan na fo P fel arall yn gallu aros yn y fangre y mae P yn preswylio ynddi at ddiben gofyniad i ynysu,

en-gb	P may travel directly to alternative premises in Wales that are suitable for P to reside in until the end of the last day of P’s isolation; 
cy-gb	caiff P deithio’n uniongyrchol i fangre arall yng Nghymru sy’n addas i P breswylio ynddi tan ddiwedd diwrnod olaf ynysiad P; 

en-gb	and references in this Part to premises, in relation to an isolation requirement, are to be read accordingly.
cy-gb	ac mae cyfeiriadau yn y Rhan hon at fangre, mewn perthynas â gofyniad i ynysu, i’w darllen yn unol â hynny.

en-gb	Where paragraph (5) applies, P must notify the Secretary of State of the address of thealternative premises electronically as soon as is reasonably practicable using a facility provided by the Secretary of State for this purpose.
cy-gb	Pan fo paragraff (5) yn gymwys, rhaid i P hysbysu’r Ysgrifennydd Gwladol yn electronigam gyfeiriad y fangre arall cyn gynted ag y bo’n rhesymol ymarferol gan ddefnyddio cyfleuster a ddarparwyd gan yr Ysgrifennydd Gwladol at y diben hwnnw.

en-gb	An isolation requirement does not apply in relation to any period during which P is—
cy-gb	Nid yw gofyniad i ynysu yn gymwys mewn perthynas ag unrhyw gyfnod pan fo P—

en-gb	removed to, directed to go to or directed to remain at a place by an immigration officer, constable or public health officer under Schedule 21 to the Coronavirus Act 2020( 9 ); 
cy-gb	wedi ei symud ymaith i le, wedi ei gyfarwyddo i fynd i le neu wedi ei gyfarwyddo i aros mewn lle gan swyddog mewnfudo, cwnstabl neu swyddog iechyd y cyhoedd o dan Atodlen 21 i Ddeddf y Coronafeirws 2020( 9 );

en-gb	(b) detained at a place by virtue of a requirement imposed under the Immigration Acts.
cy-gb	wedi ei gadw mewn lle yn rhinwedd gofyniad a osodir o dan y Deddfau Mewnfudo.

en-gb	For the purposes of this regulation—“edible horticulture” (“ garddwriaeth fwytadwy ”) means growing—
cy-gb	At ddibenion y rheoliad hwn— ystyr “garddwriaeth fwytadwy” (“ edible horticulture ” ) yw tyfu—

en-gb	protected vegetables grown in glasshouse systems,
cy-gb	llysiau wedi eu diogelu a dyfir mewn systemau tai gwydr,

en-gb	field vegetables grown outdoors, including vegetables, herbs, leafy salads and potatoes,
cy-gb	llysiau maes a dyfir yn yr awyr agored, gan gynnwys llysiau, perlysiau, salad deiliog a thatws,

en-gb	soft fruit grown outdoors or under cover,
cy-gb	ffrwythau meddal a dyfir yn yr awyr agored neu o dan orchudd,

en-gb	trees that bear fruit, (v) vines and bines, or
cy-gb	coed sy’n dwyn ffrwyth,gwinwydd a choesynnau, neu

en-gb	(vi) mushrooms;
cy-gb	madarch;

en-gb	“health service” (“ gwasanaeth iechyd ”) means a service provided for or in connection with—
cy-gb	ystyr “gwasanaeth iechyd” (“ health service ”) yw gwasanaeth a ddarperir ar gyfer y canlynol neu mewn cysylltiad â’r canlynol—

en-gb	the prevention, diagnosis or treatment of illness, or
cy-gb	atal salwch, gwneud diagnosis o salwch neu ei drin, neu

en-gb	the promotion or protection of public health;
cy-gb	hybu neu warchod iechyd y cyhoedd; 

en-gb	“registered medical practitioner” (“ ymarferydd meddygol cofrestredig ”) means a fully registered person within the meaning of the Medical Act 1983( 10 ) who holds a licence to practise under that Act;
cy-gb	ystyr “ymarferydd meddygol cofrestredig” (“ registered medical practitioner ”) yw person sydd wedi ei gofrestri’n llawn o fewn yr ystyr a roddir i “fully registered” yn Neddf Meddygol 1983( 10 ) sydd yn dal trwydded i ymarfer o dan y Ddeddf honno; 

en-gb	“specified activities” (“ gweithgareddau penodedig ”), in relation to edible horticulture, means—
cy-gb	ystyr “gweithgareddau penodedig” (“ specified activities ”), mewn perthynas â garddwriaeth fwytadwy, yw—

en-gb	crop maintenance,
cy-gb	cynnal a chadw cnydau,

en-gb	crop harvesting,
cy-gb	cynaeafu cnydau,

en-gb	tunnel construction and dismantling,
cy-gb	codi twneli a’u datgymalu,

en-gb	irrigation installation and maintaining,
cy-gb	gosod dulliau dyfrhau a’u cynnal,

en-gb	crop husbandry,
cy-gb	hwsmonaeth cnydau,

en-gb	packing and processing of crops on employers premises,
cy-gb	pacio a phrosesu cnydau ar fangreoedd cyflogwyr,

en-gb	preparing and dismantling growing areas and media,
cy-gb	paratoi mannau a chyfryngau tyfu a’u datgymalu,

en-gb	general primary production work in edible horticulture,
cy-gb	gwaith cynhyrchu sylfaenol cyffredinol mewn garddwriaeth fwytadwy,

en-gb	activities relating to supervising teams of horticulture workers.
cy-gb	gweithgareddau sy’n ymwneud â goruchwylio timau o weithwyr garddwriaeth.

en-gb	Requirement on persons with responsibility for children
cy-gb	Gofyniad ar bersonau sydd â chyfrifoldeb am blentyn

en-gb	11. 
cy-gb	11. 

en-gb	Where a requirement is imposed under regulation 7, 8 or 10 on a child, a person with responsibility for the child must take all reasonable measures to ensure that the child complies with the requirement.
cy-gb	Pan osodir gofyniad ar blentyn o dan reoliad 7, 8 neu 10, rhaid i berson sydd â chyfrifoldeb am y plentyn gymryd pob mesur rhesymol i sicrhau bod y plentyn yn cydymffurfio â’r gofyniad.

en-gb	Last day of isolation
cy-gb	Diwrnod olaf yr ynysu

en-gb	12. 
cy-gb	12. 

en-gb	For the purposes of regulations 7, 8 and 10, the last day of P’s isolation is the last day of the period of 14 days beginning with the day on which P arrived in the common travel area from a place outside that area.
cy-gb	At ddibenion rheoliadau 7, 8 a 10, diwrnod olaf ynysiad P yw diwrnod olaf y cyfnod o 14 o ddiwrnodau sy’n dechrau ar y diwrnod y cyrhaeddodd P yn yr ardal deithio cyffredin o fan y tu allan i’r ardal honno.

en-gb	PART 4
cy-gb	Rhan 4

en-gb	Enforcement and offences
cy-gb	Gorfodi a Throseddau

en-gb	Enforcement of requirement to isolate
cy-gb	Gorfodi gofyniad i ynysu

en-gb	13. —(1)  Where a constable has reasonable grounds for suspecting that a person (“P”) is contravening regulation 7(3) or 8(3)(b), the constable may— (a) direct P to return to the premises where P is residing,
cy-gb	13. —(1)  Pan fo gan gwnstabl sail resymol dros amau bod person (“P”) yn torri rheoliad 7(3) neu 8(3)(b), caiff y cwnstabl—cyfarwyddo P i ddychwelyd i’r fangre y mae P yn preswylio ynddi,

en-gb	remove P to the premises, or
cy-gb	symud P ymaith i’r fangre, neu

en-gb	where it is not practicable or appropriate in the circumstances to take the action in subparagraph (a) or (b), remove P to premises secured by the Welsh Ministers which are suitable for P to reside in for the purposes of regulation 7(3) or 8(3)(b).
cy-gb	pan na fo’n ymarferol neu’n briodol cymryd y cam yn is-baragraff (a) neu (b) o dan yr amgylchiadau, symud P ymaith i fangre wedi’i threfnu gan Weinidogion Cymru sy’n addas i P breswylio ynddi at ddibenion rheoliad 7(3) neu 8(3)(b).

en-gb	A constable exercising the power in paragraph (1)(b) or (c) may use reasonable force, ifnecessary, in the exercise of the power.
cy-gb	Caiff cwnstabl sy’n arfer y pŵer ym mharagraff (1)(b) neu (c) ddefnyddio grym rhesymol,os yw hynny’n angenrheidiol, wrth arfer y pŵer.

en-gb	Where P is a child accompanied by a person who has responsibility for the child—
cy-gb	Pan fo P yn blentyn yng nghwmni person sydd â chyfrifoldeb am y plentyn—

en-gb	the constable may direct the person with that responsibility to take the child to the premises where the child is residing, and
cy-gb	caiff y cwnstabl gyfarwyddo’r person â’r cyfrifoldeb hwnnw i fynd â’r plentyn i’r fangre y mae’r plentyn yn preswylio ynddi, a

en-gb	the person must, so far as reasonably practicable, ensure that the child complies with any direction or instruction given by the constable to the child.
cy-gb	rhaid i’r person, i’r graddau y bo’n rhesymol ymarferol, sicrhau bod y plentyn yn cydymffurfio ag unrhyw gyfarwyddyd neu gyfarwyddiad a roddir gan y cwnstabl i’r plentyn.

en-gb	A constable may take such other action as the constable considers necessary and proportionateto facilitate the exercise of a power conferred on the constable by this regulation.
cy-gb	Caiff cwnstabl gymryd unrhyw gamau eraill y mae’r cwnstabl yn ystyried eu bod yn angenrheidiol ac yn gymesur i hwyluso arfer pŵer a roddir i’r cwnstabl gan y rheoliad hwn.

en-gb	A constable may not exercise a power conferred on the constable by this regulation unlessthe constable considers that it is necessary and proportionate to do so.
cy-gb	Ni chaiff cwnstabl arfer pŵer a roddir i’r cwnstabl gan y rheoliad hwn oni fo’r cwnstabl ynystyried ei bod yn angenrheidiol ac yn gymesur gwneud hynny.

en-gb	Offences
cy-gb	Troseddau

en-gb	14. —(1)  An adult who contravenes a requirement in regulation— (a) 4(1) or (4),
cy-gb	14. —(1)  Mae oedolyn sy’n torri gofyniad yn rheoliad —4(1) neu (4),

en-gb	5(2),
cy-gb	5(2),

en-gb	7(2), (3) or (5),
cy-gb	7(2), (3) neu (5),

en-gb	8(3) or (4),
cy-gb	8(3) neu (4),

en-gb	10(6), or
cy-gb	10(6), neu

en-gb	11, commits an offence.
cy-gb	11 yn cyflawni trosedd.

en-gb	It is an offence for an adult to provide false or misleading information to the Secretary of
cy-gb	Mae’n drosedd i oedolyn ddarparu gwybodaeth anwir neu gamarweiniol i’r Ysgrifennydd

en-gb	State for the purposes of regulation 4, 5, 7(5), 8(4) or 10(6) where— (a) the person knows the information is false or misleading, or(b) the person is reckless as to whether the information is false or misleading.
cy-gb	Gwladol at ddibenion rheoliad 4, 5, 7(5), 8(4) neu 10(6)—pan fo’r person yn gwybod bod yr wybodaeth yn anwir neu’n gamarweiniol, neu (b) pan fo’r person yn ddi-hid ynghylch pa un a yw’n anwir neu’n gamarweiniol.

en-gb	An adult who fails to comply with a direction given by a constable under regulation 13 commits an offence.
cy-gb	Mae oedolyn sy’n methu cydymffurfio â chyfarwyddyd a roddir gan gwnstabl o dan reoliad13 yn cyflawni trosedd.

en-gb	An adult who intentionally obstructs any person exercising functions under these Regulationscommits an offence.
cy-gb	Mae oedolyn sy’n rhwystro yn fwriadol unrhyw berson sy’n arfer swyddogaethau o dan yrrheoliadau yma yn cyflawni trosedd.

en-gb	It is a defence to a charge of committing an offence under paragraph (1) or (3) to show thatthe person had a reasonable excuse for the contravention, or failure to comply, in question.
cy-gb	Mae’n amddiffyniad i gyhuddiad o gyflawni trosedd o dan baragraff (1) neu (3) i ddangosbod gan y person esgus rhesymol dros dorri’r gofyniad neu fethu â chydymffurfio â’r gofyniad o dan sylw.

en-gb	A person who commits an offence under this regulation is liable on summary conviction toa fine.
cy-gb	Mae person sy’n cyflawni trosedd o dan y rheoliad hwn yn agored ar euogfarn ddiannod iddirwy.

en-gb	Section 24 of the Police and Criminal Evidence Act 1984( 11 ) applies in relation to an offence under this regulation as if the reasons in subsection (5) of that section included— (a) to maintain public health; 
cy-gb	Mae adran 24 o Ddeddf yr Heddlu a Thystiolaeth Droseddol 1984( 11 ) yn gymwys mewn perthynas â throsedd o dan y rheoliad hwn fel pe bai’r rhesymau yn is-adran (5) o’r adran honno yn cynnwys—cynnal iechyd y cyhoedd; 

en-gb	(b) to maintain public order.
cy-gb	(b) cynnal trefn gyhoeddus.

en-gb	Prosecutions
cy-gb	Erlyn

en-gb	15. 
cy-gb	15. 

en-gb	No proceedings for an offence under these Regulations may be brought other than by the Director of Public Prosecutions or any person designated by the Welsh Ministers.
cy-gb	Ni chaniateir dwyn achos am drosedd o dan y Rheoliadau hyn ond gan y Cyfarwyddwr Erlyniadau Cyhoeddus neu unrhyw berson sydd wedi ei ddynodi gan Weinidogion Cymru.

en-gb	Fixed penalty notices
cy-gb	Hysbysiadau cosb benodedig

en-gb	16. —(1)  An immigration officer may issue a fixed penalty notice to any adult the officer reasonably believes has committed an offence— (a) under regulation 14(1) or (2)—
cy-gb	16. —(1)  Caiff swyddog mewnfudo ddyroddi hysbysiad cosb benodedig i unrhyw oedolyn y mae’r swyddog yn credu’n rhesymol ei fod wedi cyflawni trosedd— (a) o dan reoliad 14(1) neu (2)—

en-gb	in relation to a requirement in regulation 4(1) or (4), 5(2) or 7(5), or
cy-gb	mewn perthynas â gofyniad yn rheoliad 4(1) neu (4), 5(2), neu 7(5), neu

en-gb	in relation to a contravention of the requirement in regulation 11 which relates to the requirement in regulation 7(5), or
cy-gb	mewn perthynas â thorri gofyniad yn rheoliad 11 sy’n ymwneud â’r gofyniad yn rheoliad 7(5), neu

en-gb	(b) under regulation 14(4) where the person is believed to have intentionally obstructed a person carrying out a function in relation to one of those requirements.
cy-gb	(b) o dan reoliad 14(4) lle credir bod y person yn fwriadol wedi rhwystro person oedd yn arfer swyddogaeth mewn perthynas ag un o’r gofynion hynny.

en-gb	A constable may issue a fixed penalty notice to any adult the constable reasonably believeshas committed an offence under these Regulations.
cy-gb	Caiff cwnstabl ddyroddi hysbysiad cosb benodedig i unrhyw oedolyn y mae’r cwnstabl yncredu’n rhesymol ei fod wedi cyflawni trosedd o dan y Reoliadau hyn.

en-gb	A fixed penalty notice is a notice offering the person to whom it is issued the opportunity ofdischarging any liability to conviction for the offence by payment of a fixed penalty to— (a) the Welsh Ministers, or
cy-gb	Hysbysiad yw hysbysiad cosb benodedig sy’n cynnig i’r person y’i dyroddir iddo y cyfle igael ei ryddhau o unrhyw atebolrwydd am euogfarn am y drosedd drwy dalu cosb benodedig i— (a) Gweinidogion Cymru, neu

en-gb	(b) a person designated by the Welsh Ministers for the purposes of receiving payment under this regulation.
cy-gb	(b) person a ddynodir gan Weinidogion Cymru at ddibenion cael taliad o dan y rheoliad hwn. 

en-gb	Where a person is issued with a notice under this regulation in respect of an offence—
cy-gb	(4)  Pan ddyroddir hysbysiad i berson o dan y rheoliad hwn mewn cysylltiad â throsedd—

en-gb	no proceedings may be taken for the offence before the end of the period of 28 days beginning with the date the notice is issued;
cy-gb	ni chaniateir dwyn unrhyw achos am y drosedd cyn diwedd y cyfnod o 28 o ddiwrnodau sy’n dechrau ar y dyddiad y dyroddir yr hysbysiad;

en-gb	the person may not be convicted of the offence if the person pays the fixed penalty before the end of that period.
cy-gb	ni chaniateir euogfarnu’r person o’r drosedd os yw’r person yn talu’r gosb benodedig cyn diwedd y cyfnod hwnnw.

en-gb	A fixed penalty notice must—
cy-gb	Rhaid i hysbysiad cosb benodedig—

en-gb	describe the circumstances alleged to constitute the offence,
cy-gb	disgrifio’r amgylchiadau yr honnir eu bod yn ffurfio’r drosedd,

en-gb	state the period during which (because of paragraph (4)(a)) proceedings will not be taken for the offence,specify the amount of the fixed penalty,
cy-gb	datgan y cyfnod pan (oherwydd paragraff (4)(a)) na ddygir achos am y drosedd, (c) pennu swm y gosb benodedig,

en-gb	state the name and address of the person to whom the fixed penalty may be paid, and (e) specify permissible methods of payment.
cy-gb	(d) datgan enw a chyfeiriad y person y caniateir talu’r gosb benodedig iddo, ac (e) pennu dulliau o dalu a ganiateir.

en-gb	Where the fixed penalty notice is issued in respect of an offence—
cy-gb	Pan ddyroddir yr hysbysiad cosb benodedig mewn cysylltiad â throsedd—

en-gb	of contravening a requirement imposed by regulation 7(2) or (3), 8(3) or 11,
cy-gb	o dorri gofyniad a osodir gan reoliad 7(2), neu (3), 8(3) neu 11,

en-gb	under regulation 14(3), or
cy-gb	o dan reoliad 14(3), neu

en-gb	under regulation 14(4) where the person is believed to have intentionally obstructed a person carrying out a function in relation to regulation 7(2) or (3), 8(3) or 11,
cy-gb	o dan reoliad 14(4) lle credir bod y person yn fwriadol wedi rhwystro person oedd yn arfer swyddogaeth mewn perthynas â rheoliad 7(2) neu (3), 8(3) neu 11,

en-gb	the amount specified under paragraph (5)(c) must be £1000.
cy-gb	rhaid i’r swm a bennir o dan baragraff (5)(c) fod yn £1000.

en-gb	Where the fixed penalty notice is issued in respect of an offence (an “information or notification offence”)—
cy-gb	Pan ddyroddir yr hysbysiad cosb benodedig mewn cysylltiad â throsedd (“troseddgwybodaeth neu hysbysu”) —

en-gb	of contravening a requirement imposed by regulation 4(1) or (4), 5(2), 7(5), 8(4) or 10(6), or
cy-gb	o dorri gofyniad a osodir gan reoliad 4(1) neu (4), 5(2), 7(5), 8(4) neu 10(6), neu

en-gb	under regulation 14(4) where the person is believed to have intentionally obstructed a person carrying out a function in relation to one of those requirements,
cy-gb	o dan reoliad 14(4) lle credir bod y person yn fwriadol wedi rhwystro person oedd yn arfer swyddogaethau mewn perthynas ag un o’r gofynion hynny,

en-gb	the amount specified under paragraph (5)(c) must be £60 (subject to paragraphs (8) and (9)).
cy-gb	rhaid i’r swm a bennir o dan baragraff (5)(c) fod yn £60 (yn ddarostyngedig i baragraffau (8) a (9)).

en-gb	A fixed penalty notice issued in respect of an information or notification offence may specifythat if £30 is paid before the end of the period of 14 days beginning with the day after the date the notice is issued, that is the amount of the fixed penalty.
cy-gb	Caiff hysbysiad cosb benodedig a ddyroddir mewn cysylltiad â throsedd gwybodaeth neuhysbysu bennu, os telir £30 cyn diwedd y cyfnod o 14 o ddiwrnodau sy’n dechrau â’r diwrnod ar ôl dyddiad y dyroddir yr hysbysiad, mai dyna yw swm y gosb benodedig.

en-gb	But if the person to whom a fixed penalty notice in respect of an information or notificationoffence is issued has already received a fixed penalty notice in respect of such of such an offence— (a) paragraph (8) does not apply, and
cy-gb	Ond os yw’r person y dyroddir iddo hysbysiad cosb benodedig mewn cysylltiad â throseddgwybodaeth neu hysbysu eisoes wedi cael hysbysiad cosb benodedig mewn cysylltiad â’r drosedd honno—

en-gb	(b) the amount specified as the fixed penalty is to be—
cy-gb	nid yw paragraff (8) yn gymwys, ay swm a bennir fel y gosb benodedig fydd—

en-gb	in the case of the second fixed penalty notice received, £120;
cy-gb	yn achos yr ail hysbysiad cosb benodedig a geir, £120;

en-gb	in the case of the third fixed penalty notice received, £240;
cy-gb	yn achos y trydydd hysbysiad cosb benodedig a geir, £240;

en-gb	in the case of the fourth fixed penalty notice received, £480;
cy-gb	yn achos y pedwerydd hysbysiad cosb benodedig a geir, £480;

en-gb	in the case of the fifth fixed penalty notice received, £960;
cy-gb	yn achos y pumed hysbysiad cosb benodedig a geir, £960;

en-gb	in the case of the sixth and any subsequent fixed penalty notice received, £1920.
cy-gb	yn achos y chweched hysbysiad cosb benodedig a geir, ac unrhyw hysbysiad cosb benodedig a geir wedi hynny, £1920.

en-gb	Whatever other method may be specified under paragraph (5)(e), payment of a fixed penaltymay be made by pre-paying and posting to the person whose name is stated under paragraph (5)(d), at the stated address, a letter containing the amount of the penalty (in cash or otherwise).
cy-gb	Pa bynnag ddull arall a bennir o dan baragraff (5)(e), caniateir talu cosb benodedig drwyragdalu a phostio llythyr sy’n cynnwys swm y gosb (mewn arian parod neu fel arall) i’r person y nodir ei enw o dan baragraff (5)(d) i’r cyfeiriad a nodir.

en-gb	Where a letter is sent as mentioned in paragraph (10), payment is regarded as having beenmade at the time at which that letter would be delivered in the ordinary course of post.
cy-gb	Pan fo llythyr yn cael ei anfon fel a grybwyllir ym mharagraff (10), ystyrir bod taliad wediei wneud ar yr adeg y byddai’r llythyr hwnnw wedi cael ei ddanfon yn nhrefn arferol y post.

en-gb	In any proceedings, a certificate that—
cy-gb	Mewn unrhyw achos, mae tystysgrif—

en-gb	purports to be signed by or on behalf of—
cy-gb	sy’n honni ei bod wedi ei llofnodi gan neu ar ran—

en-gb	the Welsh Ministers, or
cy-gb	Gweinidogion Cymru, neu

en-gb	a person designated by the Welsh Ministers under paragraph (3)(b), and
cy-gb	person sydd wedi ei ddynodi gan Weinidogion Cymru o dan baragraff (3)(b), a

en-gb	states that the payment of a fixed penalty was, or was not, received by the date specified in the certificate,
cy-gb	sy’n datgan bod y taliad am y gosb benodedig wedi dod i law, neu heb ddod i law, erbyn y dyddiad a bennir yn y dystysgrif,

en-gb	is evidence of the facts stated.
cy-gb	yn dystiolaeth o’r ffeithiau a ddatgenir.

en-gb	PART 5
cy-gb	RHAN 5

en-gb	Information sharing
cy-gb	Rhannu gwybodaeth

en-gb	Use and disclosure of information
cy-gb	Defnyddio a datgelu gwybodaeth

en-gb	17. —(1)  In this regulation and regulation 18, “relevant information” means—
cy-gb	17. —(1)  Yn y rheoliad hwn ac yn rheoliad 18, ystyr “gwybodaeth berthnasol” yw—

en-gb	Welsh passenger information;
cy-gb	gwybodaeth am deithiwr o Gymru;

en-gb	other UK passenger information.
cy-gb	gwybodaeth am deithiwr o weddill y Deyrnas Unedig.

en-gb	For the purposes of this regulation—
cy-gb	At ddibenion y rheoliad hwn—

en-gb	“Welsh passenger information” means—
cy-gb	ystyr “gwybodaeth am deithiwr o Gymru” yw—

en-gb	passenger information provided to the Secretary of State for the purpose of regulation 4 or 5;
cy-gb	gwybodaeth am deithiwr a roddir i’r Ysgrifennydd Gwladol at ddiben rheoliad 4 neu 5;

en-gb	information provided to the Secretary of State in a notification given under regulation 7(5)(b), 8(4) or 10(6);
cy-gb	gwybodaeth a ddarparwyd i’r Ysgrifennydd Gwladol mewn hysbysiad a wnaed o dan reoliad 7(5)(b), 8(4) neu 10(6);

en-gb	“other UK passenger information” means information provided to a person under provision in Regulations made as respects England, Scotland or Northern Ireland (as the case may be) that is equivalent to provision mentioned in sub-paragraph (a).
cy-gb	ystyr “gwybodaeth am deithiwr o weddill y Deyrnas Unedig” yw gwybodaeth a roddir i berson o dan ddarpariaeth mewn Rheoliadau a wnaed mewn perthynas â Lloegr, yr Alban neu Ogledd Iwerddon (yn ôl y digwydd) sy’n cyfateb i ddarpariaeth a grybwyllir yn isbaragraff (a).

en-gb	In this regulation, any reference to the holder of information is a reference to—the Secretary of State;
cy-gb	Yn y rheoliad hwn, mae unrhyw gyfeiriad at ddeiliad gwybodaeth yn gyfeiriad at— (a) yr Ysgrifennydd Gwladol;

en-gb	a person to whom the information was disclosed under paragraph (4) or (5).
cy-gb	(b) person y datgelwyd yr wybodaeth iddo o dan baragraff (4) neu (5).

en-gb	The holder of Welsh passenger information may disclose it to another person (the “recipient”) in circumstances where it is necessary for the recipient to have the information— (a) for the purpose of carrying out a function of the recipient under—
cy-gb	Caiff deiliad gwybodaeth am deithiwr o Gymru ddatgelu’r wybodaeth i berson arall (y“derbynnydd”) o dan amgylchiadau pan fo’n angenrheidiol i’r derbynnydd gael yr wybodaeth— (a) at ddiben arfer swyddogaeth y derbynnydd o dan —

en-gb	these Regulations, or
cy-gb	y Rheoliadau hyn, neu

en-gb	Regulations made as respects England, Scotland or Northern Ireland (as the case may be) that are equivalent to these Regulations; 
cy-gb	Rheoliadau a wnaed mewn perthynas â Lloegr, yr Alban neu Ogledd Iwerddon (yn ôl y digwydd) sy’n cyfateb â’r Rheoliadau yma; 

en-gb	(b) for the purpose of—
cy-gb	(b) at ddiben—

en-gb	preventing danger to public health as a result of the spread of infection or contamination with coronavirus,
cy-gb	atal perygl i iechyd y cyhoedd o ganlyniad i ledaeniad haint neu halogiad y coronafeirws,

en-gb	monitoring the spread of infection or contamination with coronavirus, or
cy-gb	monitro lledaeniad haint neu halogiad y coronafeirws, neu

en-gb	giving effect to any international agreement or arrangement relating to the spread of infection or contamination with coronavirus;
cy-gb	rhoi effaith i unrhyw drefniant neu gytundeb rhyngwladol sy’n ymwneud â lledaeniad haint neu halogiad y coronafeirws;

en-gb	(c) for a purpose connected with, or otherwise incidental to, a purpose described in subparagraph (a) or (b).
cy-gb	(c) at ddiben sy’n gysylltiedig â’r diben a ddisgrifir yn is-baragraff (a) neu (b), neu sydd fel arall yn gysylltiedig â‘r diben hwnnw

en-gb	The holder of other UK passenger information may disclose it to another person (the“recipient”) in circumstances where it is necessary for the recipient to have the information—
cy-gb	Caiff deiliad gwybodaeth am deithiwr o weddill y Deyrnas Unedig ei ddatgelu i bersonarall (“y derbynnydd”) mewn amgylchiadau lle ei bod hi’n angenrheidiol i’r derbynnydd gael y wybodaeth—

en-gb	for the purpose of carrying out a function of the recipient under these Regulations; 
cy-gb	at ddiben arfer swyddogaeth y derbynnydd o dan y Rheoliadau yma; 

en-gb	(b) for the purpose of—
cy-gb	(b) at ddiben—

en-gb	preventing danger to public health in Wales as a result of the spread of infection or contamination with coronavirus,
cy-gb	atal perygl i iechyd y cyhoedd yng Nghymru o ganlyniad i ledaeniad haint neu halogiad y coronafeirws,

en-gb	monitoring the spread of infection or contamination with coronavirus in Wales, or
cy-gb	monitro lledaeniad haint neu halogiad y coronafeirws yng Nghymru, neu

en-gb	giving effect in Wales to any international agreement or arrangement relating to the spread of infection or contamination with coronavirus;
cy-gb	rhoi effaith yng Nghymru i unrhyw drefniant neu gytundeb rhyngwladol sy’n ymwneud â lledaeniad haint neu halogiad y coronafeirws;

en-gb	(c) for a purpose connected with, or otherwise incidental to, a purpose described in subparagraph (a) or (b).
cy-gb	(c) at ddiben sy’n gysylltiedig â diben a ddisgrifir yn is-baragraff (a) neu (b) neu ddiben sydd fel arall yn gysylltiedig â’r diben hwnnw.

en-gb	A holder of relevant information may not use the information otherwise than— (a) for the purpose of carrying out a function of the holder under these Regulations;
cy-gb	Ni all deiliad gwybodaeth berthnasol ddefnyddio’r wybodaeth ac eithrio—at ddiben arfer swyddogaeth y deiliad o dan y Rheoliadau hyn;

en-gb	in the case of Welsh passenger information, for a purpose described in paragraph (4)(b);
cy-gb	yn achos gwybodaeth am deithiwr o Gymru, at ddiben a ddisgrifir ym mharagraff (4)(b);

en-gb	in the case of other UK passenger information, for a purpose described in paragraph (5)(b);
cy-gb	yn achos gwybodaeth am deithiwr o weddill y Deyrnas Unedig, at ddiben a ddisgrifir ym mharagraff (5)(b);

en-gb	for a purpose connected with, or otherwise incidental to, a purpose described in subparagraph (a), (b) or (c).
cy-gb	at ddiben sy’n gysylltiedig â diben a ddisgrifir yn is-baragraff (a), (b) neu (c), neu ddiben sydd fel arall yn gysylltiedig â’r diben hwnnw.

en-gb	Despite paragraphs (4), (5) and (6), this regulation does not limit the circumstances in whichinformation may otherwise lawfully be disclosed or used under any other enactment or rule of law.
cy-gb	Er gwaethaf paragraffau (4), (5) a (6), nid yw’r rheoliad hwn yn cyfyngu’r amgylchiadau lley gellir fel arall ddatgelu’r wybodaeth yn gyfreithiol, neu lle y gellir defnyddio’r wybodaeth o dan unrhyw ddeddfiad arall neu reol gyfreithiol arall.

en-gb	Disclosure which is authorised by this regulation does not breach— (a) an obligation of confidence owed by the person making the disclosure, or (b) any other restriction on the disclosure of information (however imposed).
cy-gb	Nid yw datgeliad a awdurdodir gan y rheoliad hwn yn torri—rhwymedigaeth o safbwynt cyfrinachedd sy’n ddyledus gan y person sy’n gwneud y datgeliad, neuunrhyw gyfyngiad arall ar ddatgelu gwybodaeth (ym mha fodd bynnag y’i gorfodir).

en-gb	Nothing in this regulation authorises the disclosure of personal data where doing socontravenes the data protection legislation.
cy-gb	Nid oes unrhyw beth yn y rheoliad hwn yn awdurdodi datgelu data personol pan fo gwneudhynny yn torri’r ddeddfwriaeth diogelu data.

en-gb	In paragraph (8), “data protection legislation” and “personal data” have the same meaningsas in section 3 of the Data Protection Act 2018( 12 ).
cy-gb	Ym mharagraff (8), mae i “ddeddfwriaeth diogelu data” yr ystyr a roddir i “data protectionlegislation” ac mae i “data personol” yr ystyr a roddir i “personal data” yn adran 3 o Ddeddf Diogelu Data 2018( 12 ).

en-gb	Self-incrimination
cy-gb	Hunanargyhuddo

en-gb	18. —(1)  Relevant information may be used in evidence against the person to whom the information relates in criminal proceedings.
cy-gb	18. —(1)  Caniateir i wybodaeth berthnasol gael ei defnyddio fel tystiolaeth yn erbyn y person y mae’r wybodaeth yn ymwneud ag ef mewn achos troseddol.

en-gb	Where the information is used in proceedings other than for an offence under these Regulations or section 5 of the Perjury Act 1911( 13 ) (false statements made otherwise than on oath)
cy-gb	Pan ddefnyddir yr wybodaeth mewn achos ac eithrio ar gyfer trosedd o dan y Rheoliadau hynneu adran 5 o Ddeddf Anudon 1911( 13 ) (datganiadau anwir a wneir ac eithrio ar lw)—

en-gb	no evidence relating to the information may be adduced by or on behalf of the prosecution, and
cy-gb	ni chaniateir i unrhyw dystiolaeth sy’n ymwneud â’r wybodaeth gael ei rhoi gan yr erlyniad nac ar ei ran, a

en-gb	no question relating to the information may be asked by or on behalf of the prosecution.
cy-gb	ni chaniateir i unrhyw gwestiwn sy’n ymwneud â’r wybodaeth gael ei ofyn gan yr erlyniad nac ar ei ran.

en-gb	Paragraph (2) does not apply if, in the proceedings—
cy-gb	Nid yw paragraff (2) yn gymwys—

en-gb	evidence relating to the information is adduced by or on behalf of the person who provided it, or
cy-gb	os rhoddir tystiolaeth sy’n ymwneud â’r wybodaeth gan y person a’i darparodd, neu ar ei ran, yn ystod yr achos, neu

en-gb	a question relating to the information is asked by or on behalf of that person.
cy-gb	os gofynnir cwestiwn sy’n ymwneud â’r wybodaeth gan y person hwnnw, neu ar ei ran, yn ystod yr achos.

en-gb	PART 6
cy-gb	RHAN 6

en-gb	Review and expiry
cy-gb	Adolygu a dod i ben

en-gb	Review of requirements
cy-gb	Adolygu’r gofynion

en-gb	19. 
cy-gb	19. 

en-gb	The Welsh Ministers must review the need for the requirements imposed by these Regulations, and whether those requirements are proportionate to what the Welsh Ministers seek to achieve by them—
cy-gb	Rhaid i Weinidogion Cymru adolygu’r angen am y gofynion a osodir gan y Rheoliadau hyn, ac a yw’r gofynion hynny’n gymesur â’r hyn y mae Gweinidogion Cymru yn ceisio ei gyflawni drwyddynt—

en-gb	by 29 th  June 2020,
cy-gb	erbyn 29 Mehefin 2020,

en-gb	at least once in the period of 21 days beginning with the day after that date, and (c) at least once in every subsequent period of 21 days.
cy-gb	o leiaf unwaith yn y cyfnod o 21 o ddiwrnodau sy’n dechrau â’r diwrnod ar ôl y dyddiad hwnnw, ac o leiaf unwaith ym mhob cyfnod dilynol o 21 o ddiwrnodau.

en-gb	Expiry of Regulations
cy-gb	Y Rheoliadau’n dod i ben

en-gb	20. —(1)  These Regulations expire at the end of the period of 12 months beginning with the day on which they come into force.
cy-gb	20. —(1)  Daw’r Rheoliadau hyn i ben ar ddiwedd y cyfnod o 12 mis sy’n dechrau â’r diwrnod y deuant i rym.

en-gb	(2)  The expiry of these Regulations does not affect the validity of anything done pursuant to these Regulations before they expire.
cy-gb	(2)  Nid yw’r ffaith bod y Rheoliadau hyn wedi dod i ben yn effeithio ar ddilysrwydd unrhyw beth a wneir yn unol â’r Rheoliadau hyn cyn iddynt ddod i ben.

en-gb	Mark Drakeford
cy-gb	Mark Drakeford

en-gb	5 June 2020 The First Minister, one of the Welsh Ministers
cy-gb	5 Mehefin 2020 Y Prif Weinidog, un o Weinidogion Cymru

en-gb	SCHEDULE 1 Regulation 2(1) 
cy-gb	ATODLEN 1 Rheoliad 2(1) 

en-gb	Passenger information
cy-gb	Gwybodaeth am Deithiwr

en-gb	Personal details—
cy-gb	Manylion personol—

en-gb	full name,
cy-gb	enw llawn,

en-gb	sex,
cy-gb	rhyw,

en-gb	date of birth,
cy-gb	dyddiad geni,

en-gb	passport number, or travel document reference number (as appropriate), issue and expiry dates and issuing authority,
cy-gb	rhif pasport, neu gyfeirnod ei ddogfen deithio (fel y bo’n briodol), y dyddiad dyroddi a’r dyddiad y daw’r pasport neu’r ddogfen i ben a’r awdurdod dyroddi,

en-gb	telephone number,home address, (g) email address.
cy-gb	rhif ffôn, (f) cyfeiriad cartref, (g) cyfeiriad e-bost.

en-gb	Journey details—
cy-gb	Manylion y daith—

en-gb	if applicable, the address of suitable premises in Wales at which P intends to reside as required by regulation 7(3),
cy-gb	os yn gymwys, cyfeiriad mangre addas yng Nghymru y mae’r person yn bwriadu preswylio ynddi fel sy’n ofynnol gan reoliad 7(3),

en-gb	if applicable, the address of suitable premises in the United Kingdom at which P intends to reside as required by equivalent provision in Regulations made as respects England, Scotland or Northern Ireland,
cy-gb	os yn gymwys, cyfeiriad mangre addas yn y Deyrnas Unedig y mae P yn bwriadu preswylio ynddi fel sy’n ofynnol gan ddarpariaeth gyfatebol mewn Rheoliadau a wnaed mewn perthynas â Lloegr, yr Alban neu Ogledd Iwerddon,

en-gb	the date, or planned date, as appropriate of arrival at an address specified in subparagraph (a) or (b),
cy-gb	dyddiad y bydd y person yn cyrraedd y cyfeiriad a bennir yn is-baragraff (a) neu (b), neu’r dyddiad y mae’n bwriadu cyrraedd, fel y bo’n briodol,

en-gb	the operator P is travelling, or travelled, with or through which P’s booking was made,
cy-gb	y gweithredwr y mae’r person yn teithio gydag ef, neu wedi teithio gydag ef, neu’r gweithredwr a ddefnyddiodd y person i archebu’r daith,

en-gb	travel booking reference,
cy-gb	cyfeirnod yr archeb deithio,

en-gb	flight number, train number, or ticket number (as appropriate),
cy-gb	rhif yr hediad, rhif y trên, neu rif y tocyn (fel y bo’n briodol),,

en-gb	the name of any organised travel group with whom P is travelling, or travelled,
cy-gb	enw unrhyw grŵp teithio trefnedig y mae’r person yn teithio neu wedi teithio gydag ef,

en-gb	the location at which P will arrive, or has arrived, in the United Kingdom,the country P is travelling, or travelled, from,the date and time, or planned date and time, as appropriate, of P’s arrival in the United Kingdom,
cy-gb	y lleoliad yn y Deyrnas Unedig y bydd y person yn ei gyrraedd, neu’r lleoliad yn y Deyrnas Unedig y mae wedi ei gyrraedd,y wlad y mae’r person yn teithio drwyddi, neu wedi ymadael ohoni,y dyddiad a’r amser y bydd y person yn cyrraedd y Deyrnas Unedig neu y mae’n bwriadu ei chyrraedd, fel y bo’n briodol,

en-gb	whether P is connecting through the United Kingdom to a destination outside the UnitedKingdom and, if so—
cy-gb	a yw’r person yn teithio drwy’r Deyrnas Unedig fel rhan o siwrnai gysylltu i gyrchfan y tu allan i’r Deyrnas Unedig ac, os felly—

en-gb	the location at which P will depart from in the United Kingdom,
cy-gb	lleoliad y man y bydd y person yn ymadael â’r Deyrnas Unedig,

en-gb	P’s final destination country,
cy-gb	y wlad sy’n gyrchfan terfynol y person,

en-gb	the operator P is travelling with or through which the booking was made for the onward journey,the travel booking reference for the onward journey,
cy-gb	enw’r gweithredwr y mae’r person yn teithio gydag ef ar y daith sy’n dilyn, neu’r gweithredwr a ddefnyddiodd y person i archebu’r daith sy’n dilyn,cyfeirnod archeb deithio’r daith sy’n dilyn,

en-gb	the flight number, train number, or ticket number (as appropriate) of the onward journey.
cy-gb	rhif yr hediad, rhif y trên, neu rif y tocyn (fel y bo’n briodol) ar gyfer y daith sy’n dilyn.

en-gb	Whether the person providing passenger information is doing so on behalf of another person.
cy-gb	A yw’r person sy’n darparu gwybodaeth am deithiwr yn gwneud hynny ar ran person arall.

en-gb	Where P is travelling with a child for whom they have responsibility—
cy-gb	Pan fo’r person yn teithio gyda phlentyn y mae ganddo gyfrifoldeb amdano—

en-gb	the full name and date of birth of that child,
cy-gb	enw llawn a dyddiad geni’r plentyn hwnnw,

en-gb	the relationship of the passenger to that child.
cy-gb	perthynas y teithiwr â’r plentyn hwnnw.

en-gb	The full name and telephone number of an emergency contact.
cy-gb	Enw llawn a rhif ffôn cyswllt brys.

en-gb	SCHEDULE 2 Regulations 3(2), 7(4)(b) and 9 
cy-gb	ATODLEN 2 Rheoliadau 3(2), 7(4)(b) a 9 

en-gb	Persons not required to comply with regulation 3 or 4
cy-gb	Personau nad yw’n ofynnol iddynt gydymffurfio â rheoliadau 3 neu 4

en-gb	PART 1
cy-gb	RHAN 1

en-gb	Persons not required to comply with regulation 3 or regulation 4
cy-gb	Personau nad yw’n ofynnol iddynt gydymffurfio â rheoliad 3 a rheoliad 4

en-gb	1. —(1)  A person (“P”) who is—
cy-gb	1. —(1)  Person—

en-gb	a member of a diplomatic mission in the United Kingdom;
cy-gb	sy’n aelod o genhadaeth ddiplomyddol yn y Deyrnas Unedig;

en-gb	a member of a consular post in the United Kingdom;
cy-gb	sy’n aelod o swyddfa gonsylaidd yn y Deyrnas Unedig;

en-gb	an officer or servant of an international organisation;
cy-gb	sy’n swyddog neu’n was i sefydliad rhyngwladol;

en-gb	employed by an international organisation as an expert or on a mission;
cy-gb	a gyflogir gan sefydliad rhyngwladol fel arbenigydd neu ar genhadaeth;

en-gb	a representative to an international organisation;
cy-gb	sy’n gynrychiolydd i sefydliad rhyngwladol;

en-gb	a representative at an international or United Kingdom conference who is granted privileges and immunities in the United Kingdom;
cy-gb	sy’n gynrychiolydd mewn cynhadledd ryngwladol neu gynhadledd y Deyrnas Unedig y rhoddir breintiau a breinryddidau iddo yn y Deyrnas Unedig;

en-gb	a member of the official staff of a representative to an international organisation, or of a person falling within paragraph (f);
cy-gb	sy’n aelod o staff swyddogol cynrychiolydd i sefydliad rhyngwladol, neu berson sy’n dod o fewn paragraff (f);

en-gb	described in paragraph (a) or (b) who is passing through the United Kingdom commence or continue their functions at a diplomatic mission or consular post in another country or territory, or to return to the country of their nationality;
cy-gb	a ddisgrifir ym mharagraff (a) neu (b) sy’n pasio drwy’r Deyrnas Unedig i gychwyn neu barhau â’i swyddogaethau ar genhadaeth ddiplomyddol neu mewn swydd gonsylaidd mewn gwlad neu diriogaeth arall, neu i ddychwelyd i wlad ei genedligrwydd;

en-gb	a representative of a foreign country or territory travelling to the United Kingdom to conduct official business with the United Kingdom;
cy-gb	sy’n gynrychiolydd i wlad dramor neu diriogaeth dramor sy’n teithio i’r Deyrnas Unedig i gynnal busnes swyddogol gyda’r Deyrnas Unedig;

en-gb	a representative of the government of a British overseas territory;
cy-gb	sy’n gynrychiolydd llywodraeth i diriogaeth dramor Brydeinig;

en-gb	a diplomatic courier or a consular courier;
cy-gb	sy’n gludwr diplomyddol neu’n gludwr consylaidd;

en-gb	a member of the family forming part of the household of a person falling within any of paragraphs (a) to (k).
cy-gb	sy’n aelod o’r teulu sy’n ffurfio rhan o aelwyd person sy’n dod o fewn unrhyw un neu ragor o baragraffau (a) i (k).

en-gb	The conditions referred to in regulation 9(a) (persons exempt from regulation 7 or 8) are that—
cy-gb	Yr amodau y cyfeirir atynt yn rheoliad 9(a) (personau nad yw’n ofynnol iddynt gydymffurfioâ rheoliad 7 a 8) yw —

en-gb	the relevant head of the mission, consular post, international organisation, or conference, office representing a foreign territory in the United Kingdom or a Governor of a British overseas territory (as the case may be), or a person acting on their authority, confirms in writing to the Foreign and Commonwealth Office that—
cy-gb	bod pennaeth perthnasol y genhadaeth, y swyddfa gonsylaidd, y sefydliad rhyngwladol, neu’r gynhadledd, y swyddfa sy’n cynrychioli tiriogaeth dramor yn y Deyrnas Unedig neu Lywodraethwr tiriogaeth dramor Brydeinig (yn ôl y digwydd), neu berson sy’n gweithredu ar eu awdurdod, yn cadarnhau mewn ysgrifen‘i’r Swyddfa Dramor a Chymanwlad—

en-gb	P is required to undertake work which is essential to the functioning of the mission, consular post, international organisation, conference, or office, or to undertake work which is essential to the foreign country represented by the mission or consular post, the foreign territory represented by the office or the British overseas territory and
cy-gb	ei bod yn ofynnol i’r person ymgymryd â gwaith sy’n hanfodol i weithrediad y genhadaeth, y swydd gonsylaidd, y sefydliad rhyngwladol neu’r gynhadledd, neu’r swyddfa, neu i ymgymryd â gwaith sy’n hanfodol i’r wlad dramor a gynrychiolir gan y genhadaeth neu’r swyddfa gonsylaidd, y diriogaeth dramor a gynrychiolir gan y swyddfa neu’r diriogaeth dramor Brydeinig a

en-gb	that work cannot be undertaken whilst P is complying with regulation 7 or 8, and
cy-gb	na ellir ymgymryd â’r gwaith hwnnw tra bo’r person yn cydymffurfio â rheoliad 7 neu 8, a

en-gb	prior to P’s arrival in the United Kingdom the Foreign and Commonwealth Office—
cy-gb	cyn i’r person gyrraedd y Deyrnas Unedig, bod y Swyddfa Dramor a Chymanwlad—

en-gb	has confirmed in writing to the person giving the confirmation referred to in paragraph (a) that it has received that confirmation, and
cy-gb	wedi rhoi cadarnhad mewn ysgrifen i’r person sy’n rhoi’r cadarnhad y cyfeirir ato ym mharagraff (a) ei fod wedi cael y cadarnhad hwnnw, a

en-gb	where P is a representative of a foreign country or territory, has then confirmed in writing to the person giving the confirmation referred to in paragraph (a) that P is travelling to the United Kingdom to conduct official business with the United Kingdom and is not required to comply with regulation 7 or 8.
cy-gb	os yw’r person yn gynrychiolydd i wlad neu diriogaeth dramor, bod y Swyddfa wedi rhoi cadarnhad wedyn mewn ysgrifen i’r person sy’n rhoi’r cadarnhad y cyfeirir ato ym mharagraff (a) bod y person yn teithio i’r Deyrnas Unedig i gynnal busnes swyddogol gyda’r Deyrnas Unedig ac nad yw’n ofynnol iddo gydymffurfio â rheoliad 7 neu 8.

en-gb	For the purposes of this paragraph—
cy-gb	At ddibenion y paragraff hwn—

en-gb	“consular courier” means a person who has been provided by the State on behalf of which they are acting with an official document confirming their status as a consular courier in accordance with Article 35(5) of the Vienna Convention on Consular Relations of 1963,
cy-gb	ystyr “cludydd consylaidd” yw person sydd wedi cael dogfen swyddogol gan y Wladwriaeth y mae’n gweithredu ar ei rhan sy’n cadarnhau ei statws fel cludydd consylaidd yn unol ag Erthygl 35(5) o Gonfensiwn Fienna ar Gysylltiadau Consylaidd 1963,

en-gb	“consular post” means any consulate-general, consulate, vice-consulate or consular agency,
cy-gb	ystyr “swyddfa gonsylaidd” yw unrhyw gonsyliaeth gyffredinol, consyliaeth, isgonsyliaeth neu asiantaeth gonsylaidd,

en-gb	“diplomatic courier” means a person who has been provided by the State on behalf of which they are acting with an official document confirming their status as a diplomatic courier in accordance with Article 27(5) of the Vienna Convention on Diplomatic Relations of 1961,
cy-gb	ystyr “cludydd diplomyddol” yw person sydd wedi cael dogfen swyddogol gan y Wladwriaeth y mae’n gweithio ar ei rhan sy’n cadarnhau ei statws fel cludydd diplomyddol yn unol ag Erthygl 27(5) o Gonfensiwn Fienna ar Gysylltiadau Consylaidd 1961,

en-gb	“international organisation” means an international organisation accorded privileges and immunities in the United Kingdom,
cy-gb	ystyr “sefydliad rhyngwladol” yw sefydliad rhyngwladol y rhoddwyd breintiau a breinryddidau iddo yn y Deyrnas Unedig,

en-gb	“member of a consular post” means a “consular officer”, “consular employee” and “member of the service staff” as defined in Schedule 1 to the Consular Relations Act 1968( 14 ), and head of consular post” has the meaning given in that Schedule,
cy-gb	ystyr “aelod o swyddfa gonsylaidd” yw swyddog consylaidd, gweithiwr consylaidd ac aelod o staff y gwasanaeth yn unol â’r diffiniadau o “consular officer”, “consular employee” a “member of the service staff” yn Atodlen 1 i Ddeddf Cysylltiadau Consylaidd 1968( 14 ), ac mae i “pennaeth swyddfa gonsylaidd” yr ystyr a roddir i “head of consular post” yn yr Atodlen honno,

en-gb	“member of a diplomatic mission” means the “head of the mission”, “members of the diplomatic staff”, “members of the administrative and technical staff” and “members of the service staff” as defined in Schedule 1 to the Diplomatic Privileges Act 1964( 15 ).
cy-gb	ystyr “aelod o genhadaeth ddiplomyddol” yw pennaeth y genhadaeth, aelodau o’r staff diplomyddol, aelodau o’r staff gweinyddol a thechnegol ac aelodau o staff y gwasanaeth yn unol â’r diffiniadau o “head of the mission”, “members of the diplomatic staff”, “members of the administrative and technical staff” a “members of the service staff” yn Atodlen 1 i Ddeddf Breintiau Diplomyddol 1964( 15 ).

en-gb	This paragraph is without prejudice to any immunity from jurisdiction or inviolability whichis accorded to any person described in sub-paragraph (1) under the law of England and Wales apart from these Regulations.
cy-gb	Nid yw’r paragraff hwn yn rhagfarnu unrhyw freinryddid rhag awdurdodaeth neu anhydoredda roddir i unrhyw berson a ddisgrifir yn is-baragraff (1) o dan gyfraith Cymru a Lloegr ar wahân i’r Rheoliadau hyn.

en-gb	2. —(1)  A Crown servant or government contractor—
cy-gb	2. —(1)  Gwas i’r Goron neu gontractwr llywodraeth—

en-gb	who is required to undertake essential government work related to the United Kingdom border in the United Kingdom within 14 days of arriving in the United Kingdom, or
cy-gb	y mae’n ofynnol iddo ymgymryd â gwaith llywodraeth hanfodol sy’n gysylltiedig â ffin y Deyrnas Unedig y tu allan i’r Deyrnas Unedig o fewn 14 diwrnod o gyrraedd y Deyrnas Unedig, neu ,

en-gb	who is undertaking essential government work related to the United Kingdom border outside the United Kingdom but—
cy-gb	sy’n ymgymryd â gwaith llywodraeth hanfodol sy’n gysylltiedig â ffin y Deyrnas Unedig y tu allan i’r Deyrnas Unedig ond—

en-gb	is required to return to the United Kingdom temporarily, and
cy-gb	ei bod yn ofynnol iddo ddychwelyd i’r Deyrnas Unedig dros dro, a

en-gb	will subsequently depart to undertake essential government work related to the United Kingdom border outside the United Kingdom.
cy-gb	y bydd wedyn yn ymadael er mwyn ymgymryd â gwaith llywodraeth hanfodol sy’n gysylltiedig â ffin y Deyrnas Unedig y tu allan i’r Deyrnas Unedig.

en-gb	(2)  For the purposes of sub-paragraph (1) and paragraph 3—
cy-gb	(2)  At ddibenion is-baragraff (1) a pharagraff 3—

en-gb	“Crown servant” has the meaning given in section 12(1)(a) to (e) of the Official Secrets Act 1989( 16 );
cy-gb	mae i “gwas i’r Goron” yr ystyr a roddir i “Crown servant” yn adran 12(1)(a) i (e) o Ddeddf Cyfrinachau Swyddogol 1989( 16 ),

en-gb	“essential government work” means work which has been designated as such by the relevant Department or employer;
cy-gb	ystyr “gwaith llywodraeth hanfodol” yw gwaith sydd wedi ei ddynodi felly gan yr Adran berthnasol neu’r cyflogwr perthnasol,

en-gb	“government contractor” has the meaning given in section 12(2) of that Act.
cy-gb	mae i “contractwr llywodraeth” yr ystyr a roddir i “government contractor” yn adran 12(2) o’r Ddeddf honno.

en-gb	3. —(1)  A person who is a Crown servant, a government contractor, or a member of a visiting force, who—
cy-gb	3. —(1)  Person sy’n was i’r Goron, yn gontractwr llywodraeth neu’n aelod o lu ar ymweliad—

en-gb	(a) is required to undertake work necessary to the delivery of essential defence activities, or
cy-gb	y mae’n ofynnol iddo ymgymryd â gwaith sy’n angenrheidiol er mwyn i weithgareddau amddiffyn hanfodol gael eu cyflawni, neu

en-gb	(b) has, immediately before the person’s arrival, been aboard a vessel operated by or in support of Her Majesty’s Naval Service for a continuous period of at least 14 days and that vessel has not taken on any persons or docked in any port outside the common travel during that period.
cy-gb	sydd wedi ymgymryd â chyfnod di-dor o 14 o ddiwrnodau o leiaf yn union cyn iddo gyrraedd ar lestr a weithredir gan Wasanaeth Llyngesol ei Mawrhydi ac nad yw’r llestr hwnnw wedi codi unrhyw bersonau nac wedi glanio mewn unrhyw borthladd y tu allan i’r ardal deithio gyffredin am gyfnod o 14 o ddiwrnodau o leiaf cyn iddo gyrraedd y Deyrnas Unedig.

en-gb	(2)  For the purposes of sub-paragraph (1)—
cy-gb	(2)  At ddibenion is-baragraff (1)—

en-gb	“defence” has the meaning given in section 2(4) of the Official Secrets Act 1989( 17 ),
cy-gb	mae i “amddiffyn” yr ystyr a roddir i “defence” yn adran 2(4) o Ddeddf Cyfrinachau Swyddogol 1989( 17 ),

en-gb	“visiting force” means a visiting force within the meaning given in section 12(1) of the Visiting Forces Act 1952( 18 ), where that force is from a country which is listed under section 1(1)(a) or designated under section 1(1)(b) or 1(2) of the Visiting Forces Act 1952( 19 ), or which is a country member of the North Atlantic Treaty Organisation.
cy-gb	ystyr “llu ar ymweliad” yw llu ar ymweliad o fewn yr ystyr a roddir i “visiting force” yn adran 12(1) o Ddeddf Lluoedd ar Ymweliad 1952( 18 ), pan fo’r llu hwnnw’n dod o wlad a restrir o dan adran 1(1)(a) neu a ddynodir o dan adran 1(1)(b) neu 1(2) o Ddeddf Lluoedd ar Ymweliad 1952( 19 ), neu sy’n aelod-wlad o Sefydliad Cytuniad Gogledd Iwerydd.

en-gb	4. 
cy-gb	4. 

en-gb	An official of a foreign Government required to travel to the United Kingdom to undertake essential border security duties, or a contractor directly supporting these essential border security duties where—
cy-gb	Swyddog i Lywodraeth dramor y mae’n ofynnol iddo deithio i’r Deyrnas Unedig i ymgymryd â dyletswyddau diogelwch ffin hanfodol, neu gontractwr sy’n cefnogi’r dyletswyddau diogelwch ffin hanfodol hyn yn uniongyrchol—

en-gb	the official or contractor is in possession of a written notice signed by a senior member of the foreign Government confirming that they are required to undertake essential border security duties in the United Kingdom within 14 days of arrival and that that work cannot be undertaken whilst the person is complying with regulation 7 or 8, or
cy-gb	pan fo’r swyddog neu’r contractwr yn meddu ar hysbysiad ysgrifenedig a lofnodwyd gan aelod uwch o’r Llywodraeth dramor sy’n cadarnhau ei bod yn ofynnol iddo ymgymryd â dyletswyddau diogelwch ffin hanfodol yn y Deyrnas Unedig o fewn 14 diwrnod ar ôl iddynt gyrraedd ac na ellir ymgymryd â’r gwaith hwnnw tra bo’r person yn cydymffurfio â rheoliad 7 neu 8, neu

en-gb	the official’s or contractor’s deployment is pursuant to a standing bilateral or multilateral agreement with Her Majesty’s Government on the operation of border controls within the United Kingdom.
cy-gb	pan fo lleoliad y swyddog neu’r contractwr yn unol â chytundeb dwyochrog neu amlochrog sefydlog gyda Llywodraeth Ei Mawrhydi ar weithredu rheolaethau ffin yn y Deyrnas Unedig.

en-gb	PART 2
cy-gb	RHAN 2

en-gb	Persons not required to comply with regulation 4
cy-gb	Personau nad yw’n ofynnol iddynt gydymffurfio â rheoliad 4

en-gb	5. 
cy-gb	5. 

en-gb	A person who, on arrival in the United Kingdom, passes through to another country or territory without entering the United Kingdom.
cy-gb	Person sydd, ar ôl cyrraedd y Deyrnas Unedig, yn pasio trwodd i wlad neu diriogaeth arall heb ddod i mewn i’r Deyrnas Unedig.

en-gb	6. —(1)  A road haulage worker or a road passenger transport worker.
cy-gb	6. —(1)  Gweithiwr cludiant ffyrdd neu weithiwr cludiant teithwyr ffyrdd.

en-gb	(2)  For the purposes of this paragraph—
cy-gb	(2)  At ddibenion y paragraff hwn—

en-gb	“driver” includes a person who is travelling in a vehicle as a relief driver,
cy-gb	mae “gyrrwr” yn cynnwys person sy’n teithio mewn cerbyd fel gyrrwr wrth gefn,

en-gb	“goods vehicle” has the meaning given in section 192 of the Road Traffic Act 1988( 20 ),
cy-gb	mae i “cerbyd nwyddau” yr ystyr a roddir i “goods vehicle” yn adran 192 o Ddeddf Traffig Ffyrdd 1988( 20 ),

en-gb	“public service vehicle” has the meaning given in section 1 of the Public Passenger Vehicles Act 1981( 21 ),“road haulage worker” means—
cy-gb	mae i “cerbyd gwasanaeth cyhoeddus” yr ystyr a roddir i “public service vehicle” yn adran 1 o Ddeddf Cerbydau Cyhoeddus i Deithwyr 1981( 21 ),ystyr “gweithiwr cludiant ffyrdd” yw—

en-gb	(i) the driver of a goods vehicle that is being used in connection with the carriage of goods, other than goods for non-commercial personal use by the driver, or
cy-gb	gyrrwr cerbyd nwyddau sy’n cael ei ddefnyddio mewn cysylltiad â chludo nwyddau, ac eithrio nwyddau at ddiben personol anfasnachol y gyrrwr, neu

en-gb	(ii) a person who is employed by the holder of a Community licence issued under Article 4 of Regulation (EC) No 1072/2009  of the European Parliament and of the
cy-gb	person a gyflogir gan ddeiliad trwydded Gymunedol a ddyroddwyd o dan Erthygl 4 o Reoliad (EC) Rhif 1072/2009  Senedd Ewrop a’r Cyngor ( 22 ), ac sy’n gweithredu yng nghwrs ei gyflogaeth,

en-gb	The definition of “visiting force” in section 12(1) was amended by paragraph 14(1) of Schedule 15 to the Criminal Justice Act 1988 (c. Council( 22 ), and who is acting in the course of their employment, (e) “road passenger transport worker” means— (i) the driver of a public service vehicle, or (ii) a person who is employed by the holder of a Community licence issued under Article 4 of Regulation (EC) No 1073/2009  of the European Parliament and of the Council( 23 ), and who is acting in the course of their employment.
cy-gb	ystyr “gweithiwr cludiant teithwyr ffyrdd” yw—gyrrwr cerbyd gwasanaeth cyhoeddus, neuperson a gyflogir gan ddeiliad trwydded Gymunedol a ddyroddwyd o dan Erthygl 4 o Reoliad (EC) Rhif 1073/2009  Senedd Ewrop a’r Cyngor( 23 ), ac sy’n gweithredu yng nghwrs ei gyflogaeth.

en-gb	7. —(1)  Masters and seamen, as defined in section 313(1) of the Merchant Shipping Act 1995( 24 ), where they have travelled to the United Kingdom in the course of their work or have been repatriated to the United Kingdom in accordance with the Maritime Labour Convention 2006 or the Work in Fishing Convention 2007.
cy-gb	7. —(1)  Meistri a morwyr, fel y’u diffinnir yn adran 313(1) o Ddeddf Llongau Masnach 1995( 24 ), pan fônt wedi teithio i’r Deyrnas Unedig yng nghwrs eu gwaith neu wedi eu dychwelyd i’r Deyrnas Unedig yn unol â Chonfensiwn Llafur Morwrol 2006 neu Gonfensiwn Gwaith mewn Pysgota 2007. 

en-gb	For the purposes of sub-paragraph (1) and paragraph 8—
cy-gb	(2)  At ddibenion y paragraff hwn a pharagraff 8—

en-gb	“the Maritime Labour Convention 2006” means the Convention adopted on 23 February 2006 by the General Conference of the International Labour Organisation( 25 ),
cy-gb	ystyr “Confensiwn Llafur Morol 2006” yw’r Confensiwn a fabwysiadwyd ar 23 Chwefror 2006 gan Gynhadledd Gyffredinol y Sefydliad Llafur Rhyngwladol( 25 ),

en-gb	“the Work in Fishing Convention 2007” means the Convention adopted at Geneva on 14 June 2007 by the International Labour Organisation( 26 ).
cy-gb	ystyr “Confensiwn Gwaith mewn Pysgota 2007” yw’r Confensiwn a fabwysiadwyd yng Ngenefa ar 14 Mehefin 2007 gan y Sefydliad Llafur Rhyngwladol( 26 ).

en-gb	A pilot, as defined in paragraph 22(1) of Schedule 3A to the Merchant Shipping Act 1995( 27 ), where the pilot has travelled to the United Kingdom in the course of the pilot’s work or has been repatriated to the United Kingdom in accordance with the Maritime Labour Convention 2006 or the Work in Fishing Convention 2007.
cy-gb	Peilot, fel y’i diffinnir ym mharagraff 22(1) o Atodlen 3A i Ddeddf Llongau Masnach 1995( 27 ), pan fo’r peilot wedi teithio i’r Deyrnas Unedig yng nghwrs ei waith neu wedi ei ddychwelyd i’r Deyrnas Unedig yn unol â Chonfensiwn Llafur Morwrol 2006 neu Gonfensiwn Gwaith mewn Pysgota 2007.

en-gb	An inspector or a surveyor of ships appointed under section 256 of the Merchant Shipping Act 1995( 28 ), where they have travelled to the United Kingdom in the course of their work.
cy-gb	Arolygydd neu syrfëwr llongau a benodwyd o dan adran 256 o Ddeddf Llongau Masnach 1995( 28 ), pan fo wedi teithio i’r Deyrnas Unedig yng nghwrs ei waith.

en-gb	A person falling within the definition of crew, in paragraph 1 of Schedule 1 to the Air Navigation Order 2016( 29 ), where the person has travelled to the United Kingdom in the course of their work.
cy-gb	Person o fewn y diffinad o “crew” ym mharagraff 1 o Atodlen 1 i Orchymyn Llywio Awyr 2016( 29 ), pan fo’r person wedi teithio i’r Deyrnas Unedig yng nghwrs ei waith.

en-gb	A civil aviation inspector as defined in Annex 9 to the Convention on International Civil Aviation signed at Chicago on 7 December 1944( 30 ), where the inspector has travelled to the United Kingdom when engaged on inspection duties.
cy-gb	Arolygwr hedfan sifil, fel y’u diffinnir yn Atodlen 9 i’r Confensiwn ar Hedfan Sifil Rhyngwladol a lofnodwyd yn Chicago ar 7 Rhagfyr 1944( 30 ), pan fo’r arolygwr wedi teithio i’r Deyrnas Unedig wrth ymgymryd â dyletswyddau arolygu.

en-gb	12. —(1)  Any of the following persons who have travelled to the United Kingdom in the course of their work—
cy-gb	12. —(1)  Unrhyw un o’r personau a ganlyn sydd wedi teithio i’r Deyrnas Unedig yng nghwrs eu gwaith—

en-gb	drivers and crews on shuttle services and on services for the carriage of passengers or goods by way of the tunnel system,
cy-gb	gyrwyr a chriwiau ar wasanaethau gwennol ac ar wasanaethau ar gyfer cludo teithwyr neu nwyddau drwy gyfrwng system y twnnel,

en-gb	operational, rail maintenance, safety and security workers working on the tunnel system,
cy-gb	gweithwyr gweithredol, gweithwyr cynnal a chadw rheilffyrdd, a gweithwyr diogelwch a diogeledd sy’n gweithio ar system y twnnel,

en-gb	other workers carrying out essential roles for the safe or efficient operation of the tunnel system, shuttle services or services for the carriage of passengers or goods by way of the tunnel system, or relating to the security of the tunnel system or any such services.
cy-gb	gweithwyr eraill sy’n cyflawni rolau hanfodol ar gyfer rhedeg, mewn modd diogel neu effeithlon, system y twnnel, gwasanaethau gwennol neu wasanaethau ar gyfer cludo teithwyr neu nwyddau drwy gyfrwng system y twnnel, neu sy’n ymwneud â diogelwch system y twnnel neu unrhyw wasanaethau o’r fath.

en-gb	For the purposes of sub-paragraph (1)—
cy-gb	At ddibenion is-baragraff (1)—

en-gb	“shuttle service” has the meaning given in section 1(9) of Channel Tunnel Act 1987( 31 ), (b) “tunnel system” has the meaning given in section 1(7) of that Act.
cy-gb	mae i “gwasanaeth gwennol” yr ystyr a roddir i “shuttle service” yn adran 1(9) o Ddeddf Twnnel y Sianel 1987( 31 ),mae i “system y twnnel” yr ystyr a roddir i “tunnel system” yn adran 1(7) o’r Ddeddf honno.

en-gb	13. —(1)  A Crown servant or government contractor—
cy-gb	13. —(1)  Gwas i’r goron neu gontractwr llywodraeth—

en-gb	who is required to undertake essential policing or essential government work in the United Kingdom within 14 days of arriving, or
cy-gb	y mae yn ofynnol iddo ymgymryd â gwaith plismona hanfodol neu waith llywodraeth hanfodol yn y Deyrnas Unedig o fewn 14 diwrnod o gyrraedd y Deyrnas Unedig, neu

en-gb	who is undertaking essential policing or essential government work outside the United
cy-gb	sy’n ymgymryd â gwaith plismona neu waith llywodraeth hanfodol y tu allan i’r Deyrnas

en-gb	Kingdom but—
cy-gb	Unedig ond—

en-gb	is required to return to the United Kingdom temporarily,
cy-gb	y mae’n ofynnol iddo ddychwelyd i’r Deyrnas Unedig dros dro,

en-gb	will subsequently depart to undertake essential policing or essential government work outside the United Kingdom, or
cy-gb	a fydd wedyn yn ymadael i ymgymryd â gwaith plismona neu waith llywodraeth hanfodol y tu allan i’r Deyrnas Unedig, neu

en-gb	(c) who is conducting bi-lateral or multilateral discussions with another state or international organisation.
cy-gb	sy’n cynnal trafodaethau dwyochrog ac amlochrog gyda gwladwriaeth arall neu sefydliad rhyngwladol.

en-gb	(2)  For the purposes of sub-paragraph (1)—
cy-gb	(2)  At ddibenion is-baragraff (1)—

en-gb	“Crown servant” has the meaning given in section 12(1)(a) to (e) of the Official Secrets Act 1989,
cy-gb	mae i “gwas i’r Goron” yr ystyr a roddir i “Crown servant” yn adran 12(1)(a) i (e) o Ddeddf Cyfrinachau Swyddogol 1989,

en-gb	“essential government work” means work that has been designated as such by the Welsh Ministers or the relevant Department or employer, and includes, in particular, work related to national security, the work of the National Crime Agency in pursuance of its statutory functions, immigration, coronavirus and any other crisis response, but does not include work of the kind specified in paragraph 2(1) of Part 1 of this Schedule,
cy-gb	ystyr “gwaith llywodraeth hanfodol” yw gwaith sydd wedi ei ddynodi felly gan Weinidogion Cymru neu’r Adran berthnasol, neu’r cyflogwr, ac mae’n cynnwys, yn benodol, gwaith sy’n gysylltiedig â diogelwch gwladol, gwaith yr Asiantaeth Troseddu Cenedlaethol yn unol â’i swyddogaethau statudol, mewnfudo, y coronafeirws ac unrhyw ymateb argyfwng arall, ond nid yw’n cynnwys gwaith o’r math a bennir ym mharagraff 2(1) o Ran 1 o’r Atodlen hon,

en-gb	“essential policing” means policing that has been designated as such by the relevant chief officer or chief constable,
cy-gb	ystyr “plismona hanfodol” yw plismona sydd wedi ei ddynodi felly gan y prif swyddog neu’r prif gwnstabl perthnasol,

en-gb	“government contractor” has the meaning given in section 12(2) of the Official Secrets Act 1989.
cy-gb	(d) mae i “contractwr llywodraeth” yr ystyr a roddir i “government contractor” yn adran 12(2) o Ddeddf Cyfrinachau Swyddogol 1989.

en-gb	A person designated by the relevant Minister under section 5(3) of the Repatriation of Prisoners Act 1984( 32 ).
cy-gb	Person a ddynodir gan y Gweinidog perthnasol o dan adran 5(3) o Ddeddf Dychwelyd Carcharorion i’w Gwlad eu Hunain 1984( 32 ).

en-gb	A person responsible for escorting a person sought for extradition pursuant to a warrant issued under Part 3 of the Extradition Act 2003( 33 ) or sought for extradition pursuant to any other extradition arrangements.
cy-gb	Person sy’n gyfrifol am hebrwng person a geisir i’w estraddodi yn unol â gwarant a ddyroddwyd o dan Ran 3 o Ddeddf Estraddodi 2003( 33 ), neu berson a geisir i’w estraddodi yn unol ag unrhyw drefniadau estraddodi eraill.

en-gb	A representative of any territory travelling to the United Kingdom in order to take into custody a person whose surrender has been ordered pursuant to any provision of the Extradition Act 2003.
cy-gb	Cynrychiolydd i unrhyw diriogaeth sy’n teithio i’r Deyrnas Unedig er mwyn cymryd i’r ddalfa berson y gorchmynnwyd ei ildio yn unol ag unrhyw ddarpariaeth yn Neddf Estraddodi 2003.

en-gb	17. —(1)  A worker engaged in essential or emergency works—related to water supplies and sewerage services, and
cy-gb	17. —(1)  Gweithiwr sy’n ymwneud â gwaith hanfodol neu waith brys— (a) sy’n gysylltiedig â chyflenwadau dŵr a gwasanaethau carthffosiaeth, a

en-gb	carried out by, for, or on behalf of a water undertaker, sewerage undertaker, water supply licensee, sewerage licensee or local authority,
cy-gb	(b) a gyflawnir gan ymgymerwr dŵr, ymgymerwr carthffosiaeth, trwyddedai cyflenwi dŵr, trwyddedai carthffosiaeth neu awdurdod lleol, i’r rhain neu ar ran y rhain,

en-gb	where the worker has travelled to the United Kingdom in the course of the work.
cy-gb	pan fo’r gweithiwr wedi teithio i’r Deyrnas Unedig yng nghwrs ei waith.

en-gb	(2)  For the purposes of sub-paragraph (1)—
cy-gb	At ddibenion is-baragraff (1)—

en-gb	(a) “essential or emergency works” includes—
cy-gb	mae “gwaith hanfodol neu waith brys” yn cynnwys—

en-gb	inspections, maintenance, repairs, and asset replacement activities,
cy-gb	archwilio, cynnal a chadw, atgyweirio, a gweithgareddau amnewid asedau,

en-gb	monitoring, sampling and analysis of water supplies under the Private Water Supplies (Wales) Regulations 2017( 34 ), the Water Supply (Water Quality) Regulations 2018( 35 ), the Private Water Supplies (England) Regulations 2016( 36 ) or the Water Supply (Water Quality) Regulations 2016( 37 ),
cy-gb	monitro, samplu a dadansoddi cyflenwadau dŵr o dan Reoliadau Cyflenwadau Dŵr Preifat (Cymru) 2017( 34 ), Rheoliadau Cyflenwad Dŵr (Ansawdd Dŵr) 2018( 35 ), Rheoliadau Cyflenwadau Dŵr Preifat (Lloegr) 2016( 36 ) neu Reoliadau Cyflenwad Dŵr (Ansawdd Dŵr) 2016( 37 ),

en-gb	“sewerage licensee” has the meaning given in section 17BA(6) and 219(1) of the Water Industry Act 1991( 38 ),
cy-gb	mae i “trwyddedai carthffosiaeth” yr ystyr a roddir i “sewerage licensee” yn adran 17BA(6) a 219(1) o Ddeddf y Diwydiant Dŵr 1991( 38 ),

en-gb	“sewerage services” has the meaning given in section 219(1) of the Water Industry Act 1991( 39 ),
cy-gb	mae i “gwasanaethau carthffosiaeth” yr ystyr a roddir i “sewerage services” yn adran 219(1) o Ddeddf y Diwydiant Dŵr 1991( 39 ),

en-gb	“sewerage undertaker” means a company appointed as a sewerage undertaker under section 6 of the Water Industry Act 1991( 40 ),
cy-gb	ystyr “ymgymerwr carffosiaeth” yw cwmni a benodwyd yn ymgymerwr carffosiaeth o dan adran 6 o Ddeddf y Diwydiant Dŵr 1991( 40 ),

en-gb	“water supply licensee” has the meaning given in sections 17A(7) and 219(1) of the Water Industry Act 1991( 41 ),
cy-gb	mae i “trwyddedai cyflenwi dŵr” yr ystyr a roddir i “water supply licensee” yn adrannau 17A(7) a 219(1) o Ddeddf y Diwydiant Dŵr 1991( 41 ),

en-gb	“water undertaker” means a company appointed as a water undertaker under section 6 of the Water Industry Act 1991.
cy-gb	ystyr “ymgymerwr dŵr” yw cwmni a benodwyd yn ymgymerwr dŵr o dan adran 6 o Ddeddf y Diwydiant Dŵr 1991..

en-gb	18. —(1)  A worker engaged in essential or emergency works— (a) related to—
cy-gb	18. —(1)  Gweithiwr sy’n ymwneud â gwaith hanfodol neu waith brys— (a) sy’n gysylltiedig—

en-gb	a generating station,
cy-gb	â gorsaf gynhyrchu,

en-gb	an electricity interconnector,
cy-gb	â chydgysylltydd trydan,

en-gb	a district heat network as defined in regulation 2 of the Heat Network (Metering and Billing) Regulations 2014( 42 ),
cy-gb	â rhwydwaith gwres ardal fel y’i diffinnir yn rheoliad 2 o Reoliadau Rhwydweithiau Gwres (Mesuryddion a Bilio) 2014( 42 ),

en-gb	communal heating as defined in regulation 2 of the Heat Network (Metering and Billing) Regulations 2014,
cy-gb	â gwresogi cymunedol fel y’i diffinnir yn rheoliad 2 o Reoliadau Rhwydweithiau Gwres (Mesuryddion a Bilio) 2014,

en-gb	automated ballast cleaning and track re-laying systems on a network, or
cy-gb	â systemau glanhau awtomataidd ar falast a systemau ailosod traciau ar rwydwaith, neu

en-gb	the commissioning, maintenance and repair of industrial machinery for use on a network, or
cy-gb	â chomisiynu, cynnal a chadw a thrwsio peiriannau diwydiannol i’w defnyddio ar rwydwaith, neu

en-gb	(b) carried out by, for, or on behalf of—the national system operator,
cy-gb	(b) a gyflawnir gan, ar gyfer, neu ar ran— (i) gweithredwr y system genedlaethol,

en-gb	a person holding a transmission licence,
cy-gb	person sydd â thrwydded drawsyrru,

en-gb	a person holding a distribution licence,
cy-gb	person sydd â thrwydded ddosbarthu,

en-gb	a person holding a licence under section 7 and 7ZA of the Gas Act 1986( 43 ),
cy-gb	person sydd â thrwydded o dan adran 7 a 7ZA o Ddeddf Nwy 1986( 43 ),

en-gb	a LNG import or export facility as defined in section 48 of the Gas Act 1986( 44 ), or (vi) a person holding a network licence under section 8 of the Railways Act 1993,
cy-gb	cyfleuster mewnforio neu allforio LNG fel y’i diffinnir yn adran 48 o Ddeddf Nwy 1986( 44 ), neu person sydd â thrwydded rwydwaith o dan adran 8 o Ddeddf Rheilffyrdd 1993,

en-gb	where the worker has travelled to the United Kingdom for the purposes of the work.
cy-gb	pan fo’r gweithiwr wedi teithio i’r Deyrnas Unedig at ddibenion ei waith.

en-gb	For the purposes of sub-paragraph (1)—
cy-gb	At ddibenion is-baragraff (1)—

en-gb	“distribution licence” means a licence granted under section 6(1)(c) of the Electricity Act 1989( 45 ),
cy-gb	ystyr “trwydded ddosbarthu” yw trwydded a roddwyd o dan adran 6(1)(c) o Ddeddf Trydan 1989( 45 ),

en-gb	“essential or emergency works” includes commissioning, inspections, maintenance, repairs, and asset replacement activities,
cy-gb	mae “gwaith hanfodol neu waith brys” yn cynnwys comisiynu, archwilio, cynnal a chadw, atgyweirio, a gweithgareddau amnewid asedau,

en-gb	“national system operator” means the person operating the national transmission system for Great Britain,
cy-gb	ystyr “gweithredwr y system genedlaethol” yw’r person sy’n gweithredu system drawsyrru genedlaethol Prydain Fawr,

en-gb	“network” has the meaning given in section 83(1) of the Railways Act 1993( 46 ),
cy-gb	mae i “rhwydwaith”, , yr ystyr a roddir i “network” yn adran 83(1) o Ddeddf Rheilffyrdd 1993( 46 ),

en-gb	“transmission licence” means a licence granted under section 6(1)(b) of the Electricity Act 1989,
cy-gb	ystyr “trwydded drawsyrru” yw trwydded a roddwyd o dan adran 6(1)(b) o Ddeddf Trydan 1989,

en-gb	“electricity interconnector”, “generating station” and “transmission system” have the meanings given in section 64(1) of the Electricity Act 1989( 47 ).
cy-gb	mae i “cydgysylltydd trydan”, “gorsaf gynhyrchu” a “system drawsyrru” yr ystyron a roddir i “electricity interconnector”, “generating station” a “transmission system” yn adran 64(1) o Ddeddf Trydan 1989( 47 ).

en-gb	19. —(1)  A person who is—
cy-gb	19. —(1)  Person sydd—

en-gb	nuclear personnel, and who is essential to the safe and secure operation of a site in respect of which a nuclear site licence has been granted,a nuclear emergency responder,an agency inspector, ora Euratom inspector, provided that the inspector arrives in the United Kingdom before implementation period completion day,where the person travelled to the United Kingdom in the course of the person’s work.
cy-gb	(a) yn bersonél niwclear, ac sy’n hanfodol i weithrediad saff a diogel safle y rhoddwyd trwydded safle niwclear mewn perthynas ag ef, (b) yn ymatebydd argyfwng niwclear,yn arolygydd asiantaeth, neu yn arolygydd Euratom, ar yr amod ei fod yn cyrraedd y Deyrnas Unedig cyn diwrnod cwblhau’r cyfnod gweithredu, pan fo’r person wedi teithio i’r Deyrnas Unedig yng nghwrs ei waith.

en-gb	“agency inspector” has the meaning given in section 1(1) of the Nuclear Safeguards Act 2000( 48 ),
cy-gb	mae i “arolygydd asiantaeth” yr ystyr a roddir i “agency inspector” yn adran 1(1) o Ddeddf Diogelwch Niwclear 2000( 48 ),

en-gb	“nuclear emergency responder” means a person providing assistance to the United Kingdom in accordance with the Convention on Assistance in the Case of a Nuclear Accident or Radiological Emergency done at Vienna on 26 September 1986, who has been duly notified to and accepted by the United Kingdom, where the United Kingdom has requested assistance under that Convention,
cy-gb	ystyr “ymatebydd argyfwng niwclear” yw person sy’n rhoi cymorth i’r Deyrnas Unedig yn unol â’r Confensiwn ar Gymorth yn Achos Damwain Niwclear neu Argyfwng Radiolegol a wnaed yn Fienna ar 26 Medi 1986, sydd wedi ei hysbysu’n briodol i’r Deyrnas Unedig ac wedi ei dderbyn ganddi, pan fo’r Deyrnas Unedig wedi gofyn am gymorth o dan y Confensiwn hwnnw,

en-gb	“Euratom inspector” means an inspector sent to the United Kingdom by the Commission of the European Union in accordance with Articles 81 and 82 of the Euratom Treaty,“nuclear personnel” means—
cy-gb	ystyr “arolygydd Euratom” yw arolygydd a anfonwyd i’r Deyrnas Unedig gan Gomisiwn yr Undeb Ewropeaidd yn unol ag Erthyglau 81 a 82 o Gytuniad Euratom, (d) ystyr “personél niwclear” yw—

en-gb	a worker who is employed to carry out work on or in relation to a site in respect of which a nuclear site licence has been granted, or
cy-gb	gweithiwr a gyflogir i gyflawni gwaith ar safle neu mewn perthynas â safle y rhoddwyd trwydded safle niwclear mewn perthynas ag ef, neu

en-gb	an employee of the Nuclear Decommissioning Authority( 49 ),
cy-gb	cyflogai i’r Awdurdod Datgomisiynu Niwclear( 49 ),

en-gb	“nuclear site licence” has the meaning given in section 1 of the Nuclear Installations Act 1965( 50 ).
cy-gb	(e) mae i “trwydded safle niwclear” yr ystyr a roddir i “nuclear site licence” yn adran 1 o Ddeddf Safleoedd Niwclear 1965( 50 ).

en-gb	The definition of “electricity interconnector” was inserted by section 147(7) of the Energy Act 2004. 
cy-gb	Mewnosodwyd y diffiniad o “electricity interconnector” gan adran 147(7) o Ddeddf Ynni 2004. 

en-gb	The definition of “transmission system” was substituted by paragraph 15 of Schedule 19 to the 2004 Act.
cy-gb	Amnewidiwyd y diffiniad o “transmission system” gan baragraff 15 o Atodlen 19 i Ddeddf 2004.